
 cls-file Version 2.0
 GPS week: 0800   Day: 2   MJD: 49846                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2183      0   -3555    3132  74233  74233      0  75973  75973      0    0.00
 em1 |   288     0  14868     13  344191    6378     29     36     22    121    156     84   37.03
 es1 |   288     0  20229    885  -16223   15773     40     51     33    227    298    185   25.91
 gf1 |   287     0  20016    310   -4583     983     28     30     26    134    126    138   37.06
 igf |    96     0   2183      0   -3567    3485    282    282      0    656    656      0    0.00
 ng1 |    96     0   2183      0   -6707    3122  76145  76145      0  78538  78538      0    0.00
 pd1 |    96     0   2183      0   -3478    3081  74196  74196      0  75936  75936      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------------------+
    2 | -1893  -188   232    26  -719  -102 -1680     - |
    4 |   796   229  -558   162   512 -9446   385     - |
    5 |  -886  -196   234    33  -304 -2990 -1224     - |
    6 |  -431    80  -153    27  -713   718  -285     - |
    7 |  -960  -266   375     4   412  3697  -236     - |
    9 | -1425    75  -108    -4   210-12789  -497     - |
   14 |  -237    86  -237    80  -772 10420  -388     - |
   15 |   171  -143   219   -11    47  5115   137     - |
   16 |   537  -131   228   -29    35  8023   712     - |
   17 |  2244  -153    71   103   463 -1595  1922     - |
   18 |   417    85   -57   -45   -92 -8496   204     - |
   19 | -1535   -96     X    96 -1256-10985 -1914     - |
   20 |   389   -34   -83    92   -50  3659   615     - |
   21 |  1047   -39    17    27   204  4402   937     - |
   22 |  1002  -217   462  -107   267  5163   957     - |
   23 | -1528  -166   114    86  -461 -4891 -1090     - |
   24 |   517   -61  -111   139  -317 15822    40     - |
   25 |  1314   145  -334    50   363 -7546   891     - |
   26 |    27   199  -533   175   632-16312   360     - |
   27 |  -295   -25   -15    35  -277   497   -72     - |
   28 |   812    73   -33   -50   652  4723   747     - |
   29 |  -859   219  -342    20   258  1408 -1190     - |
   31 |   900   -58   136   -37   847  8172   900     - |
 -----+-------------------------------------------------+
 ALBH |     -    33   -73    18     -     -     -     - |
 ALGO |     -   108   -26   -90     -     -     -     - |
 AREQ |     -    48   139  -130     -     -     -     - |
 BRAZ |     -     -    48   -34     -     -     -     - |
 BRMU |     -     -   -99    69     -     -     -     - |
 BRUS |     -   -63    70    14     -     -     -     - |
 CAS1 |     -     -    19   -13     -     -     -     - |
 CHUR |     -   212     X  -212     -     -     -     - |
 DAV1 |     -     -   -86    60     -     -     -     - |
 DRAO |     -    62   -14   -52     -     -     -     - |
 FAIR |     -    -3     4     X     -     -     -     - |
 GODE |     -   -13   -25    30     -     -     -     - |
 GOLD |     -     -  -309   216     -     -     -     - |
 GRAS |     -     -    41   -28     -     -     -     - |
 GRAZ |     -    59   -50   -24     -     -     -     - |
 HARV |     -     -   -33    23     -     -     -     - |
 HERS |     -     -   718  -502     -     -     -     - |
 JOZE |     -   -30     4    28     -     -     -     - |
 JPLM |     -     -   -26    18     -     -     -     - |
 KARR |     -     -    60   -42     -     -     -     - |
 KERG |     -    92   -35   -68     -     -     -     - |
 KIRU |     -    64     -   -64     -     -     -     - |
 KOKB |     -    28   -64    17     -     -     -     - |
 KOSG |     -     -   -18    13     -     -     -     - |
 KOUR |     -   -79   113     -     -     -     -     - |
 MADR |     -     -   -16    11     -     -     -     - |
 MAS1 |     -  -118    83    61     -     -     -     - |
 MATE |     -   -47    37    21     -     -     -     - |
 MAW1 |     -     -  -169   118     -     -     -     - |
 MCM4 |     -    75  -109     1     -     -     -     - |
 MDO1 |     -    -9   -35    33     -     -     -     - |
 METS |     -     -    86   -60     -     -     -     - |
 NLIB |     -     -   -79    56     -     -     -     - |
 NRC1 |     -    93     X   -93     -     -     -     - |
 NYAL |     -    89   231  -260     -     -     -     - |
 ONSA |     -   -34    70   -15     -     -     -     - |
 PIE1 |     -    14    96   -81     -     -     -     - |
 POTS |     -     -   -66    46     -     -     -     - |
 SANT |     -     -    52   -36     -     -     -     - |
 SHAO |     -     -   -75    52     -     -     -     - |
 STJO |     -    59  -101    11     -     -     -     - |
 TIDB |     -     5   -44    25     -     -     -     - |
 TROM |     -     -    77   -54     -     -     -     - |
 TSKB |     -   -38   -58    79     -     -     -     - |
 USUD |     -    28   -22   -13     -     -     -     - |
 VILL |     -  -134   132    41     -     -     -     - |
 WES2 |     -     -   -50    35     -     -     -     - |
 WILL |     -    64   -83    -6     -     -     -     - |
 YAR2 |     -    46   -19   -33     -     -     -     - |
 YELL |     -    82    -4   -95     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   em1   es1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------------------+-------------
