
 GPS week: 1105   Day: 0   MJD: 51979                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2746      0     0.01    -0.17     5.07     0.00
 cod |   288     0  18254     28     1.18    -3.95     0.07    31.93
 emr |    96     0   3409     96  1275.18     9.20     0.12    19.12
 gfz |   288     0  13808      0     0.16     0.21     0.08    29.64
 igp |    96     0   2377      0     0.07    -0.41     6.41     0.00
 igu |    96     0   2377      0    -0.14    -0.02     3.14     0.00
 jpl |     0     0      0      0    -0.79     0.00     0.00     0.00
 ngs |    96     0   2746      0    -0.08    -0.03     4.88     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14896     42   603.53    13.27     0.12    19.32

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  6103    38   122   -58-10804 11568     -  4922     -   -13 |
    2 | -8677   180   -16   179-22439     -     - -7145     -  -568 |
    3 |  -273     2  -139    48 21598 -5124     -  -807     -   -31 |
    4 |   815    42  -214   269 13252  3258     -   584     -  -412 |
    5 | -9921   171  -183     0  -749 -3284     - -9826     -  -217 |
    6 |  2577    25  -183    69 25402 -4237     -  2179     -   -87 |
    7 |   693   186  -259   257-13306 -1129     -   475     -  -616 |
    8 |  6143   102    83   156 10165  1966     -  5410     -  -436 |
    9 |  3369    96  -308   163  5043  2413     -  3257     -  -309 |
   10 | -1385     8   -97   349  2091 -6213     - -1297     -  -517 |
   11 |  4334     6  -105   -79 21466 -1932     -  3956     -   141 |
   13 |  2936   -33   185   -43  5520  2157     -  2867     -    60 |
   14 |  2589     4    17   -97 21336  1741     -  2240     -   137 |
   15 |   209   177     -     -     -     -     -   137     -  -292 |
   17 |  1588  -109   -36     -     -     -     -  1114     -   191 |
   18 |  1473   -91   118  -114     -     -     -  2299     -   284 |
   19 | -9583   -21   385   -60****** 10483     - -9392     -     - |
   20 |  4276   -19   204   -43 22519   928     -  3928     -    30 |
   21 | -4596    78  -168  -151  -966 -8705     - -3646     -   158 |
   22 | -9444    33    74  -125-40807-15883     - -7014     -   112 |
   23 |  8295   130  -280   -66     - 10846     -  8118     -   -23 |
   24 | -1615   -13   -81   145  9910  4605     - -1219     -  -174 |
   25 |  1931    15     X  -176 -6637 15080     -  1026     -   245 |
   26 |   144   -21  -146   289  7110  2944     -  -298     -  -360 |
   27 |  1616    96   322   -77 49832 -2614     -   942     -  -148 |
   28 |  2016   -11   317  -172  8198 -9974     -  1648     -   178 |
   29 | -1315    63  -115   -99 -6048  2431     - -1181     -    86 |
   30 |  -416   -27  -166    39  7680  -721     -  -399     -    41 |
   31 | -3656   103   -18   -35  2603 -9373     - -2781     -  -110 |
 -----+-------------------------------------------------------------+
 ALGO |     -   -73    75   -14     -     -     -     -     -   117 |
 AREQ |     -  -122     -   182     -     -     -     -     -   -79 |
 AUCK |     -  -113     -     -     -     -     -     -     -   186 |
 BAHR |     -   -22     -   -32     -     -     -     -     -    85 |
 BRMU |     -  -119     -   -92     -     -     -     -     -   337 |
 CAS1 |     -    21     -  -122     -     -     -     -     -   152 |
 DAV1 |     -    11     -   -12     -     -     -     -     -     - |
 DRAO |     -   -24     5     -     -     -     -     -     -    39 |
 FAIR |     -   -60    17     -     -     -     -     -     -    30 |
 GALA |     -    53     -   -57     -     -     -     -     -     - |
 GUAM |     -  -224     -    48     -     -     -     -     -   274 |
 HOB2 |     -  -107     -     -     -     -     -     -     -   177 |
 KARR |     -   -62     -    66     -     -     -     -     -     - |
 KERG |     -   -19     -     -     -     -     -     -     -    31 |
 KOSG |     -  -132     -     -     -     -     -     -     -   218 |
