
 cls-file Version 2.0
 GPS week: 1043   Day: 6   MJD: 51551                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2519      0    4117    5513  74585  74585      0  75988  75988      0    0.00
 em1 |   288     0  18102    100 2127965    4643     41     56     26    215    285    146   33.13
 es1 |   288     0  19510    169   -2098    3866    144    161    133   2837   2847   2831    0.00
 gf1 |   288     0  18895    763     851   13111     40     56     26    402    579    227   33.15
 igf |    96     0   2519      1    4354    5366    128    128      0    720    720      0    0.00
 jp1 |   288     0  14978      7    6861   -9800     59     50     67    332    398    247    0.00
 mi1 |   288     0  17037    566    1226   12869     42     59     21    299    418    161   33.72
 ng1 |    96     0   2519      0    2848    6842  76815  76815      0  78575  78575      0    0.00
 pd1 |    96     0   2519      0    4143    5478  74524  74524      0  75923  75923      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00
 ul1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   jp1   mi1   ng1   pd1   si1   ul1 |
 -----+-------------------------------------------------------------------+
    1 | -1110   -54  -168    38   700   -49    13 11537  -555     -     - |
    2 |   377  -202  -667   711  -503  -604  -501  -825  -226     -     - |
    3 | -2044    59    77  -216  -615    20   134 11446 -1542     -     - |
    4 |   741   -68   608  -428  -138   630   487 -3760   536     -     - |
    5 |  -743    47  -313   451   160  -362  -498    10  -918     -     - |
    6 |  -402  -183   -10   339 -1093  -107  -156  7581  -535     -     - |
    7 |   172  -349 -1140   349   465  -583     X -8016  -484     -     - |
    8 |  1475   468    54  -733   569   302   261  3330   993     -     - |
    9 |  -211   237   363  -542   346   375   300 -3326    21     -     - |
   10 | -1865   -42 -1339   890   369  -615  -844  2149 -1787     -     - |
   11 |  1321   108   216     -  1527    25  -106 17902  1835     -     - |
   13 |  1318   -86   877  -814    -4   507   885  -606   855     -     - |
   14 |  1612   485   477 -1072  -682   573   574 -5778  1299     -     - |
   15 |   287  -368  -873  1198   196  -769  -816 -5666   298     -     - |
   16 |  2876   129  -876     X   137  -491  -127 -8746  2835     -     - |
   18 |  -634    39    82  -408  -198    48   363  4995  -249     -     - |
   19 | -1466  -209  -164    62 -1474   -82   144  2152 -1596     -     - |
   21 |  1021    37  -189   269   162  -125  -301  1852   764     -     - |
   22 |  1892   474  -287  -284  1390  -406  -186  5065  2004     -     - |
   23 |  1684   460   -42  -460    19  -168     -  7994  1481     -     - |
   24 |  -960  -241   -63   410  -570  -120  -166-14315  -108     -     - |
   25 |   469    94   437  -426   378   324   327 -4578   450     -     - |
   26 | -1274  -412   134   533  -533    86  -128 -9904  -964     -     - |
   27 |   154    62    69  -415  -148    73   347  4435  -514     -     - |
   29 |  1384     2   355  -140   -32   281   135 -1331  1335     -     - |
   30 | -1647  -580   166   443 -1218   221   134 -6389 -1668     -     - |
   31 | -2394  -327  -684   836   933  -749  -525 -7327 -1554     -     - |
 -----+-------------------------------------------------------------------+
 ALBH |     -   -42   185   269     -     -  -224     -     -     -     - |
 ALGO |     -    46    94    22     -   221   -67     -     -     -     - |
 AREQ |     -   -92     -  -414     -     -   482     -     -     -     - |
 BAHR |     -   -39   -61    26     -   -42    13     -     -     -     - |
 BJFS |     -     -   183    15     -   227   -15     -     -     -     - |
 CHUR |     -   119   268  -119     -   162     -     -     -     -     - |
 DAEJ |     -   631   799  -957     -   574   304     -     -     -     - |
 DRAO |     -   -23   -67    33     -    47   -10     -     -     -     - |
 FAIR |     -     -  -248   188     -     -  -185     -     -     -     - |
 GODE |     -    46   312     X     -     -   -46     -     -     -     - |
 GRAZ |     -    -1  -310  -146     -     -   144     -     -     -     - |
 HOB2 |     -   203  -693  -203     -     -     -     -     -     -     - |
 HRAO |     -     -  -279   -64     -  -503    63     -     -     -     - |
 IRKT |     -   -29    -2    60     -    77   -30     -     -     -     - |
 JPLM |     -    30  -164    51     -     -   -80     -     -     -     - |
