
 GPS week: 1095   Day: 5   MJD: 51914                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2580      0     0.11    -0.20     5.10     0.00
 cod |   288     0  16529      2     0.12    -2.14     0.08    27.51
 emr |    96     0   3055     90  2484.67     5.79     0.10    22.91
 esa |   288     0  16180   1045  2457.65     5.65     0.16    13.04
 gfz |   288     0  12550    129     0.13    -0.78     0.12    18.84
 igp |    96     0   2388      0     0.04    -0.15     4.96     0.00
 igu |    96     0   2490      0     0.02    -0.15     4.98     0.00
 jpl |   288     0   6790    255     6.47   -20.21     0.18     0.00
 ngs |    96     0   2580      0     0.11    -0.20     4.77     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14978    336   377.92   -43.05     0.12    17.71

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  -802   271   -59  -221    55-22784-22975    48  -289     -  -270 |
    2 |  1368   229   105  -172   -40 -8128 -8313  -104  1090     -  -154 |
    3 | -3713   -25  -104  -114   268 -6005 -6190   -45 -2503     -  -125 |
    4 | -1262     8    55   110    58-22384-22569  -255 -1330     -  -176 |
    5 |-11631    45  -112    72    24-11223-11408  -261 -9997     -   -89 |
    6 |  1872   -22  -173   218   105 -6799 -6984  -144  1708     -  -168 |
    7 | -4642   146    93   -86    61-31369-31554   -91 -4219     -  -212 |
    8 |  8411   370    93  -437    52 -2919 -3104   -30  6919     -  -205 |
   10 | -1459   125  -163     X   -21  6995  6810  -178 -1278     -   -58 |
   11 |  1447  -112     8   555  -149 15124 14939   193  1708     -  -110 |
   13 |   160    43   139   -73   -93 -5031 -5216  -119   522     -    36 |
   14 | -1443  -106   118   370  -149-22018-22203   231 -1024     -   -13 |
   15 |  1202    18  -196     -    55     --11862   138   660     -     2 |
   17 |  1375    10   -33     X   159  7908  7723  -196   844     -  -160 |
   19 |  4074    57  -235   409  -252 25261 25076  -361  3251     -     - |
   20 |  3274     8    -5   357  -105  1965  1780   364  3532     -  -159 |
   21 |  3035    33    11  -465   226 14921 14736   301  2656     -    33 |
   22 |  1445   -26   -23   -31    42 -8334 -8519   466  1255     -    19 |
   23 | -7700  -123   -55   201   -90     - -3157   111 -7349     -   128 |
   24 | -4238   -65    25     X    63  9583  9398  -562 -3639     -     6 |
   25 |  1906    63    64  -342   140 14295 14110   421  1095     -    -1 |
   26 | -4624   -86   -15   270   -46-15983-16168  -467 -4488     -    31 |
   27 |  6391   181   -66   246   -54 34794 34609  -145  4834     -  -323 |
   28 |  4489   -57    37   250   -66 20493 20308   -19  4695     -   -56 |
   29 |  -832     2     X   -75    43-20824     -   163  -332     -     X |
   30 | -3149     1   -47   -40   174   518   333   -11 -3316     -  -136 |
   31 |  4825    97  -170   471   -55 29254 29069   -54  4863     -  -334 |
 -----+-------------------------------------------------------------------+
 ALBH |     -   123     -  -259     -     -     -     -     -     -     - |
 AREQ |     -     -     -  -144     -     -     -     -     -     -   106 |
 ARTU |     -     2     -     -    -3     -     -     -     -     -     - |
 AUCK |     -   -75     -   -38     -     -     -    81     -     -   126 |
 BARB |     -   -41     -    86     -     -     -     -     -     -     - |
 BOR1 |     -    34     -   -71     -     -     -     -     -     -     - |
 BRMU |     -  -191     -   357     -     -     -     -     -     -    32 |
 CAS1 |     -     -     -     -   -38     -     -     -     -     -    40 |
 COCO |     -     -     -     -   -64     -     -     -     -     -    68 |
 CRO1 |     -  -107     -   226     -     -     -     -     -     -     - |
 DAV1 |     -     -     -     -    -6     -     -     -     -     -     6 |
 DRAO |     -     5    69     -  -115     -     -     -     -     -    85 |
 FAIR |     -     -   110  -278   -50     -     -  -103     -     -   205 |
 GRAZ |     -   -94     -   198     -     -     -     -     -     -     - |
 GUAM |     -  -109     -   -95     -     -     -    43     -     -   236 |
 IISC |     -     -     -  -549     -     -     -   574     -     -   404 |
 KERG |     -    87     -     -     -     -     -     -     -     -  -136 |
 KIRU |     -    48     -  -102     -     -     -   206     -     -     - |
 KOKB |     -     -     -  -110   107     -     -    33     -     -   -23 |
 KOSG |     -   -48     -   100     -     -     -     -     -     -     - |
