
 GPS week: 1095   Day: 1   MJD: 51910                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2657      0    -0.16     0.28     4.65     0.00
 cod |   287     0  14889     51     3.91    -3.74     0.08    30.08
 emr |    96     0   1066      6   341.84    12.45     0.15    12.84
 esa |   288     0  14697    813   -94.99    -0.04     0.14    16.46
 gfz |   287     0  12471      2     0.01     0.48     0.12    19.12
 igp |    96     0   2467      0    -0.24     0.44     5.42     0.00
 igu |    96     0   2183      0    -0.07     0.19     4.24     0.00
 ngs |    96     0   2657      0    -0.14     0.25     4.27     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |    96     1   2653      0    -0.18     0.28     0.11    21.51

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  3663   247   165  -565   211 15288  3122  3518     -   -75 |
    2 |  5372   293  -167  -744   150-16414  7367  4794     -    11 |
    3 | -4547   -62  -121   151   -36 -7027 -2404 -4011     -     1 |
    4 |  -689    17   187  -165   161-12464 -2902  -934     -  -147 |
    5 |  4793   -85   -98   201   -79 22695  1018  3966     -    66 |
    6 | -1439   -77  -242   486  -226 15233     - -1229     -   -97 |
    7 | -3255    52  -303  -195   137-30087 -1779 -3054     -  -106 |
    8 |-10789   177  -280  -145    -5-39191 -7622 -9848     -  -176 |
    9 |  -571   -96    41   185   -11 -8382  -735 -1018     -   -70 |
   10 |  5071   107   287     X  -123  5241  5230  3957     -  -127 |
   11 |  8588    23   -56    96  -124 26895 -4352  8582     -    42 |
   13 |  2787   -44     0   151   -27  3013  -130  2860     -  -134 |
   14 |  1886  -185   161   519  -264 -3773  -705  1884     -   166 |
   15 | -7746   -85   356     -    47     -     - -7372     -   129 |
   17 |   898   213   260  -529   107 15188     -  2014     -   122 |
   19 | -3265    31  -327     X    96  5477 14157 -3171     -  -271 |
   20 |  8069   107  -212  -336   103 12945  7499  7995     -   168 |
   21 | -2037   104   243  -314    50  8395 -5373 -2124     -   165 |
   22 | -3133   -38  -273   -96    37  2138-12192 -3187     -   291 |
   23 | -3190   -32    58   -92    18     -     - -3188     -   274 |
   24 | -1227   -27  -190   182   -76 -9198 -3454 -1335     -   -62 |
   25 | -4712  -129  -252    66   146-10020 -1744 -4183     -     1 |
   26 |  -101  -105   125     X   158 -4537  -766  -371     -   -18 |
   27 | -4032    -2  -466   354  -154 11785     - -3552     -  -322 |
   28 | 13832  -131   332   121    15-11777 14170 13247     -   115 |
   29 | -1661  -161  -128   612  -237-10844 -3430 -1810     -   -10 |
   30 |  4021   -78     -  -138   196 13038  5167  3123     -    75 |
   31 | -6818   149    25  -267    22  6311-10095 -5777     -   -11 |
 -----+-------------------------------------------------------------+
 ALBH |     -    15     -   -27     -     -     -     -     -     - |
 ALGO |     -   -41   129   135   -80     -     -     -     -     - |
 AREQ |     -   -69     -    93    25     -     -     -     -     - |
 AUCK |     -   -74     -   135     -     -     -     -     -     - |
 BOR1 |     -    48     -   -88     -     -     -     -     -     - |
 BRMU |     -   -87     -   158     -     -     -     -     -     - |
 CRO1 |     -   -83     -   151     -     -     -     -     -     - |
 DRAO |     -    66    78     -  -122     -     -     -     -     - |
 GRAZ |     -   400     -  -730     -     -     -     -     -     - |
 GUAM |     -  -124     -   227     -     -     -     -     -     - |
 IISC |     -     -     -    80   -69     -     -     -     -     - |
 KIRU |     -    97     -  -178     -     -     -     -     -     - |
 KOKB |     -     -     -     3    -3     -     -     -     -     - |
 KWJ1 |     -     -     -    15   -13     -     -     -     -     - |
 LHAS |     -    57     -   -75   -25     -     -     -     -     - |
 MCM4 |     -   -64     -   -53   146     -     -     -     -     - |
 METS |     -     6     -     -   -10     -     -     -     -     - |
 MKEA |     -   -82     -   149     -     -     -     -     -     - |
 NLIB |     -   -88     -   160     -     -     -     -     -     - |
 ONSA |     -   -16     -     -    26     -     -     -     -     - |
 PIE1 |     -   -31     -    56     -     -     -     -     -     - |
 RBAY |     -    27     -     -   -42     -     -     -     -     - |
 SANT |     -   170     -    34  -223     -     -     -     -     - |
 STJO |     -   -83   -39    13   127     -     -     -     -     - |
 USNO |     -   -88     -   161     -     -     -     -     -     - |
 USUD |     -    -8     -    -6    17     -     -     -     -     - |
 VILL |     -    84     -  -153     -     -     -     -     -     - |
 WES2 |     -   -52     -    94     -     -     -     -     -     - |
 WHIT |     -     8     -     -   -13     -     -     -     -     - |
 WSRT |     -    46     -     -   -73     -     -     -     -     - |
 YAR2 |     -    59     -  -107     -     -     -     -     -     - |
 YELL |     -   -91   137   106    21     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3872    67    96    87    61  3606  2495  3737     -   153 |  287   3.35