 KWJ1 |     -     -     -    37     -     -     -     -     -   -57 |
 MAC1 |     -    55     -   -59     -     -     -     -     -     - |
 MATE |     -  -124     -     -     -     -     -     -     -   204 |
 MCM4 |     -   155     -  -193     -     -     -     -     -    40 |
 MDO1 |     -   -58    98     -     -     -     -     -     -     - |
 NLIB |     -  -105     -     -     -     -     -     -     -   174 |
 NYA1 |     -    58     -   -63     -     -     -     -     -     - |
 OHIG |     -     3     -    -3     -     -     -     -     -     - |
 ONSA |     -   -94     -     -     -     -     -     -     -   156 |
 PIE1 |     -    35     -     -     -     -     -     -     -   -57 |
 STJO |     -   -65   221    22     -     -     -     -     -     - |
 SUTH |     -   139     -  -150     -     -     -     -     -     - |
 THTI |     -   -41     -     -     -     -     -     -     -    68 |
 THU1 |     -   -76     -     -     -     -     -     -     -   126 |
 TOW2 |     -   -29     -    31     -     -     -     -     -     - |
 TRO1 |     -  -149     -   160     -     -     -     -     -     - |
 TSKB |     -   -72    81     -     -     -     -     -     -    80 |
 URUM |     -   169     -  -210     -     -     -     -     -    44 |
 USNO |     -    -2     -     -     -     -     -     -     -     3 |
 VILL |     -   -84   141     -     -     -     -     -     -     - |
 WHIT |     -   -64     -    69     -     -     -     -     -     - |
 WTZR |     -   -64     -     -     -     -     -     -     -   106 |
 WUHN |     -    81     -   -88     -     -     -     -     -     - |
 YAR2 |     -   -57     -     -     -     -     -     -     -    95 |
 YELL |     -   -35    59     -     -     -     -     -     -     - |
 ZWEN |     -     -     -   -53     -     -     -     -     -    82 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7953    94   144    47  2110  2649     -  7558     -   125 |  288   1.35
    2 | 10183    72    92    78  3164     -     -  9820     -   176 |  287   2.59
    3 |  1643    60    57   134  4725  1641     -  1601     -   170 |  288   1.67
    4 |  1362    58   194    99  1738  1363     -  1336     -   130 |  276   0.63
    5 |  3726   142    78   142  3005  2989     -  3425     -   169 |  288   2.35
    6 |  5145    78    64    90  8934  1740     -  5229     -    51 |  288   4.98
    7 |  1154   137   163    82  7379  1122     -  1089     -    87 |  288   1.08
    8 |  2986   165   152   137  2767  1808     -  3080     -   151 |  278   2.30
    9 |  1783   120   128    80  3172  1824     -  1726     -   150 |  279   1.71
   10 |  5471    63   141    90  3034  2430     -  5291     -    91 |  288   2.30
   11 |  1580    59    73    59  3424  1081     -  1511     -   109 |  288   0.47
   13 |  1086    95    77    61  1854   858     -  1176     -    74 |  288   0.36
   14 |  1441    78    83    84  3821   756     -  1393     -    48 |  288   0.32
   15 |  3250   110     -     -     -     -     -  3327     -   182 |  259   2.34
   17 |  9557   180   262     -     -     -     - 10288     -   236 |  200   3.86
   18 |  3187    63    46    92     -     -     -  2814     -    88 |  288   0.39
   19 |  8582    89    91    97 20798  4020     -  8535     -     - |  275   3.14
   20 |  1344    55    53   101  3377   508     -  1381     -   149 |  288   0.23
   21 |  6366    62    62    33  4723  3103     -  5652     -    76 |  288   3.67
   22 |  7794    44   114    36 12356  6180     -  6146     -    84 |  288   0.83
   23 |  6974    60   190    95     -  4697     -  7052     -   121 |  288   5.37
   24 |  4272    80    94    45  2837  1944     -  4131     -    75 |  278   2.12
   25 |  3253    73     X    59  4051  4682     -  2929     -    79 |  276   1.67
   26 |  1686    45    46    38  1670   959     -  1471     -    52 |  288   0.76
   27 |  5997    64   199    74  9062  3396     -  5744     -    85 |  277   4.46
