
 cls-file Version 2.0
 GPS week: 0801   Day: 4   MJD: 49855                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2190      0    7554  -16430  73543  73543      0  75593  75593      0    0.00
 em1 |   288     0  14459    294 -154140  -39223     65     81     48    246    287    205   39.23
 es1 |   288     0  17828    887    1332  -15222     76     87     67    426    506    368   32.80
 gf1 |   288     0  17498    594    7596  -16659     92     93     92    510    399    572   27.98
 igf |    96     0   2270      0    7795  -16500   1155   1155      0   1377   1377      0    0.00
 ng1 |    96     0   2270      0   10818  -24914  74508  74508      0  77354  77354      0    0.00
 pd1 |    96     0   2190      0    7602  -16441  73519  73519      0  75566  75566      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------------------+
    1 |  1122    99   -12  -134  1390 -7915  1165     - |
    2 |  1016   451  -751   248    76-19185   668     - |
    4 |  -149  -674  1142  -397   218 -4614   -58     - |
    5 |  1188   118  -231   105  -148  7060  1059     - |
    6 |   -60  -125   385  -276  -230  5148  -585     - |
    7 |  2621   124  -559   481  1525 13281  2243     - |
    9 |  1994   -42   240  -232  -252 18556  2025     - |
   14 | -2336   -88   509  -471 -1377 -5791 -2067     - |
   15 |   285     -  -382   448    72  5275   237     - |
   16 |   408   139  -484   381    42 -2370  1284     - |
   17 |  -307   265  -498   213  -510 19504  -620     - |
   18 |   458    85   168  -316   306  7728   134     - |
   19 | -1068  -144    80   106  -794 -1493  -923     - |
   20 |  -119    21    79  -121  -590-21516    65     - |
   21 | -2488    44   -62    10  -955 16790 -1982     - |
   22 |  -178   288     X  -404   460-19240   -12     - |
   23 |  1321   147  -261   100   359-16611   868     - |
   24 | -1299  -557   461   241  -210 -6590  -984     - |
   25 |   -34  -180   489  -344   817  5769  -435     - |
   26 | -1117  -373   925  -564  -141 14241  -993     - |
   27 |  1227   -19   -29    61    25   550   797     - |
   28 |     -   316   689 -1273  -215  4218     -     - |
   29 | -1355  -214   616  -422  -571 -8081 -1154     - |
   31 |   304   361  -316  -138   649 -2108   681     - |
 -----+-------------------------------------------------+
 ALBH |     -    83    57  -183     -     -     -     - |
 ALGO |     -     -   191  -224     -     -     -     - |
 AREQ |     -   163    57  -297     -     -     -     - |
 BRAZ |     -     -   252  -295     -     -     -     - |
 BRMU |     -     -    79   -93     -     -     -     - |
 BRUS |     -    67    98  -209     -     -     -     - |
 CHUR |     -   139   245  -472     -     -     -     - |
 DRAO |     -   166    66  -311     -     -     -     - |
 FAIR |     -    88  -105     X     -     -     -     - |
 GODE |     -   141   -64  -123     -     -     -     - |
 GOLD |     -     - -1110  1302     -     -     -     - |
 GRAS |     -     -   158  -185     -     -     -     - |
 GRAZ |     -  -456  -693  1452     -     -     -     - |
 HARV |     -     -    68   -80     -     -     -     - |
 HERS |     -     -  -827   969     -     -     -     - |
 JOZE |     -   -31   185  -174     -     -     -     - |
 KARR |     -     -   267  -313     -     -     -     - |
 KERG |     -  -221  -578   990     -     -     -     - |
 KOKB |     -   -68    57    28     -     -     -     - |
 KOUR |     -  -229   275     -     -     -     -     - |
 MAS1 |     -    87   140  -286     -     -     -     - |
 MATE |     -    56   -67     X     -     -     -     - |
 MCM4 |     -   236    17  -352     -     -     -     - |
 MDO1 |     -    -1    55   -64     -     -     -     - |
 NLIB |     -    84    40  -165     -     -     -     - |
 NYAL |     -     X -1068  1252     -     -     -     - |
 ONSA |     -   -37   187  -167     -     -     -     - |
 PIE1 |     -    79   117  -249     -     -     -     - |
 POTS |     -     -   102  -119     -     -     -     - |
 SHAO |     -     -    26   -31     -     -     -     - |
 STJO |     -   250   -23  -324     -     -     -     - |
 TIDB |     -  -510  -610  1430     -     -     -     - |
 TSKB |     -  -174   223   -18     -     -     -     - |
 USUD |     -    36    47  -106     -     -     -     - |
 VILL |     -   147     X  -206     -     -     -     - |
 WES2 |     -     -   128  -150     -     -     -     - |
 WILL |     -    44   133  -217     -     -     -     - |
 YAR2 |     -  -346  -363   911     -     -     -     - |
 YELL |     -   162     X  -228     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------------------+-------------