 KERG |     -  -137   528   137     -   118     -     -     -     -     - |
 KIRU |     -    38   168   -38     -     -     -     -     -     -     - |
 LPGS |     -  -166    75   166     -   -78     -     -     -     -     - |
 MALI |     -     -  -286   -59     -  -490    58     -     -     -     - |
 MAS1 |     -   -11   155   114     -    81  -101     -     -     -     - |
 MATE |     -   -28   209     X     -     -    27     -     -     -     - |
 MCM4 |     -  -160  -521   160     -  -369     -     -     -     -     - |
 MDO1 |     -    99  -193   118     -   107  -213     -     -     -     - |
 MEDI |     -     3   -97     -     -     -    -3     -     -     -     - |
 METS |     -     8   -94  -103     -   239    94     -     -     -     - |
 NLIB |     -  -118  -162   118     -  -121     X     -     -     -     - |
 NRC1 |     -     -   209    49     -     -   -48     -     -     -     - |
 NYA1 |     -     -   341  -387     -   370   380     -     -     -     - |
 NYAL |     -   109   191  -302     -     -   189     -     -     -     - |
 ONSA |     -   -58    55   -95     -    81   150     -     -     -     - |
 PERT |     -     3  -302   142     -   -67  -142     -     -     -     - |
 PIE1 |     -    36  -175    42     -    29   -76     -     -     -     - |
 PRDS |     -  -107     -   107     -     -     -     -     -     -     - |
 SCH2 |     -   213   209  -255     -   312    41     -     -     -     - |
 SFER |     -     -    72   172     -   -45  -169     -     -     -     - |
 STJO |     -     6   201   115     -   146  -119     -     -     -     - |
 STR1 |     -   105   -78     -     -     -  -103     -     -     -     - |
 USNO |     -    49   102     -     -    90   -48     -     -     -     - |
 USUD |     -   113  -279  -113     -    11     -     -     -     -     - |
 VILL |     -   -35    -2    55     -     -   -20     -     -     -     - |
 WES2 |     -  -168  -154   317     -     -  -146     -     -     -     - |
 WSRT |     -  -103   114   103     -     -     -     -     -     -     - |
 WUHN |     -  -150  -298   150     -     -     -     -     -     -     - |
 YELL |     -    66   183    19     -   133   -83     -     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   jp1   mi1   ng1   pd1   si1   ul1 | NEPO    RMS
 -----+-------------------------------------------------------------------+-------------
    1 | 77018    77    56    82   116    38    55 79939 76773     -     - |  288  80793
    2 | 70849    28    42    38    54    30    37 75120 70762     -     - |  288  79678
    3 | 77241    67   172   118    97    75    94 81705 77100     -     - |  282  85159
    4 | 69674    34    56    49   114    52    43 71878 69657     -     - |  288  81788
    5 | 74829    64    45    26    55    37    53 77248 74861     -     - |  288  78186
    6 | 72820    67   229    43   174    48    64 75269 72797     -     - |  279  77216
    7 | 71149    79   280    79   202   103     X 72810 71032     -     - |  268  81763
    8 | 84336    30    39    34    57    15    32 86168 84292     -     - |  288  74930
    9 | 66879    27    42    28    50    22    42 68658 66836     -     - |  288  75703
   10 | 79155    43   528    61   162    39    78 79954 79129     -     - |  241  78558
   11 | 75002    50    53     -   179    65    49 78125 74992     -     - |  288  85416
   13 | 81897    45    43    41   140    38    54 84244 81817     -     - |  288  83409
   14 | 82123    75    78    56   148    63    99 82633 81987     -     - |  288  78831
   15 | 14663    38    61    56   102    58    39 15555 14646     -     - |  288   2437
   16 | 78787    81   553     X   264    95    80 81203 78406     -     - |  184  79698
   18 | 75179    55    47    73   115    29    80 75919 75130     -     - |  288  80281
   19 | 84360    35    67    24   106    43    27 88452 84384     -     - |  288  84909
   21 | 80602    67    61    92   115    37    62 80978 80565     -     - |  288  87714
   22 | 73485    35    57    33   144    35    31 74023 73519     -     - |  288  74032
   23 | 71450   101   158   101   169    76     - 75260 71403     -     - |  273  81005
   24 | 76657    40    62    40   138    34    59 80804 76601     -     - |  288  81314
   25 | 80291    35    50    21    91    23    44 81240 80306     -     - |  288  78457
   26 | 78489    63    56    37   122    42    53 80594 78428     -     - |  288  79648
