
 cls-file Version 2.0
 GPS week: 0804   Day: 5   MJD: 49877                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2193      0    3183   -6094  78119  78119      0  79893  79893      0    0.00
 em1 |   288     0  15634    966 -669772  -24368     69     70     68    456    468    447   28.45
 es1 |   288     0  20363    286   -4562    5552     49     60     42    578    636    546   38.65
 gf1 |   288     0  20065     42    3495  -15492     59     72     50    594    475    647   32.90
 igf |    96     0   2289      0    3121   -6045    449    449      0    921    921      0    0.00
 ng1 |    96     0   2289      0    2906  -17503  78258  78258      0  80404  80404      0    0.00
 pd1 |    96     0   2193      0    3259   -6104  78107  78107      0  79883  79883      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------------------+
    1 |  2184   250   -62  -143   489-14125  2177     - |
    2 |  -732   479  -540   224  -210-11222   172     - |
    4 | -1617  -732   922  -481    46  5448 -1289     - |
    5 | -1059   297  -200   -22  -136 -8040 -1369     - |
    6 | -2615  -227   411  -287 -1226  4830 -2950     - |
    7 |  1535   235  -512   398  1027 -2725  1322     - |
    9 |   -24   -61   366  -377   130 -3317  -150     - |
   14 |   973  -152   449  -396  -936 -4383   488     - |
   15 |   787   280  -520   431   903  8191   729     - |
   16 |   -86   203  -431   332   308  -913    13     - |
   17 |   492     X  -280   329   178  5799   547     - |
   18 |  -461   124   208  -350  -142 -2287  -404     - |
   19 | -3038  -168   170   -54 -1792 10177 -2608     - |
   20 |   287   139    94  -231  -232-16571   658     - |
   21 |   844    47   -84    59  -270   717   592     - |
   22 |   457   787  -856   348   558 -9345   577     - |
   23 |  -481   134  -172    87  -453 15383    14     - |
   24 |  -570  -407   347   -66  -598  8017  -307     - |
   25 |   616  -269   530  -390   199 -4937    12     - |
   26 |   296  -502  1004  -745   -68 -4370  -237     - |
   27 |   321    31    89  -131  -286 14389   485     - |
   28 |     -   282   619  -978  1489  5900     -     - |
   29 |  -660  -368   666  -466  -334 -2138  -731     - |
   31 |  2047   340  -340   105  1378  6194  1777     - |
 -----+-------------------------------------------------+
 ALBH |     -   -19   171  -184     -     -     -     - |
 ALGO |     -     -   158  -186     -     -     -     - |
 AREQ |     -   236    81  -299     -     -     -     - |
 BOGT |     -     -  -550   646     -     -     -     - |
 BRAZ |     -     -   143  -168     -     -     -     - |
 BRMU |     -     -   120  -141     -     -     -     - |
 BRUS |     -   152   118  -270     -     -     -     - |
 CAS1 |     -     -   141  -166     -     -     -     - |
 CEDU |     -     -   148  -174     -     -     -     - |
 CHUR |     -   364   162  -503     -     -     -     - |
 DARW |     -   -80   203  -169     -     -     -     - |
 DAV1 |     -     -    98  -115     -     -     -     - |
 DRAO |     -    72   163  -254     -     -     -     - |
 GODE |     -    99    52  -147     -     -     -     - |
 GRAZ |     -  -663  -595  1273     -     -     -     - |
 HARV |     -     -    69   -82     -     -     -     - |
 HERS |     -     -  -402   472     -     -     -     - |
 HOB2 |     -   -13   109  -117     -     -     -     - |
 JOZE |     -    89     -   -77     -     -     -     - |
 JPLM |     -     -   101  -118     -     -     -     - |
 KARR |     -     -   149  -174     -     -     -     - |
 KERG |     -     X  -992  1165     -     -     -     - |
 KIRU |     -   274     -  -237     -     -     -     - |
 KIT3 |     -     -   103  -121     -     -     -     - |
 KOKB |     - -1029  -812  1959     -     -     -     - |
 KOUR |     -     X   352  -414     -     -     -     - |
 LHAS |     -     -   138  -162     -     -     -     - |
 MADR |     -     - -1494  1755     -     -     -     - |
 MAS1 |     -  -169   124     -     -     -     -     - |
 MAW1 |     -     -   112  -132     -     -     -     - |
 MCM4 |     -   177     2  -155     -     -     -     - |
 MDO1 |     -    44   -33     -     -     -     -     - |
 METS |     -     -  -868  1020     -     -     -     - |
 NLIB |     -   260    29  -259     -     -     -     - |
 NRC1 |     -   -32   319  -350     -     -     -     - |
 NYAL |     -    22   283  -353     -     -     -     - |
 ONSA |     -    14   172  -214     -     -     -     - |
 PIE1 |     -   143   168  -321     -     -     -     - |
 POTS |     -     -   137  -161     -     -     -     - |
 SHAO |     -     -    68   -80     -     -     -     - |
 STJO |     -    32   -24     -     -     -     -     - |
 TIDB |     -  -557  -289   872     -     -     -     - |
 TOW2 |     -     -   138  -162     -     -     -     - |
 TSKB |     -   -46   159  -147     -     -     -     - |
 USUD |     -   180    34  -196     -     -     -     - |
 VILL |     -   -50   183  -172     -     -     -     - |
 WES2 |     -   -36   139  -135     -     -     -     - |
 WILL |     -   179    59  -224     -     -     -     - |
 YAR2 |     -  -737  -644  1394     -     -     -     - |
 YELL |     -   333     X  -288     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------------------+-------------
    1 | 83804    30    56    53   317 87968 83801     - |  288  81448
