
 cls-file Version 2.0
 GPS week: 0815   Day: 0   MJD: 49949                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2108      0   -3810    4181  73761  73761      0  75541  75541      0    0.00
 em1 |   288     0  16583     13 -999999  -12393     40     51     30    220    260    184   34.60
 es1 |   288     0  21506    941   -9835    -665     51     62     45    501    638    428   26.69
 gf1 |   288     0  21662   2174     504   -5355     35     41     32    232    275    203   38.71
 igf |    96     0   2356      0   -3954    4452    777    777      0   1171   1171      0    0.00
 ng1 |    96     0   2356      0    2127   -9689  73847  73847      0  75993  75993      0    0.00
 pd1 |    96     0   2204      0   -3848    4179  74032  74032      0  75736  75736      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------------------+
    1 |  1357    97  -145    12   174 23240  1501     - |
    2 |   769   297  -695   204  -670 -5765   208     - |
    4 |  -540   -78     X    69   488 -5158  -426     - |
    5 |   920   191  -443   135  -178 10116   491     - |
    6 |   153  -246   438   -83  -675  6140   306     - |
    7 |   726    63  -716   432   768 -4776   866     - |
    9 |  -308   -98   406  -192    71  5301   172     - |
   12 |     -    58     -   -51  2922  -371     -     - |
   14 | -1360   -65   354  -194 -1247-10073 -1103     - |
   15 |   247   190  -818   377   116 11929   217     - |
   16 |   287    86  -531   289   375  5153  -374     - |
   17 |   794    67  -663   389   462  1566   762     - |
   18 |     -    33   226  -185   164-11663  -810     - |
   19 | -1282  -139    94    59 -1600   602 -1453     - |
   20 | -1429   -12    48   -23  -405 11517 -1191     - |
   21 | -2253  -145  -151   234  -884 -1648 -1500     - |
   22 |  1069   446  -901   195   696 -8335  1201     - |
   23 | -2496   115  -304   111  -790-18907 -2190     - |
   24 |    56  -445   288   199  -431  3744  -400     - |
   25 |  1226  -341   659  -150  -246  -233   930     - |
   26 |  1861    -3     X     3   202 -3296  1417     - |
   27 |  -618    -7    -7    11  -254 -5393  -556     - |
   28 |     -  -135   433  -178  1097 -5442     -     - |
   29 |   387  -226   724  -294  -214 16686   467     - |
   31 |   269   102  -312   123  1254-15689  1178     - |
 -----+-------------------------------------------------+
 ALBH |     -   -99   224   -66     -     -     -     - |
 AREQ |     -    62     9   -62     -     -     -     - |
 BRAZ |     -     -   -24    17     -     -     -     - |
 BRMU |     -     -    32   -22     -     -     -     - |
 BRUS |     -   -89   215   -69     -     -     -     - |
 CAS1 |     -     -    42   -29     -     -     -     - |
 CEDU |     -     -     1    -1     -     -     -     - |
 CHUR |     -    79   419  -351     -     -     -     - |
 DARW |     -   -73    94     -     -     -     -     - |
 DRAO |     -   -34   117   -51     -     -     -     - |
 FAIR |     -   -97   126     X     -     -     -     - |
 GODE |     -   -17   -12    23     -     -     -     - |
 GRAZ |     -    66   -86     X     -     -     -     - |
 GUAM |     -     -   -67    46     -     -     -     - |
 HARV |     -     -    57   -39     -     -     -     - |
 HOB2 |     -   -55   -43    79     -     -     -     - |
 JOZE |     -   -61    45    26     -     -     -     - |
 JPLM |     -     -    85   -58     -     -     -     - |
 KARR |     -     -   302  -209     -     -     -     - |
 KELY |     -     -   238  -164     -     -     -     - |
 KERG |     -   155  -201     X     -     -     -     - |
 KIRU |     -     0   221  -152     -     -     -     - |
 KIT3 |     -     -    69   -48     -     -     -     - |
