
 GPS week: 1095   Day: 3   MJD: 51912                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2675      0    -0.06    -0.09     4.31     0.00
 cod |   288     0  11315      3     2.31    -1.91     0.12    17.77
 esa |   288     0  15045    353  2437.65    11.04     0.12    18.60
 gfz |   288     0  12971     11    -0.22    -0.03     0.08    27.60
 igp |    96     0   2579      0    -0.03    -0.13     5.33     0.00
 igu |    96     0   2388      0    -0.08    -0.05     3.89     0.00
 jpl |   288     3   7285    301   -11.59    25.95     0.10     0.00
 ngs |    96     0   2675      0    -0.07    -0.09     4.24     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14805    269   451.79   -36.49     0.06    36.03

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -2677   288  -123   140 -5769 -2006   458 -3409     -  -131 |
    2 |   442   129    65    74 13726-16143   135   108     -  -131 |
    3 |  -126  -186   156   131 -6796  4767    80   248     -  -122 |
    4 | -3785    67   134   -26 -9001 -8228  -214 -4013     -   -69 |
    5 |   453    41   224   -47 24366  3166  -181   292     -   -92 |
    6 |  1308    14   139   -17 10579     -  -147  1206     -   -62 |
    7 | -1195   142     X    82-33053 -4019    32 -1566     -  -106 |
    8 | -5200   227  -242   200-55297 -7188   112 -4249     -   -96 |
    9 |   383   -82   179    63  9912  5243  -235   297     -  -115 |
   10 |  -600   371  -427   157  4958 -3248   243  -913     -    -8 |
   11 |  8287   -36   181  -152 22195 -4588   150  8093     -    35 |
   13 |  1972   288  -129  -159 -1737 -1490   -42  2118     -    97 |
   14 |  -155   -47  -117   -29 -3262  1020   -81  -251     -    95 |
   15 | -8962   200     -    11-21593     -   183 -8383     -   -66 |
   17 | -1677   212   -55    81  7540     -  -226 -1930     -   -98 |
   19 | -6261   -49   -11    27  9534 -2905    -8 -5877     -     - |
   20 |  7067  -166   144   -77 10744   302   301  6850     -    33 |
   21 | -7031   186  -566   257  6606-12704   107 -6247     -    36 |
   22 |  2579   -92   229    -1-21264  4005   359  2039     -   -91 |
   23 | -6514   106   113  -103     - -1588   -85 -5670     -   -11 |
   24 |  6740   -22    67    -5 26529  8462  -421  5631     -   -24 |
   25 |  2897    95  -241   182 14031  9609   244  2937     -   -42 |
   26 | -3617   109   199     3-17331  4446  -289 -3150     -  -109 |
   27 |  4690    93   182   182-27778 15641    95  4541     -  -262 |
   28 | -2756  -114   743  -254 19446 -5668  -181 -1467     -  -155 |
   29 | -1467   137   -42   -12-19305  2471   114 -1405     -   -11 |
   30 |  4411   199   -91   181  9343   117   -64  3874     -  -152 |
   31 | 10336   -70   391    12 30950 10688   149  9826     -  -189 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -146   140     -     -     -     -     -     -     - |
 AREQ |     -     -   -48     -     -     -     -     -     -    25 |
 AUCK |     -     -  -378     -     -     - -1127     -     -   195 |
 BAHR |     -     -  -129   -70     -     -    79     -     -   120 |
 BOR1 |     -  -258   247     -     -     -     -     -     -     - |
 BRMU |     -     -    35     -     -     -     -     -     -   -18 |
 CAS1 |     -     -     -   -59     -     -     -     -     -    45 |
 COCO |     -     -     -  -116     -     -     -     -     -    89 |
 DAV1 |     -     -     -  -135     -     -     -     -     -   104 |
 DRAO |     -     -     -  -184     -     -     -     -     -   141 |
 FAIR |     -     -  -167   -14     -     -  -106     -     -    96 |
 GRAZ |     -  -234   224     -     -     -     -     -     -     - |
 GUAM |     -     -    39     -     -     -   -86     -     -   -20 |
 KOKB |     -     -   -82    55     -     -    22     -     -     X |
 KOSG |     -     9    -8     -     -     -     -     -     -     - |
