
 cls-file Version 2.0
 GPS week: 0831   Day: 6   MJD: 50067                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2158      0   -2567   19350  76833  76833      0  78314  78314      0    0.00
 em1 |   288     0  15974      0  356634   18545     48     65     29    333    202    404   50.00
 es1 |   288     0  15711    112   -2294   17715    126    130    123   2658   2704   2623    0.00
 gf1 |   288     0  15974      0   12288    8208     48     65     29    333    202    404   50.00
 igf |    96     0   2254      4   -3053   19784    804    804      0   1062   1062      0    0.00
 ng1 |    96     0   2254      0   10319    9593  77285  77285      0  79625  79625      0    0.00
 pd1 |    96     0   2158      0   -2377   19345  76807  76807      0  78284  78284      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------------------+
    1 |  -236   159  -144  -159  1054 12223  -146     - |
    2 | -1600   100 -1046  -100  -720 -4056 -1774     - |
    4 |   886  -124  1449   124   385 16166  1097     - |
    5 |   402    49  -487   -49  -422 18153   631     - |
    6 |   231   -78   681    78  -563 -9899   105     - |
    7 |  -581  -193  -719   193   493 -4378  -301     - |
    9 | -1340   185   448  -185  -901-11158 -1467     - |
   14 |   299   126   721  -126  -548 12595  -441     - |
   15 |  -385   -55 -1070    55    88 -7799  -557     - |
   16 |  1373  -168  -676   168   281 -5436  1419     - |
   17 |  3507  -117  -601   117   782-13471  3362     - |
   18 |  -751   249   401  -249   219 22213  -857     - |
   19 | -2032  -123   430   123 -1306  6593 -1977     - |
   20 |  2638    91   135   -91  -457  9453  2367     - |
   21 |   296   -97  -319    97  -376 -8637   296     - |
   22 |   505   224 -1443  -224   385-19655   510     - |
   23 | -1214    42  -459   -42  -356  6943 -1286     - |
   24 | -1056  -324   473   324  -395  9396  -336     - |
   25 |   -35   105   765  -105   507 -8607  -315     - |
   26 |   587    56  1497   -56   972  -311  1199     - |
   27 |   302    14   152   -14  -518-22226   251     - |
   28 |     -   628   450  -628   502 -6445     -     - |
   29 |  -291    38  1158   -38   313  8068  -685     - |
   31 | -2542    79  -521   -79   562  1334 -2156     - |
 -----+-------------------------------------------------+
 ALBH |     -    48   178   -48     -     -     -     - |
 AREQ |     -   217    78  -217     -     -     -     - |
 BRUS |     -    98   103   -98     -     -     -     - |
 CHUR |     -   338   931  -338     -     -     -     - |
 CRO1 |     -    50    73   -50     -     -     -     - |
 DARW |     -    49   190   -49     -     -     -     - |
 DRAO |     -   117    87  -117     -     -     -     - |
 GODE |     -    81  -123   -81     -     -     -     - |
 GRAZ |     -  -865 -1334   865     -     -     -     - |
 HOB2 |     -   -15    21    15     -     -     -     - |
 IRKT |     -   104   126  -104     -     -     -     - |
 JOZE |     -    17   244   -17     -     -     -     - |
 KERG |     -  -904 -1231   904     -     -     -     - |
 KIRU |     -   162    48  -162     -     -     -     - |
 KOUR |     -   -80   836    80     -     -     -     - |
 LPGS |     -    83    82   -83     -     -     -     - |
 MAS1 |     -   679     -  -679     -     -     -     - |
 MCM4 |     -   247   -58  -247     -     -     -     - |
 MDO1 |     -   128   -52  -128     -     -     -     - |
 NLIB |     -    15    25   -15     -     -     -     - |
 NRC1 |     -   188   159  -188     -     -     -     - |
 ONSA |     -    37    82   -37     -     -     -     - |
 PERT |     -     2   189    -2     -     -     -     - |
 PIE1 |     -   153    89  -153     -     -     -     - |
 STJO |     -   170   -49  -170     -     -     -     - |
 TIDB |     - -1282  -989  1282     -     -     -     - |
 TSKB |     -    36    71   -36     -     -     -     - |
 USUD |     -   126   -43  -126     -     -     -     - |
 VILL |     -    22   149   -22     -     -     -     - |
 WES2 |     -   103     3  -103     -     -     -     - |
 WILL |     -   163     2  -163     -     -     -     - |
 YAR2 |     - -1119 -1165  1119     -     -     -     - |
 YELL |     -   154  1127  -154     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------------------+-------------