 KOKB |     -   -58    75     X     -     -     -     - |
 KOSG |     -     -    55   -38     -     -     -     - |
 KOUR |     -   121    31  -129     -     -     -     - |
 LHAS |     -     -  -121    83     -     -     -     - |
 LPGS |     -   -36   100   -37     -     -     -     - |
 MAC1 |     -     -    -8     6     -     -     -     - |
 MAS1 |     -   -77    40    41     -     -     -     - |
 MATE |     -    23   -30     X     -     -     -     - |
 MAW1 |     -     -   -56    39     -     -     -     - |
 MCM4 |     -   174  -154   -49     -     -     -     - |
 MDO1 |     -   -19    78   -36     -     -     -     - |
 METS |     -     -   118   -82     -     -     -     - |
 NLIB |     -   -26    68   -24     -     -     -     - |
 NYAL |     -    79  -103     X     -     -     -     - |
 PERT |     -   -90    94    16     -     -     -     - |
 PIE1 |     -   -39   171   -83     -     -     -     - |
 POL2 |     -     -    34   -23     -     -     -     - |
 POTS |     -     -     3    -2     -     -     -     - |
 SHAO |     -     -    26   -18     -     -     -     - |
 STJO |     -    32     6   -33     -     -     -     - |
 TIDB |     -    72   -93     X     -     -     -     - |
 TOW2 |     -     -   -47    32     -     -     -     - |
 TSKB |     -   -53   129   -42     -     -     -     - |
 USUD |     -    -1   -18    14     -     -     -     - |
 VILL |     -    80  -330   156     -     -     -     - |
 WES2 |     -  -102   126     4     -     -     -     - |
 WHIT |     -   106     -   -95     -     -     -     - |
 WILL |     -    38    62   -76     -     -     -     - |
 YAR2 |     -    52   -68     X     -     -     -     - |
 YELL |     -   148     X  -132     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------------------+-------------
    1 | 87596    63    99    74   812 87711 88045     - |  288  87992
    2 | 77099    35    38    19   596 80185 77001     - |  288  85558
    4 | 89384    49     X    44   915 92069 89770     - |  288  83397
    5 | 79935    41    44    19   492 82876 79873     - |  288  87104
    6 | 73990    54    42    24   581 76641 74009     - |  288  81655
    7 | 78857    28    62    48   680 82322 78624     - |  288  84090
    9 | 79416    38    46    45   641 82317 79064     - |  288  81105
   12 |     -   104     -    93  1223 14708     -     - |  166    196
   14 | 79357    60    65    31   761 81631 79997     - |  288  83891
   15 | 16538    36    41    28  1174 17277 16262     - |  288   3533
   16 | 70028   107   128    29   533 74781 69319     - |  280  80345
   17 | 73013    41    36    34   744 73446 72986     - |  288  77956
   18 |     -    39    31    33   600 80414 79363     - |  288  83815
   19 | 72843    34    66    37   547 73914 73261     - |  288  74080
   20 | 81321    45    68    14  1105 82801 81208     - |  286  73926
   21 | 74472    20    62    52   600 77148 74273     - |  288  80549
   22 | 68862    29    53    27   942 70511 69472     - |  288  76566
   23 | 76425    54    49    52   630 78309 76744     - |  288  84390
   24 | 72114    51    48    24   904 72115 70699     - |  288  86634
   25 | 69652    35    64    27   602 73450 70430     - |  288  81820
   26 | 79286    78     X    69   827 84571 79389     - |  288  83822
   27 | 70681    36    53    26   531 72160 71184     - |  288  77115
   28 |     -    61    66    64   757 15289     -     - |  288   1376
   29 | 68819    42    45    24   788 70513 68938     - |  288  77792
   31 | 63491    38    79    40  1085 67265 63051     - |  288  71008
 -----+-------------------------------------------------+-------------
 ALBH |     -    25    35    15     -     -     -     - |  288   7776
 AREQ |     -    27    35    33     -     -     -     - |  215 118081