    2 | 75107    20    37    15   224 77091 75049     - |  288  79298
    4 | 85190    31    22    26   228 86501 85191     - |  288  87110
    5 | 85665    28    22    21   215 85612 85720     - |  288  84199
    6 | 80832    15    22    13   255 81748 80837     - |  288  82070
    7 | 75698    19    18    16   332 78376 75510     - |  288  83469
    9 | 70634   102   109    53   394 72809 70337     - |  248  78765
   14 | 77511    31    36    22   216 78837 77494     - |  288  87070
   15 | 16205    44    40    25   285 18882 16206     - |  288   3183
   16 | 78933    28    37    42   147 83098 78952     - |  288  83303
   17 | 78953    26    32    15   289 80285 78833     - |  288  84087
   18 | 78218    12    28    16   236 79135 78193     - |  287  78806
   19 | 73924    19     X    19   416 76782 73872     - |  272  78246
   20 | 86160    29    27    37   256 89245 86189     - |  287  84087
   21 | 78663    28    43    31   325 81122 78645     - |  288  78499
   22 | 73233    40    35    26   217 74846 73227     - |  288  77604
   23 | 76201    65    80    31   206 77535 76102     - |  288  83319
   24 | 80176    22    47    35   266 81202 80124     - |  288  80226
   25 | 72588    50    83    72   413 75734 72454     - |  276  73665
   26 | 79202    44    78    23   277 83321 79158     - |  288  84444
   27 | 74155    40   115    47   371 75916 74152     - |  278  79531
   28 | 16291    23    33    16   264 17396 16288     - |  288   2883
   29 | 73974    15    25    23   258 77400 74087     - |  288  74360
   31 | 78773    18    18    15   276 79049 78767     - |  288  82692
 -----+-------------------------------------------------+-------------
 ALBH |     -    11    25    11     -     -     -     - |  288   4627
 ALGO |     -     9    23    23     -     -     -     - |  287 519700
 AREQ |     -    37    49    43     -     -     -     - |  234 320503
 BRAZ |     -     -    23    16     -     -     -     - |  286  75041
 BRMU |     -     -    11     8     -     -     -     - |  287  71898
 BRUS |     -    18    18     8     -     -     -     - |  288    128
 CAS1 |     -     -    38    27     -     -     -     - |  284   6018
 CHUR |     -    39     X    39     -     -     -     - |  219   3010
 DAV1 |     -     -    50    35     -     -     -     - |  236 108035
 DRAO |     -     9    28    19     -     -     -     - |  288    604
 FAIR |     -    16    24     X     -     -     -     - |  288    109
 GODE |     -    14    18    12     -     -     -     - |  287     87
 GOLD |     -     -    44    31     -     -     -     - |  215     35
 GRAS |     -     -    16    11     -     -     -     - |  287  41482
 GRAZ |     -    12    26    11     -     -     -     - |  288    411
 HARV |     -     -    16    11     -     -     -     - |  283    >>>
 HERS |     -     -    16    11     -     -     -     - |  271    >>>
 JOZE |     -    11    29    15     -     -     -     - |  286  24526
 JPLM |     -     -    13     9     -     -     -     - |  287  31935
 KARR |     -     -    50    35     -     -     -     - |  286  94385
 KERG |     -    15    64    36     -     -     -     - |  288 171563
 KIRU |     -    54     -    54     -     -     -     - |  174   1282
 KOKB |     -    11    27    15     -     -     -     - |  288    122
 KOSG |     -     -    17    12     -     -     -     - |  287    633
 KOUR |     -    11    16     -     -     -     -     - |  288   5523
 MADR |     -     -    24    17     -     -     -     - |  286     65
 MAS1 |     -    16    23    10     -     -     -     - |  288   9642
 MATE |     -    13    26    10     -     -     -     - |  288     86
 MAW1 |     -     -    97    68     -     -     -     - |  223  35387
 MCM4 |     -    28    46    17     -     -     -     - |  288  73768
 MDO1 |     -     8    21    13     -     -     -     - |  288    388
 METS |     -     -    19    13     -     -     -     - |  287    664
 NLIB |     -     -    27    19     -     -     -     - |  287     44
 NRC1 |     -    36     X    36     -     -     -     - |  258    930
 NYAL |     -    30    43    58     -     -     -     - |  252    >>>
 ONSA |     -     7    43    29     -     -     -     - |  288    281
 PIE1 |     -     9    21    13     -     -     -     - |  288    117
 POTS |     -     -    13     9     -     -     -     - |  287  61639
 SANT |     -     -    15    10     -     -     -     - |  287     53
 SHAO |     -     -    41    29     -     -     -     - |  287    150
 STJO |     -    10    24    21     -     -     -     - |  288   3184
 TIDB |     -    25    45    12     -     -     -     - |  288     55
 TROM |     -     -    11     8     -     -     -     - |  286   1735
 TSKB |     -    24    24    20     -     -     -     - |  288    726
 USUD |     -    30    37    18     -     -     -     - |  288    729
 VILL |     -     9    32    21     -     -     -     - |  288   2450
 WES2 |     -     -    10     7     -     -     -     - |  287    115
 WILL |     -    10    31    18     -     -     -     - |  288   9670
 YAR2 |     -    12    58    37     -     -     -     - |  288   1647
 YELL |     -    51    49    91     -     -     -     - |  288    300
 -----+-------------------------------------------------+-------------
 TOT  | 74233    30    40    28   282 76146 74197     - |