 KOUR |     -   -85     -    74     -     -     -   -55     -     -    76 |
 KWJ1 |     -     -     -  -215     8     -     -   -78     -     -   150 |
 LHAS |     -   -14     -    30     -     -     -     -     -     -     - |
 LPGS |     -   108     -  -227     X     -     -     -     -     -     - |
 MALI |     -     -     -  -100    -1     -     -     -     -     -    60 |
 MATE |     -   -56     -     -     -     -     -     -     -     -    88 |
 MCM4 |     -   155     -   -80  -162     -     -     -     -     -    61 |
 MKEA |     -     5   215  -136     -     -     -     -     -     -     - |
 NLIB |     -   -36     -     -     -     -     -     -     -     -    56 |
 NYA1 |     -    20     -     -   -29     -     -     -     -     -     - |
 ONSA |     -   -26     -    -2   -24     -     -     -     -     -    68 |
 PERT |     -    48     -  -102     -     -     -   -92     -     -     - |
 PIE1 |     -  -195     -     9     -     -     -     -     -     -   296 |
 POTS |     -    69     -  -146     -     -     -     -     -     -     - |
 RBAY |     -   125     -     -  -182     -     -     -     -     -     - |
 REYK |     -   -41     -    86     -     -     -     -     -     -     - |
 SANT |     -     -     -    40  -236     -     -    47     -     -   222 |
 STJO |     -  -109   172     -    90     -     -     -     -     -     - |
 THU1 |     -   -10     -     -     -     -     -     -     -     -    15 |
 TRO1 |     -   -80     -     -   118     -     -     -     -     -     - |
 USNO |     -  -112     -   107     -     -     -     -     -     -    95 |
 USUD |     -    68     -  -144     -     -     -     -     -     -     - |
 VILL |     -    24     -   -50     -     -     -     -     -     -     - |
 WHIT |     -   -11     -     -    16     -     -     -     -     -     - |
 WSRT |     -     2     -     -     -     -     -     -     -     -    -3 |
 WTZR |     -   -19   136  -104     -     -     -     -     -     -    47 |
 WUHN |     -  -166     -     -   156     -     -  -284     -     -    92 |
 YAR2 |     -   -34     -   -65     -     -     -     -     -     -   100 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4850    77    33   165    88  4796  4854   128  4988     -    94 |  278   4.53
    2 |  6152   186    77   135   215  4973  4902   104  5161     -    54 |  288   3.60
    3 |  7293    95    75    86   111  2264  2145   116  7353     -    46 |  288   1.94
    4 |  2191    78   138   153    94  5526  5761    68  1845     -    97 |  288   0.84
    5 |  8335    36    63    52    63  8809  9060    62  7476     -    39 |  288   3.18
    6 |  9088   167   102   160    85 10042  9826    78  8928     -   161 |  288   8.69
    7 |  2287   117    73   350   114  9246  9491   143  2093     -   220 |  288   1.17
    8 |  7425    44    65    78    44  3448  3497   103  7149     -    72 |  288   3.21
   10 |  2706    85    52     X   118  3015  2853   109  2738     -    75 |  288   2.41
   11 |  1687    97   143    85    72  1799  1492   120  1570     -   115 |  288   0.40
   13 |  1130    39    88   150   163  1272  1427    75  1009     -    48 |  288   0.27
   14 |   931    82   143   306    94  5397  5609   117   857     -   191 |  288   0.64
   15 |  5285   133    76     -    86     -  3524    67  5952     -    89 |  288   3.23
   17 |  5342   119   249     X   196  2779  2610   195  4724     -   170 |  288   2.52
   19 |  9691    85    71   128    99  5835  5712    69  7824     -     - |  288   4.48
   20 |   956   136   144    63   142  1029  1116    90   924     -    88 |  288   0.25
   21 |  2384   113    78    54   121  4573  4379   100  2554     -   105 |  287   2.13
   22 |  4305    55   106   116   193  2899  3065   144  4213     -   112 |  288   1.47
   23 |  6195   137    57   203    91     -  5624   113  5881     -   174 |  288   5.46
   24 |  1939    77    61     X    62  2447  2343    63  2342     -    50 |  288   1.99
   25 |  5947    64    51   160   127  4655  4478    60  6162     -    60 |  288   3.35
   26 |  1963   131    95   397   206  4997  5232   146  1973     -   158 |  280   0.66
   27 |  8195    96    70   124    83  6407  6265   247  6630     -   189 |  288   3.76
   28 |  1537    81    69   105    50  1377  1186    80  1606     -   110 |  288   0.82
   29 |  2460    63     X   157   153  3590     -   158  1903     -     X |  270   0.86
   30 |  3778    97    77   100    63  1356  1608    91  3496     -    79 |  288   1.38
   31 |  4282   109    53    53    78  5991  5735   108  4443     -    84 |  288   2.82