 BRAZ |     -     -    36    25     -     -     -     - |  288  78172
 BRMU |     -     -    37    26     -     -     -     - |  288 100223
 BRUS |     -    24    52    36     -     -     -     - |  288    267
 CAS1 |     -     -    24    17     -     -     -     - |  287   6413
 CEDU |     -     -    39    27     -     -     -     - |  287  85839
 CHUR |     -    59   120   104     -     -     -     - |  276   3127
 DARW |     -    32    41     -     -     -     -     - |  269  61744
 DRAO |     -    27    37    15     -     -     -     - |  288    413
 FAIR |     -    24    31     X     -     -     -     - |  288    165
 GODE |     -    31    42    22     -     -     -     - |  288    318
 GRAZ |     -    28    37     X     -     -     -     - |  288    432
 GUAM |     -     -    86    59     -     -     -     - |  288  91479
 HARV |     -     -    22    15     -     -     -     - |  287    >>>
 HOB2 |     -    25    44    16     -     -     -     - |  287    317
 JOZE |     -    65    64    57     -     -     -     - |  267  21124
 JPLM |     -     -    37    26     -     -     -     - |  283  81688
 KARR |     -     -    24    16     -     -     -     - |  287 372052
 KELY |     -     -    70    48     -     -     -     - |  248 124783
 KERG |     -    30    38     X     -     -     -     - |  288 107708
 KIRU |     -    22    42    21     -     -     -     - |  288   2570
 KIT3 |     -     -    56    39     -     -     -     - |  288 147514
 KOKB |     -    28    37     X     -     -     -     - |  288    147
 KOSG |     -     -    73    50     -     -     -     - |  279   9811
 KOUR |     -    23    48    33     -     -     -     - |  274   2269
 LHAS |     -     -    21    14     -     -     -     - |  288 111291
 LPGS |     -    25    42    27     -     -     -     - |  288 263436
 MAC1 |     -     -    59    41     -     -     -     - |  287  41498
 MAS1 |     -    26    34    18     -     -     -     - |  288   9590
 MATE |     -    29    37     X     -     -     -     - |  288    193
 MAW1 |     -     -    35    24     -     -     -     - |  276  38720
 MCM4 |     -    22    32    20     -     -     -     - |  288  76303
 MDO1 |     -    26    44    16     -     -     -     - |  288    390
 METS |     -     -    28    19     -     -     -     - |  288    623
 NLIB |     -    23    40    15     -     -     -     - |  288    148
 NYAL |     -    30    39     X     -     -     -     - |  158    156
 PERT |     -    29    29    17     -     -     -     - |  288   1208
 PIE1 |     -    25    36    14     -     -     -     - |  288    160
 POL2 |     -     -    50    34     -     -     -     - |  268 148414
 POTS |     -     -    42    29     -     -     -     - |  288  79686
 SHAO |     -     -    54    37     -     -     -     - |  288  77615
 STJO |     -    42    35    37     -     -     -     - |  288  18092
 TIDB |     -    41    53     X     -     -     -     - |  288    178
 TOW2 |     -     -    21    15     -     -     -     - |  287  39849
 TSKB |     -    25    52    19     -     -     -     - |  288   1587
 USUD |     -    18    55    29     -     -     -     - |  288    612
 VILL |     -    30    50    27     -     -     -     - |  288   2184
 WES2 |     -    16    34    14     -     -     -     - |  288    144
 WHIT |     -    13     -    12     -     -     -     - |  288  81123
 WILL |     -    25    38    13     -     -     -     - |  288   2580
 YAR2 |     -    23    30     X     -     -     -     - |  288   1339
 YELL |     -    38     X    34     -     -     -     - |  282    167
 -----+-------------------------------------------------+-------------
 TOT  | 73761    41    51    36   777 73848 74032     - |