    2 |  7034    91   199    83   117  8166 10832  6222     -   116 |  280   3.14
    3 |  4385    62   166    87    55  2335  2035  4274     -    60 |  286   2.37
    4 |  2158   112   161   242   218  4319  1403  1900     -    85 |  288   0.80
    5 |  2501    72   106    78    85  5700  2354  2531     -    46 |  288   1.49
    6 |  7916    65    87   279   238  8054     -  8110     -   112 |  282   8.14
    7 |  1509    94   136   351   210 11262  1908  2084     -   148 |  279   1.38
    8 |  3836    68   138   163   100 11647  3401  3192     -    63 |  287   1.47
    9 |  3148    80   297   224   109  2690  3247  2801     -    95 |  287   2.50
   10 |  7089    94    90     X    93  2945  2101  6060     -   145 |  254   2.62
   11 |  1410   101   170   158    73  5041  2068  1335     -    57 |  284   0.43
   13 |  1604    72    89    80    70  1674  1600  1687     -    73 |  287   0.97
   14 |   980    67   124   202   192  1905  1060   778     -    69 |  287   0.45
   15 |  3255    94    54     -   118     -     -  3617     -    76 |  238   4.13
   17 | 11019    70   220   174   108  9437     -  7347     -   147 |  276   5.02
   19 |  3729   104   101     X   127  3956  4433  3930     -   109 |  249   3.82
   20 |  1128   108   175   147    72  2397  2427  1111     -    80 |  285   0.21
   21 |  5409    94   103    67    86  6456  3661  5085     -   101 |  287   2.98
   22 |  2802    76   228    61   134  4431  7342  2769     -   130 |  277   0.93
   23 |  5282   120    93   162   120     -     -  5256     -   227 |  284   5.40
   24 |  2560   161    87   321    56  2106  2277  2838     -    77 |  271   2.26
   25 |  5345    88   288   108   147  2828  3386  5346     -    90 |  287   2.79
   26 |  1701   162   188     X   193  2177  1608  1739     -   163 |  258   1.14
   27 |  6943   156   157   128   194  4922     -  7089     -    90 |  287   4.26
   28 |  2688    46   187    56    62  2723  9246  2811     -    72 |  286   1.14
   29 |  1045    78   310   308   152  3537  1758   943     -   178 |  276   0.51
   30 |  5245   130     -    92   119  2674  1612  5037     -    93 |  287   1.42
   31 |  6270    93   227    85    84  4619  6441  5893     -    97 |  280   4.14
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    45     -    83     -     -     -     -     -     - |  287   0.12
 ALGO |     -    35    92    24    60     -     -     -     -     - |  287   0.03
 AREQ |     -    43     -    52    89     -     -     -     -     - |  287  14.36
 AUCK |     -    30     -    55     -     -     -     -     -     - |  285  16.33
 BOR1 |     -    27     -    50     -     -     -     -     -     - |  287   1.48
 BRMU |     -    56     -   103     -     -     -     -     -     - |  287  15.46
 CRO1 |     -    35     -    64     -     -     -     -     -     - |  280   0.14
 DRAO |     -    44    42     -    71     -     -     -     -     - |  287   0.08
 GRAZ |     -    40     -    73     -     -     -     -     -     - |  276  22.59
 GUAM |     -    29     -    52     -     -     -     -     -     - |  286  28.72
 IISC |     -     -     -   187   161     -     -     -     -     - |  254  29.03
 KIRU |     -    50     -    91     -     -     -     -     -     - |  260   1.72
 KOKB |     -     -     -   204   176     -     -     -     -     - |  282   0.53
 KWJ1 |     -     -     -   159   137     -     -     -     -     - |  196  92.18
 LHAS |     -    69     -    42    86     -     -     -     -     - |  287  15.34
 MCM4 |     -    80     -    64   115     -     -     -     -     - |  287  47.68
 METS |     -    23     -     -    36     -     -     -     -     - |  286   0.11
 MKEA |     -    27     -    50     -     -     -     -     -     - |  286  43.44
 NLIB |     -    45     -    83     -     -     -     -     -     - |  284   0.06
 ONSA |     -    27     -     -    42     -     -     -     -     - |  287   0.33
 PIE1 |     -    38     -    69     -     -     -     -     -     - |  287   0.27
 RBAY |     -    92     -     -   145     -     -     -     -     - |  258  31.46
 SANT |     -   143     -   160   138     -     -     -     -     - |  287   4.25
 STJO |     -    52   148    87    50     -     -     -     -     - |  287   1.82
 USNO |     -    42     -    77     -     -     -     -     -     - |  287   0.04
 USUD |     -    51     -    59    49     -     -     -     -     - |  287   0.49
 VILL |     -    29     -    52     -     -     -     -     -     - |  285   4.55
 WES2 |     -    19     -    34     -     -     -     -     -     - |  287   0.11
 WHIT |     -    27     -     -    42     -     -     -     -     - |  287   7.33
 WSRT |     -    27     -     -    42     -     -     -     -     - |  286   0.04
 YAR2 |     -    55     -   100     -     -     -     -     -     - |  242 479.58
 YELL |     -    25    75    52    20     -     -     -     -     - |  287   0.04
 -----+-------------------------------------------------------------+--------------
 TOT  |  4654    76   151   139   119  5424  4243  4265     -   112 |


 BEST CLOCK FIT: ALGO   287   0.03 (ns) 