   28 |  3351    53   112    76  1693  4583     -  3448     -    55 |  288   0.93
   29 |  1214    51   147    41  1992  1859     -  1621     -    60 |  288   0.84
   30 |  4572    65   158    86  6639  3588     -  4509     -   167 |  288   0.99
   31 |  7355    31   150    51  5213  6842     -  6318     -   121 |  288   4.26
 -----+-------------------------------------------------------------+--------------
 ALGO |     -    26    70    23     -     -     -     -     -    42 |  288   0.04
 AREQ |     -    82     -    74     -     -     -     -     -   201 |  250    >>>
 AUCK |     -    35     -     -     -     -     -     -     -    58 |  288  19.83
 BAHR |     -   119     -    73     -     -     -     -     -    86 |  271   0.42
 BRMU |     -    38     -    33     -     -     -     -     -    57 |  288  20.39
 CAS1 |     -    44     -    91     -     -     -     -     -   177 |  288  13.50
 DAV1 |     -    38     -    41     -     -     -     -     -     - |  288  17.76
 DRAO |     -    26    30     -     -     -     -     -     -    48 |  288   0.04
 FAIR |     -   248   130     -     -     -     -     -     -   205 |  122   0.22
 GALA |     -    58     -    62     -     -     -     -     -     - |  259  49.96
 GUAM |     -    52     -   179     -     -     -     -     -   342 |  288  28.11
 HOB2 |     -    35     -     -     -     -     -     -     -    58 |  288   0.12
 KARR |     -    25     -    27     -     -     -     -     -     - |  286 151.37
 KERG |     -    35     -     -     -     -     -     -     -    58 |  287    >>>
 KOSG |     -    33     -     -     -     -     -     -     -    55 |  288  38.71
 KWJ1 |     -     -     -   182     -     -     -     -     -   279 |  206  79.77
 MAC1 |     -    31     -    34     -     -     -     -     -     - |  287  15.33
 MATE |     -    29     -     -     -     -     -     -     -    48 |  287   0.09
 MCM4 |     -    44     -    70     -     -     -     -     -   157 |  288  10.24
 MDO1 |     -    18    30     -     -     -     -     -     -     - |   91  30.50
 NLIB |     -    48     -     -     -     -     -     -     -    80 |  275 841.28
 NYA1 |     -    26     -    28     -     -     -     -     -     - |  287   0.07
 OHIG |     -    43     -    46     -     -     -     -     -     - |  277  16.72
 ONSA |     -    36     -     -     -     -     -     -     -    60 |  288   0.12
 PIE1 |     -    12     -     -     -     -     -     -     -    19 |  202   0.04
 STJO |     -    33    79    33     -     -     -     -     -     - |  288   2.18
 SUTH |     -    68     -    74     -     -     -     -     -     - |  286  47.86
 THTI |     -    46     -     -     -     -     -     -     -    76 |  284   2.88
 THU1 |     -    74     -     -     -     -     -     -     -   123 |  282  16.93
 TOW2 |     -    20     -    22     -     -     -     -     -     - |  287  16.82
 TRO1 |     -    24     -    26     -     -     -     -     -     - |  287  11.71
 TSKB |     -    45    58     -     -     -     -     -     -    65 |  248   1.67
 URUM |     -   112     -    59     -     -     -     -     -   101 |  288  20.81
 USNO |     -    22     -     -     -     -     -     -     -    37 |  288   0.03
 VILL |     -    48    80     -     -     -     -     -     -     - |   96   2.58
 WHIT |     -    27     -    29     -     -     -     -     -     - |  288  23.70
 WTZR |     -    25     -     -     -     -     -     -     -    42 |  287   0.04
 WUHN |     -    62     -    67     -     -     -     -     -     - |  286  37.51
 YAR2 |     -    39     -     -     -     -     -     -     -    64 |  284  18.30
 YELL |     -    22    37     -     -     -     -     -     -     - |   95   0.05
 ZWEN |     -     -     -    13     -     -     -     -     -    20 |  288  19.65
 -----+-------------------------------------------------------------+--------------
 TOT  |  5069    69   117    78  6408  3136     -  4876     -   121 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