    1 | 77833    49    58    49   676 78908 77815     - |  288  82830
    2 | 75742    79   220    79   938 77054 75760     - |  274  84873
    4 | 71611   146   231   146   492 72209 71537     - |  276  77070
    5 | 75424   108   192   108   443 82898 75473     - |  245  82353
    6 | 80150    23    80    23   449 82093 80116     - |  288  77796
    7 | 77810    93    52    93   736 80139 77776     - |  288  81422
    9 | 76682    49    98    49  1335 77417 76690     - |  288  82524
   14 | 83230    46   117    46   484 87623 83082     - |  288  81460
   15 | 14058    66   231    66   789 14220 14046     - |  267   4250
   16 | 85197    24   116    24   578 86020 85213     - |  288  80013
   17 | 75231    45   195    45   841 79675 75176     - |  274  79874
   18 | 76305    27    63    27   471 77751 76318     - |  288  75504
   19 | 76356    90   120    90   732 77658 76352     - |  288  79011
   20 | 77269    89   156    89   632 79322 77205     - |  276  87592
   21 | 80283    38   128    38   679 80735 80285     - |  288  79898
   22 | 81188    36   170    36   703 83434 81191     - |  276  84802
   23 | 74467    62    60    62   782 75535 74478     - |  288  80354
   24 | 78665    97   130    97   648 81784 78495     - |  276  81633
   25 | 84453    38    55    38   524 85552 84489     - |  286  80707
   26 | 77673    39    42    39  1189 80694 77727     - |  288  77362
   27 | 81386    18    67    18   560 82092 81367     - |  288  86910
   28 |     -    75   128    75  1580 16292     -     - |  288   1741
   29 | 78988    49    46    49   546 81907 79031     - |  288  81581
   31 | 84858    23    78    23  1220 87872 84659     - |  288  78841
 -----+-------------------------------------------------+-------------
 ALBH |     -    29    47    29     -     -     -     - |  288   2473
 AREQ |     -    17    27    17     -     -     -     - |  288  87261
 BRUS |     -    30    33    30     -     -     -     - |  288     51
 CHUR |     -    62   650    62     -     -     -     - |  177   1184
 CRO1 |     -    19    35    19     -     -     -     - |  287 133893
 DARW |     -    25    37    25     -     -     -     - |  287  45422
 DRAO |     -    21    37    21     -     -     -     - |  288    806
 GODE |     -    17    26    17     -     -     -     - |  288    101
 GRAZ |     -    26    50    26     -     -     -     - |  255    346
 HOB2 |     -    41    80    41     -     -     -     - |  287     68
 IRKT |     -    11    33    11     -     -     -     - |  288    155
 JOZE |     -    34    33    34     -     -     -     - |  286  56520
 KERG |     -    30    64    30     -     -     -     - |  288 177986
 KIRU |     -    35   312    35     -     -     -     - |  286   1935
 KOUR |     -    19    41    19     -     -     -     - |  288   2812
 LPGS |     -    32    58    32     -     -     -     - |  288 639248
 MAS1 |     -    31     -    31     -     -     -     - |  240    >>>
 MCM4 |     -    21    51    21     -     -     -     - |  286  82909
 MDO1 |     -    21    34    21     -     -     -     - |  288   1671
 NLIB |     -    13    21    13     -     -     -     - |  288     64
 NRC1 |     -    41    59    41     -     -     -     - |  288     42
 ONSA |     -    34    27    34     -     -     -     - |  288     50
 PERT |     -    40    36    40     -     -     -     - |  287   1246
 PIE1 |     -    24    41    24     -     -     -     - |  287     89
 STJO |     -    19    25    19     -     -     -     - |  288   2596
 TIDB |     -    55    43    55     -     -     -     - |  287    124
 TSKB |     -    11    35    11     -     -     -     - |  288  29083
 USUD |     -    14    38    14     -     -     -     - |  286   1128
 VILL |     -    24    43    24     -     -     -     - |  288   1245
 WES2 |     -    14    20    14     -     -     -     - |  288    586
 WILL |     -    17    35    17     -     -     -     - |  288   7031
 YAR2 |     -    30    42    30     -     -     -     - |  288   1352
 YELL |     -    58   513    58     -     -     -     - |  194     71
 -----+-------------------------------------------------+-------------
 TOT  | 76833    48   127    48   805 77286 76807     - |
