
 GPS week: 1095   Day: 6   MJD: 51915                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2570      0     0.16    -0.49     5.06     0.00
 cod |   288     0  13135    147     1.89    -4.03     0.08    23.30
 emr |    96     0   3240      0  2494.35     7.60     0.06    33.62
 gfz |   288     0  12674     16     0.04    -0.21     0.10    20.14
 igp |    96     0   2201      0    -0.01    -0.16     4.96     0.00
 igu |    96     0   2475      0    -0.01    -0.54     4.88     0.00
 ngs |    96     0   2570      0     0.14    -0.46     4.98     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14347      4   337.83   -43.18     0.08    22.94

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -1107   354  -101    63 -5236 -5477 -1052     -  -247 |
    2 | -6676   172   132   -11 -1953 -2197 -6269     -  -177 |
    3 |  -360   -26   -66   124 -8635 -8879  -654     -   -57 |
    4 |  1227    29    60    16-12429-12673  1148     -   -66 |
    5 | -2556     1   -76    -1-30956-31199 -2717     -    37 |
    6 | -5810   -29   -82    92 15051 14807 -5432     -   -16 |
    7 | -3372    96    -1    59-40561-40805 -2853     -  -128 |
    8 |  9971   308    36     9 19481 19237  8585     -  -248 |
   10 | -3437    89   -49   128  4796  4553 -3377     -  -157 |
   11 |  9051   -75    -8    42  -137  -381  8940     -    27 |
   13 |  2972     2     7   -43 -1806 -2050  2932     -    32 |
   14 |   978   -62   107  -123-15969-16213   971     -    97 |
   15 |  1488    53  -119   109     - 17101   865     -   -79 |
   17 |  2245   119  -121   113 21919     -  1486     -  -125 |
   19 | -6470   140   -22  -139     - 28069 -4828     -     - |
   20 |  7427    48    38   -44  2465  2221  7402     -   -16 |
   21 | -3788   -80   -58   237 17724 17480 -3646     -  -124 |
   22 | -4993    66   -17   -63 -3167 -3411 -4643     -    10 |
   23 | -1235    -4   116  -107     - -4094 -1034     -    40 |
   24 | -1832   -65   -23    27-14042-14286 -1817     -    40 |
   25 | -5942     1   -36     9  3385  3141 -5162     -     9 |
   26 | -2861    17   -23    22-14636-14880 -2148     -   -22 |
   27 |  3482   229    -8   148 46713 46469  2879     -  -280 |
   28 | 10115   -42    63   -14  -176  -420  9369     -    13 |
   29 |  -622    -8  -118   119     --11217  -871     -   -41 |
   30 | -1229    57   -87    81 -9788-10031  -622     -   -75 |
   31 |  2485   193   -36    73 27686 27443  1892     -  -183 |
 -----+-------------------------------------------------------+
 AREQ |     -  -105     -     -     -     -     -     -   107 |
 AUCK |     -   -76     -     -     -     -     -     -    77 |
 BAHR |     -    56    82  -126     -     -     -     -    13 |
 BRMU |     -   -84     -     -     -     -     -     -    85 |
 CAS1 |     -     -     -   -66     -     -     -     -    58 |
 COCO |     -     -     -    -9     -     -     -     -     8 |
 DRAO |     -   -26    75  -152     -     -     -     -   123 |
 EISL |     -  -418     -     -     -     -     -     -   424 |
 FAIR |     -     -   -31     -     -     -     -     -    46 |
 GUAM |     -  -129     -     -     -     -     -     -   132 |
 KERG |     -    36     -     -     -     -     -     -   -36 |
 KOKB |     -     -     -   354     -     -     -     -  -311 |
 KOUR |     -   160     -   -73     -     -     -     -     2 |
 KWJ1 |     -     -     -     9     -     -     -     -    -8 |
 LHAS |     -     4     -    -4     -     -     -     -     - |
 MALI |     -     -     -  -248     -     -     -     -   218 |
 MAS1 |     -    17    76  -149     -     -     -     -    77 |
 MATE |     -     0     -     -     -     -     -     -     0 |
 MCM4 |     -   183     -   -60     -     -     -     -  -105 |
 NLIB |     -   -87     -     -     -     -     -     -    88 |
 NYA1 |     -    41     -   -47     -     -     -     -     - |
 ONSA |     -   -10     -  -126     -     -     -     -   121 |
 PERT |     -    57     -     -     -     -     -     -   -58 |
 PIE1 |     -  -200     -     -     -     -     -     -   203 |
 SANT |     -     X     -  -224     -     -     -     -   196 |
 STJO |     -   -40   159   -43     -     -     -     -     - |
 THU1 |     -   -71     -     -     -     -     -     -    73 |
 TIDB |     -    46     -   -54     -     -     -     -     - |
 TRO1 |     -  -101     -   117     -     -     -     -     - |
 USNO |     -  -123     -     -     -     -     -     -   125 |
 WHIT |     -   -42     -    49     -     -     -     -     - |
 WSRT |     -   -38     -     -     -     -     -     -    38 |
 WTZR |     -   -74    20     -     -     -     -     -    66 |
 YELL |     -   -22   102   -31     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5624   104    43    37  4840  4927  5534     -    58 |  276   4.55