 KWJ1 |     -     -  -191   123     -     -   -93     -     -    13 |
 LHAS |     -   100   -96     -     -     -     -     -     -     - |
 MALI |     -     -  -277     -     -     -   329     -     -   143 |
 MCM4 |     -     -  -575   185     -     -     -     -     -   154 |
 NLIB |     -  -148     -     -     -     -     -     -     -    73 |
 NRC2 |     -  -589   563     -     -     -     -     -     -     - |
 NYA1 |     -   -27     -    17     -     -     -     -     -     - |
 PIE1 |     -  -317    93     -     -     -     -     -     -   107 |
 POTS |     -   129  -124     -     -     -     -     -     -     - |
 REYK |     -    42   -40     -     -     -     -     -     -     - |
 SANT |     -     -   -86  -215     -     -  -161     -     -   248 |
 STJO |     -   -76     -    49     -     -   -86     -     -     - |
 THU1 |     -   -58     -     -     -     -  -148     -     -    29 |
 TRO1 |     -    61     -   -39     -     -     -     -     -     - |
 TROM |     -     -     4     -     -     -     -     -     -    -2 |
 TSKB |     -    37  -132     -     -     -     -     -     -    50 |
 URUM |     -   207     -   -83     -     -     -     -     -   -37 |
 USNO |     -  -182   -22     -     -     -     -     -     -   101 |
 USUD |     -    55   -74    14     -     -   -35     -     -     - |
 WSRT |     -     8     -     -     -     -     -     -     -    -4 |
 WTZR |     -   -16  -136     -     -     -     -     -     -    78 |
 WUHN |     -   -23     -  -194     -     -  -146     -     -   159 |
 YAR2 |     -     -  -169     -     -     -     -     -     -    87 |
 YELL |     -   -45   191  -103     -     -   -46     -     -     - |
 YSSK |     -   149     -   -96     -     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  8705   137   214   127  4368  4628   152  9143     -    52 |  278   3.93
    2 |  3892   118    78   140  2040  6797    36  3745     -    60 |  288   2.33
    3 |  4491   102    51    44  3374  3081   103  4658     -    49 |  288   2.62
    4 |  2645   216   264    80  4158  3065    75  2477     -    70 |  288   1.12
    5 |  4362    85    99    54  7781  4346    40  4360     -    41 |  288   3.49
    6 |  6164    44    98    48  6819     -    52  6116     -    81 |  288   6.41
    7 |  2359    68     X    75  9741  1846    57  2085     -    55 |  288   0.92
    8 |  4557   195    80    88 12334  3012   123  4845     -    72 |  288   1.68
    9 |  2047    55   139    44  1317  2764    96  2102     -    42 |  288   1.23
   10 |  3166    82   113    74  4798  2703    41  3163     -    29 |  288   2.46
   11 |  1129   163    56   102  3286  2578   111  1055     -    49 |  288   0.49
   13 |   808   233    42    52   699   828   255   718     -    68 |  288   0.25
   14 |   826   203    53    46  2189   438    54   916     -    92 |  288   0.59
   15 |  4677    79     -    47  6217     -    49  4941     -    34 |  287   2.77
   17 |  5748    57   121    80  4666     -   152  5722     -    43 |  288   5.21
   19 |  3330   364   207   147  3788  3437    90  3470     -     - |  287   2.77
   20 |  1250   105    74   113  1451  1096    50  1360     -    33 |  288   0.22
   21 |  4407   103    85    38  4024  7797    60  3992     -    36 |  288   3.29
   22 |  2125    61    86    27  3185  2294   116  2336     -    42 |  288   0.42
   23 |  8322   126   250    63     -  4906   151  7861     -    74 |  288   6.46
   24 |  3941   227   303    69  7928  4129   215  3151     -    71 |  288   2.11
   25 |  5458   112    69    78  8332  6473    78  5268     -    41 |  288   2.71
   26 |  3408   229   324    81  2624  3588   100  2985     -   127 |  278   0.61
   27 |  3137   316    74    44  2544  5404    58  3108     -    94 |  288   3.09
   28 |  8131   109    50    69  1858  1433    86  7719     -    88 |  288   0.77