    1 | 71180    73    82   108  1543 71658 71180     - |  288  80903
    2 | 64447    97    57   170  1392 67567 64357     - |  288  81538
    4 | 72932   141    98   144   723 75762 72926     - |  288  82049
    5 | 86522    25    27    45   320 87549 86485     - |  288  81554
    6 | 76070    58    37    46   856 79435 76077     - |  288  80948
    7 | 79199    51    42    39  1403 85345 79111     - |  288  77198
    9 | 78572   114   154    70   492 79976 78570     - |  278  84329
   14 | 72930   190   201    96   843 74291 72874     - |  288  80266
   15 | 17467     -    26    30   938 19366 17459     - |  278   2080
   16 | 81905    70   100    60   247 85393 82070     - |  288  79259
   17 | 77956    29    83    64  1117 79060 77947     - |  288  75620
   18 | 85140    29    68   107   933 85914 85138     - |  288  81573
   19 | 74830    49    49   116  1326 76235 74834     - |  278  76953
   20 | 74470    25    66    92   489 75834 74502     - |  288  81102
   21 | 69750    68    56    50  1100 72594 69581     - |  288  80387
   22 | 75936    50     X    70   301 76991 75919     - |  285  84075
   23 | 74323    36    83   136  1530 77426 74235     - |  288  78022
   24 | 72390    62    95    63   381 76044 72314     - |  288  80597
   25 | 70775   154   114   161  2529 74662 70665     - |  277  83297
   26 | 70885    74   117    42   835 73995 70854     - |  288  75141
   27 | 73834    34    40    62  1293 75749 73873     - |  280  81902
   28 |     -    80    41    90  2120 18828     -     - |  238   1880
   29 | 68709    63    42    60   960 69493 68665     - |  288  78858
   31 | 82846    43   101   115  1185 84725 82829     - |  288  78933
 -----+-------------------------------------------------+-------------
 ALBH |     -    25    50    64     -     -     -     - |  288  10852
 ALGO |     -     -    41    48     -     -     -     - |  288     18
 AREQ |     -    21    31    24     -     -     -     - |  288  73420
 BRAZ |     -     -    24    28     -     -     -     - |  288  76072
 BRMU |     -     -    25    30     -     -     -     - |  288  94813
 BRUS |     -    89    36   138     -     -     -     - |  288    128
 CHUR |     -    78   108   159     -     -     -     - |  242   2067
 DRAO |     -    15    48    63     -     -     -     - |  288    756
 FAIR |     -    43    51     X     -     -     -     - |  288    210
 GODE |     -    36    41    38     -     -     -     - |  288    130
 GOLD |     -     -    69    80     -     -     -     - |  287    245
 GRAS |     -     -    43    51     -     -     -     - |  288  84160
 GRAZ |     -    27    61    52     -     -     -     - |  288    361
 HARV |     -     -    66    78     -     -     -     - |  288    >>>
 HERS |     -     -    30    35     -     -     -     - |  214 337435
 JOZE |     -    24    55    49     -     -     -     - |  286  13626
 KARR |     -     -    29    34     -     -     -     - |  287  94376
 KERG |     -    35    32    58     -     -     -     - |  288 152246
 KOKB |     -    45    34    60     -     -     -     - |  235    >>>
 KOUR |     -    28    34     -     -     -     -     - |  287   2424
 MAS1 |     -    23    63    54     -     -     -     - |  288   5069
 MATE |     -    39    47     X     -     -     -     - |  288    148
 MCM4 |     -    42   213   291     -     -     -     - |  288  81231
 MDO1 |     -    27    44    24     -     -     -     - |  287    438
 NLIB |     -    32    54    52     -     -     -     - |  288    142
 NYAL |     -     X   200   235     -     -     -     - |  270    471
 ONSA |     -   124    39   161     -     -     -     - |  288 519189
 PIE1 |     -    37    34    24     -     -     -     - |  288    192
 POTS |     -     -    56    66     -     -     -     - |  287  72363
 SHAO |     -     -    96   113     -     -     -     - |  287  22255
 STJO |     -    20    39    47     -     -     -     - |  288   1803
 TIDB |     -    40    26    54     -     -     -     - |  287    242
 TSKB |     -    50    53    23     -     -     -     - |  288    372
 USUD |     -    49    58    20     -     -     -     - |  288    469
 VILL |     -    40     X    57     -     -     -     - |  288   2804
 WES2 |     -     -    37    43     -     -     -     - |  288    165
 WILL |     -    17    40    58     -     -     -     - |  288  14141
 YAR2 |     -    29    20    43     -     -     -     - |  288   3652
 YELL |     -    94     X   132     -     -     -     - |  285  34696
 -----+-------------------------------------------------+-------------
 TOT  | 73544    66    76    93  1156 74508 73519     - |