    2 | 89995    49    28    33   288 93690 89976     - |  288  86621
    4 | 82006    63    86   102   349 83359 81907     - |  279  86625
    5 | 81379    42    47    69   332 83358 81463     - |  288  81995
    6 | 76351    44    47    54   434 76330 76489     - |  288  83567
    7 | 86619    74    59    37   311 87266 86602     - |  288  83440
    9 | 77220    84    61    40   453 78495 77228     - |  288  78064
   14 | 78724    63    46    77   298 80770 78531     - |  288  81313
   15 | 16706    62    81    83   588 17488 16695     - |  276   1936
   16 | 74691    89    47    51   221 75127 74681     - |  288  79791
   17 | 82175     X    86   101   519 85608 82179     - |  276  81059
   18 | 86876    45    39    32   316 87506 86871     - |  288  80880
   19 | 75393    42    43    40   455 76930 75273     - |  288  81674
   20 | 79201   148    58   114   649 81145 79262     - |  288  78268
   21 | 85860    87    35    91   496 86507 85806     - |  288  84591
   22 | 71550    90    55    92   735 72559 71548     - |  288  77894
   23 | 74937    56    59    54   323 78054 74960     - |  288  78577
   24 | 81832   102   127   111   543 82496 81796     - |  277  77557
   25 | 83171    37    72   100   489 84395 83159     - |  288  82680
   26 | 75290    71    63    30   466 75808 75286     - |  288  78315
   27 | 80544    39    26    32   374 82795 80567     - |  288  82674
   28 |     -    89    69   128   560 16734     -     - |  288   2349
   29 | 77033    61    44    40   422 80378 77039     - |  288  80487
   31 | 76006    44    33    23   491 79404 75973     - |  288  81218
 -----+-------------------------------------------------+-------------
 ALBH |     -    21    30    35     -     -     -     - |  288  12347
 ALGO |     -     -    21    24     -     -     -     - |  288    285
 AREQ |     -    53    75    55     -     -     -     - |  278    >>>
 BOGT |     -     -    24    28     -     -     -     - |  287 111198
 BRAZ |     -     -    46    54     -     -     -     - |  274    >>>
 BRMU |     -     -    24    28     -     -     -     - |  288 101669
 BRUS |     -    43    33    22     -     -     -     - |  288    302
 CAS1 |     -     -    74    87     -     -     -     - |  286   6696
 CEDU |     -     -    23    26     -     -     -     - |  287  38490
 CHUR |     -   172   107   139     -     -     -     - |  253  49029
 DARW |     -    42    31    21     -     -     -     - |  287  54144
 DAV1 |     -     -    74    87     -     -     -     - |  275  21599
 DRAO |     -    17    23    24     -     -     -     - |  288    394
 GODE |     -    40    30    25     -     -     -     - |  288    501
 GRAZ |     -    45    27    31     -     -     -     - |  288   1106
 HARV |     -     -    20    24     -     -     -     - |  288    >>>
 HERS |     -     -    22    26     -     -     -     - |  285  83747
 HOB2 |     -    41    39    26     -     -     -     - |  287    302
 JOZE |     -    24     -    21     -     -     -     - |  286  18601
 JPLM |     -     -    17    20     -     -     -     - |  288  46237
 KARR |     -     -    22    26     -     -     -     - |  287  77045
 KERG |     -     X    17    20     -     -     -     - |  288  77941
 KIRU |     -   109     -    94     -     -     -     - |  285    >>>
 KIT3 |     -     -    45    53     -     -     -     - |  287 154621
 KOKB |     -    52    38    66     -     -     -     - |  288    316
 KOUR |     -     X    37    44     -     -     -     - |  288   1908
 LHAS |     -     -    84    99     -     -     -     - |  241    >>>
 MADR |     -     -    33    39     -     -     -     - |  275    267
 MAS1 |     -    46    34     -     -     -     -     - |  288   6788
 MAW1 |     -     -    41    48     -     -     -     - |  282  37198
 MCM4 |     -    57    49    22     -     -     -     - |  288  78856
 MDO1 |     -    40    30     -     -     -     -     - |  288    791
 METS |     -     -    31    37     -     -     -     - |  229    368
 NLIB |     -    31    29    21     -     -     -     - |  288    291
 NRC1 |     -   159    81   144     -     -     -     - |  223    452
 NYAL |     -    52    26    38     -     -     -     - |  288    328
 ONSA |     -    41    30    24     -     -     -     - |  288    321
 PIE1 |     -    43    41    19     -     -     -     - |  288    301
 POTS |     -     -    37    44     -     -     -     - |  257    >>>
 SHAO |     -     -    29    34     -     -     -     - |  288    616
 STJO |     -    56    41     -     -     -     -     - |  288  10462
 TIDB |     -    51    49    37     -     -     -     - |  274    316
 TOW2 |     -     -    20    23     -     -     -     - |  286  44867
 TSKB |     -    32    35    38     -     -     -     - |  288    964
 USUD |     -    34    35    39     -     -     -     - |  288    434
 VILL |     -    29    35    48     -     -     -     - |  288   1704
 WES2 |     -   201    73    84     -     -     -     - |  288    341
 WILL |     -    22    26    25     -     -     -     - |  288   3142
 YAR2 |     -    38    29    22     -     -     -     - |  288   2024
 YELL |     -    18     X    15     -     -     -     - |  288   1077
 -----+-------------------------------------------------+-------------
 TOT  | 78119    69    49    59   449 78259 78108     - |