   29 |  1412   177   181    51  3669  1376    68  1184     -    72 |  280   1.23
   30 |  2068   126   106    49  3609   995    73  1927     -    50 |  288   1.15
   31 |  2977    62   170    63  6842  5738   115  3088     -    45 |  288   3.06
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    44    43     -     -     -     -     -     -     - |  287   0.11
 AREQ |     -     -    48     -     -     -     -     -     -    25 |  288  26.43
 AUCK |     -     -    83     -     -     -    57     -     -    43 |  288  20.73
 BAHR |     -     -    64    96     -     -    60     -     -    83 |  288   0.58
 BOR1 |     -    65    62     -     -     -     -     -     -     - |  220   3.88
 BRMU |     -     -    47     -     -     -     -     -     -    24 |  288  14.73
 CAS1 |     -     -     -    22     -     -     -     -     -    17 |  288  11.83
 COCO |     -     -     -    34     -     -     -     -     -    26 |  288  14.50
 DAV1 |     -     -     -    30     -     -     -     -     -    23 |  288  12.92
 DRAO |     -     -     -    48     -     -     -     -     -    37 |  288   0.06
 FAIR |     -     -    62   182     -     -   112     -     -   126 |  280   0.15
 GRAZ |     -    31    29     -     -     -     -     -     -     - |  281 101.22
 GUAM |     -     -    84     -     -     -    52     -     -    43 |  288  29.81
 KOKB |     -     -   144    97     -     -   149     -     -     X |  220   0.31
 KOSG |     -   100    96     -     -     -     -     -     -     - |  288  81.72
 KWJ1 |     -     -   182   137     -     -   139     -     -   105 |  241 100.89
 LHAS |     -    33    32     -     -     -     -     -     -     - |  287  15.52
 MALI |     -     -    73     -     -     -    40     -     -    38 |  232  17.99
 MCM4 |     -     -    85   252     -     -     -     -     -   223 |  274  20.48
 NLIB |     -    73     -     -     -     -     -     -     -    36 |  276   0.10
 NRC2 |     -    35    34     -     -     -     -     -     -     - |  287   0.08
 NYA1 |     -    79     -    51     -     -     -     -     -     - |  287   0.07
 PIE1 |     -    85    23     -     -     -     -     -     -    44 |  288   0.12
 POTS |     -    48    46     -     -     -     -     -     -     - |  276  18.06
 REYK |     -    82    79     -     -     -     -     -     -     - |  287   8.09
 SANT |     -     -    88    41     -     -    50     -     -    43 |  272   6.29
 STJO |     -    89     -    58     -     -    41     -     -     - |  287   3.14
 THU1 |     -    60     -     -     -     -    72     -     -    30 |  205  14.13
 TRO1 |     -    40     -    26     -     -     -     -     -     - |  288  11.07
 TROM |     -     -    38     -     -     -     -     -     -    20 |  288  13.24
 TSKB |     -    54    66     -     -     -     -     -     -    24 |  288   2.25
 URUM |     -   109     -    46     -     -     -     -     -    25 |  288  28.93
 USNO |     -    63    64     -     -     -     -     -     -    18 |  288   0.05
 USUD |     -    86    67    66     -     -    69     -     -     - |  288   0.27
 WSRT |     -    44     -     -     -     -     -     -     -    22 |  287   0.06
 WTZR |     -   121    86     -     -     -     -     -     -    22 |  288   0.04
 WUHN |     -    30     -    29     -     -    51     -     -    24 |  287  31.62
 YAR2 |     -     -   117     -     -     -     -     -     -    61 |  175 309.93
 YELL |     -    78    60    76     -     -    54     -     -     - |  288   0.07
 YSSK |     -    84     -    54     -     -     -     -     -     - |  279  17.71
 -----+-------------------------------------------------------------+--------------
 TOT  |  4310   119   119    84  5327  3892    96  4243     -    64 |


 BEST CLOCK FIT: WTZR   288   0.04 (ns) 