    2 |  4483   170   102   206  3761  3898  4066     -   159 |  288   2.97
    3 |  9452    89    31    64  4875  4932  9190     -    59 |  288   3.91
    4 |  1345    61    53    64  3545  3691  1388     -    48 |  288   0.81
    5 |  6361    59    79    55  5952  6096  6274     -    98 |  288   4.69
    6 |  8624    60    82    62  8944  8829  8716     -    84 |  288   8.42
    7 |  3464   115    40    64 10644 10753  3689     -    93 |  288   1.36
    8 |  5136    82    47   124  3855  3803  5000     -    60 |  288   3.58
   10 |  4264   126    48    90  2409  2399  3734     -    42 |  288   2.77
   11 |  1592   106    68    64  1733  1764  1674     -    67 |  288   0.53
   13 |  1034    84    65    44  1000  1078   983     -    51 |  288   0.25
   14 |   717    91    88    58  3384  3519   906     -    52 |  288   0.59
   15 |  3160    94    72    57     -  3546  3002     -    48 |  288   1.51
   17 |  5118    65    54    74  9049     -  5588     -    47 |  287   4.09
   19 | 12291   139    45   163     -  7026 12118     -     - |  203   4.28
   20 |  1007   154   101    65   791   924   969     -   112 |  288   0.22
   21 |  4058   120    43   100  2985  2935  4149     -   108 |  288   3.12
   22 |  2216   111    96   104  4287  4422  2274     -   196 |  288   0.78
   23 |  8789   122    67    71     -  7954  8807     -    87 |  288   6.15
   24 |  2509    78    54   149  2019  1954  2611     -   134 |  288   1.97
   25 |  4067    80    47    77  1681  1824  4212     -    59 |  288   1.55
   26 |  3684   174    75   163  2633  2792  3418     -    63 |  278   0.57
   27 |  3760    34    25    51  7849  7697  3655     -    45 |  288   3.12
   28 |  2658   143    63   159   812  1005  2200     -    60 |  288   0.42
   29 |  1801    85    79    87     -  2705  1972     -   102 |  278   1.11
   30 |  5699    64    41    48  4791  4676  5287     -    48 |  288   0.83
   31 |  3538    48    52    55  4956  4853  3217     -    58 |  288   2.96
 -----+-------------------------------------------------------+--------------
 AREQ |     -    86     -     -     -     -     -     -    87 |  277    >>>
 AUCK |     -    54     -     -     -     -     -     -    55 |  227  19.07
 BAHR |     -    35    42    67     -     -     -     -    91 |  288   0.40
 BRMU |     -    35     -     -     -     -     -     -    36 |  282  16.55
 CAS1 |     -     -     -    53     -     -     -     -    47 |  288  12.66
 COCO |     -     -     -    52     -     -     -     -    45 |  288  12.78
 DRAO |     -   114    73    95     -     -     -     -    44 |  288   0.12
 EISL |     -    69     -     -     -     -     -     -    70 |  225  18.45
 FAIR |     -     -    79     -     -     -     -     -   115 |   96   0.13
 GUAM |     -    98     -     -     -     -     -     -   100 |  266  27.94
 KERG |     -    93     -     -     -     -     -     -    94 |  228    >>>
 KOKB |     -     -     -   225     -     -     -     -   198 |  115   0.09
 KOUR |     -    37     -    34     -     -     -     -    31 |  260   4.60
 KWJ1 |     -     -     -   184     -     -     -     -   161 |  233 154.55
 LHAS |     -    23     -    26     -     -     -     -     - |  286  16.18
 MALI |     -     -     -   198     -     -     -     -   174 |  224  27.77
 MAS1 |     -    65    36    47     -     -     -     -    33 |  288  21.71
 MATE |     -    34     -     -     -     -     -     -    34 |  287   0.07
 MCM4 |     -   106     -   126     -     -     -     -    54 |  287   7.64
 NLIB |     -    81     -     -     -     -     -     -    83 |  282   0.08
 NYA1 |     -    41     -    47     -     -     -     -     - |  287   0.09
 ONSA |     -    52     -    49     -     -     -     -    21 |  288   0.19
 PERT |     -    39     -     -     -     -     -     -    39 |  256   2.25
 PIE1 |     -    79     -     -     -     -     -     -    80 |  287   0.09
 SANT |     -     X     -   218     -     -     -     -   191 |  200   4.77
 STJO |     -    47    63    33     -     -     -     -     - |  288   3.02
 THU1 |     -    51     -     -     -     -     -     -    52 |  275  17.09
 TIDB |     -    50     -    58     -     -     -     -     - |  284    >>>
 TRO1 |     -    55     -    64     -     -     -     -     - |  287  10.01
 USNO |     -    63     -     -     -     -     -     -    64 |  288  28.01
 WHIT |     -    66     -    76     -     -     -     -     - |  277  42.58
 WSRT |     -    25     -     -     -     -     -     -    26 |  288   0.03
 WTZR |     -    35    20     -     -     -     -     -    30 |  288   0.03
 YELL |     -    63    86    40     -     -     -     -     - |  288   0.06
 -----+-------------------------------------------------------+--------------
 TOT  |  5056    84    64    97  4961  4878  4983     -    85 |


 BEST CLOCK FIT: WSRT   288   0.03 (ns) 