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    62     -   131     -     -     -     -     -     -     - |  288   0.11
 AREQ |     -     -     -   132     -     -     -     -     -     -    97 |  288 626.06
 ARTU |     -    18     -     -    26     -     -     -     -     -     - |  119  10.65
 AUCK |     -   104     -   101     -     -     -   629     -     -   101 |  288  20.34
 BARB |     -   112     -   237     -     -     -     -     -     -     - |  280  23.13
 BOR1 |     -    45     -    94     -     -     -     -     -     -     - |  287   2.28
 BRMU |     -    40     -   115     -     -     -     -     -     -    47 |  288  15.45
 CAS1 |     -     -     -     -    30     -     -     -     -     -    32 |  286  10.80
 COCO |     -     -     -     -    42     -     -     -     -     -    45 |  288  15.06
 CRO1 |     -    43     -    90     -     -     -     -     -     -     - |  283   0.13
 DAV1 |     -     -     -     -    46     -     -     -     -     -    49 |  286  14.80
 DRAO |     -    46    80     -    28     -     -     -     -     -    73 |  288   0.09
 FAIR |     -     -   180   136   225     -     -   213     -     -   208 |  288   0.20
 GRAZ |     -   103     -   218     -     -     -     -     -     -     - |  278  51.59
 GUAM |     -    59     -   124     -     -     -    97     -     -   111 |  288  30.60
 IISC |     -     -     -   345     -     -     -   328     -     -   254 |  232  51.89
 KERG |     -    22     -     -     -     -     -     -     -     -    33 |  280    >>>
 KIRU |     -    43     -    91     -     -     -    61     -     -     - |  287   3.01
 KOKB |     -     -     -   112   104     -     -   216     -     -   145 |  282   0.80
 KOSG |     -    26     -    55     -     -     -     -     -     -     - |  288 101.07
 KOUR |     -    33     -   126     -     -     -   102     -     -    88 |  288   4.97
 KWJ1 |     -     -     -   236   185     -     -   199     -     -   177 |  266  90.48
 LHAS |     -    72     -   153     -     -     -     -     -     -     - |  287  15.28
 LPGS |     -    83     -   174     X     -     -     -     -     -     - |  113  20.83
 MALI |     -     -     -   477   155     -     -     -     -     -   188 |  214  17.42
 MATE |     -    85     -     -     -     -     -     -     -     -   132 |  264   0.19
 MCM4 |     -    86     -   219   167     -     -     -     -     -   129 |  288  13.02
 MKEA |     -    46    85    88     -     -     -     -     -     -     - |  281  39.56
 NLIB |     -    50     -     -     -     -     -     -     -     -    77 |  280   0.05
 NYA1 |     -    38     -     -    55     -     -     -     -     -     - |  288   0.10
 ONSA |     -    39     -    82    20     -     -     -     -     -    30 |  288   0.27
 PERT |     -    56     -   118     -     -     -   145     -     -     - |  278   3.04
 PIE1 |     -    60     -    74     -     -     -     -     -     -    68 |  288   0.05
 POTS |     -    31     -    65     -     -     -     -     -     -     - |  288  15.90
 RBAY |     -    81     -     -   118     -     -     -     -     -     - |  234  48.53
 REYK |     -    24     -    51     -     -     -     -     -     -     - |  288   7.83
 SANT |     -     -     -   203   138     -     -   485     -     -   258 |  282   7.43
 STJO |     -    37    50     -    50     -     -     -     -     -     - |  288   3.04
 THU1 |     -    73     -     -     -     -     -     -     -     -   113 |  283  15.90
 TRO1 |     -    34     -     -    50     -     -     -     -     -     - |  265   9.70
 USNO |     -    41     -    30     -     -     -     -     -     -    55 |  288   0.04
 USUD |     -    35     -    73     -     -     -     -     -     -     - |  288   3.87
 VILL |     -    33     -    69     -     -     -     -     -     -     - |  288   4.24
 WHIT |     -    38     -     -    55     -     -     -     -     -     - |  288  15.51
 WSRT |     -    26     -     -     -     -     -     -     -     -    40 |  288   0.05
 WTZR |     -    58   107    80     -     -     -     -     -     -    41 |  288   0.16
 WUHN |     -    58     -     -    95     -     -    79     -     -    74 |  287  25.22
 YAR2 |     -   126     -   151     -     -     -     -     -     -   122 |  269 333.55
 -----+-------------------------------------------------------------------+--------------
 TOT  |  5105    79   100   159   115  4960  4984   177  4773     -   119 |


 BEST CLOCK FIT: USNO   288   0.04 (ns) 