   27 | 85633    29    52    32    85    30    29 88691 85681     -     - |  288  81250
   29 | 72507    67    66    38   138    36    95 73546 72492     -     - |  288  80621
   30 | 70149    40    48    29    49    29    23 71479 70153     -     - |  288  71431
   31 | 72177    78   206    39   139    72    83 75983 71858     -     - |  276  83687
 -----+-------------------------------------------------------------------+-------------
 ALBH |     -    20    43    18     -     -    21     -     -     -     - |  288  12691
 ALGO |     -     8    36    20     -    14    24     -     -     -     - |  288     29
 AREQ |     -    40     -    25     -     -    58     -     -     -     - |  288  17163
 BAHR |     -    24    32    11     -    26    25     -     -     -     - |  288    567
 BJFS |     -     -    33    14     -    15    14     -     -     -     - |  288    802
 CHUR |     -    10    34    10     -    19     -     -     -     -     - |  288   2827
 DAEJ |     -    13    26    17     -    18    14     -     -     -     - |  287   3145
 DRAO |     -    14    34    13     -    22    13     -     -     -     - |  288     22
 FAIR |     -     -   175    10     -     -     9     -     -     -     - |  278     27
 GODE |     -    12   479     X     -     -    12     -     -     -     - |  288     69
 GRAZ |     -     8    39    15     -     -    15     -     -     -     - |  288    707
 HOB2 |     -    20   671    20     -     -     -     -     -     -     - |  230  68361
 HRAO |     -     -   279    44     -   190    43     -     -     -     - |  260    189
 IRKT |     -    18    32    22     -    18    15     -     -     -     - |  288    102
 JPLM |     -    17    33    13     -     -    13     -     -     -     - |  288  31489
 KERG |     -    17    44    17     -    22     -     -     -     -     - |  287    >>>
 KIRU |     -    38    54    38     -     -     -     -     -     -     - |  288   2240
 LPGS |     -    33    57    33     -    39     -     -     -     -     - |  280 125142
 MALI |     -     -    61    26     -    31    25     -     -     -     - |  288  27553
 MAS1 |     -    13    43    16     -    22    15     -     -     -     - |  288   2475
 MATE |     -     9    32     X     -     -     8     -     -     -     - |  287     72
 MCM4 |     -   110    98   110     -   180     -     -     -     -     - |  270 216663
 MDO1 |     -     9    36    11     -    20     8     -     -     -     - |  288  26889
 MEDI |     -    24    33     -     -     -    24     -     -     -     - |  287     91
 METS |     -     8    36    13     -    19    14     -     -     -     - |  288     30
 NLIB |     -    18    39    18     -    32     X     -     -     -     - |  288    116
 NRC1 |     -     -    38    15     -     -    14     -     -     -     - |  288     36
 NYA1 |     -     -    37     8     -    16     8     -     -     -     - |  288     37
 NYAL |     -    12    38    10     -     -    10     -     -     -     - |  288     37
 ONSA |     -    20    45    15     -    27    24     -     -     -     - |  288  31459
 PERT |     -    29   240    27     -    91    42     -     -     -     - |  286   2826
 PIE1 |     -    18    31    11     -    15    12     -     -     -     - |  288    118
 PRDS |     -    19     -    19     -     -     -     -     -     -     - |  288   2918
 SCH2 |     -    13    39    21     -    23    13     -     -     -     - |  288  18753
 SFER |     -     -    51    18     -    38    17     -     -     -     - |  287    532
 STJO |     -    18    41    22     -    30    19     -     -     -     - |  288   2241
 STR1 |     -    21    36     -     -     -    20     -     -     -     - |  288    905
 USNO |     -     9    35     -     -    18     9     -     -     -     - |  288     24
 USUD |     -    36    67    36     -   183     -     -     -     -     - |  284 642747
 VILL |     -    10    35    23     -     -    22     -     -     -     - |  288  25523
 WES2 |     -    20    39    20     -     -    12     -     -     -     - |  288    180
 WSRT |     -    15    37    15     -     -     -     -     -     -     - |  288  51984
 WUHN |     -    15    83    15     -     -     -     -     -     -     - |  277 121969
 YELL |     -    10    29    16     -    15    21     -     -     -     - |  288     21
 -----+-------------------------------------------------------------------+-------------
 TOT  | 74586    42   145    41   129    59    42 76815 74524     -     - |
