
 cls-file Version 2.0
 GPS week: 0781   Day: 4   MJD: 49715                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2262      0    3083  -10949  75911  75911      0  77464  77464      0    0.00
 gf1 |   288     0  21355      0    5196   -6920      0      0      0      0      0      0  100.00
 igf |    96     0   2354      4    3414  -10305    644    644      0   1189   1189      0    0.00
 ng1 |    96     0   2358      0    9260  -11981  76514  76514      0  78566  78566      0    0.00
 pd1 |    96     0   2262      0    3038  -10938  75851  75851      0  77406  77406      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------+
    1 |  1025     0   646 17145  1123     - |
    2 | -1279     0  -589-14767 -1189     - |
    4 | -5495     0   216  2375 -4725     - |
    5 |  2825     0  -558 -2146  3088     - |
    6 |   -26     0 -1177  6288  -402     - |
    7 |  1054     0   529 15180   939     - |
    9 |   657     0    30  -613   525     - |
   12 |     -     0  3575  1363     -     - |
   14 |  -755     0  -935-13640  -473     - |
   15 |   348     0  -176 -4751   392     - |
   16 |  1473     0  -151 -7593  1004     - |
   17 | -2940     0   359  1637 -2167     - |
   18 |  1349     0   376  6707  1219     - |
   19 | -1406     0 -1634 -5623 -1437     - |
   20 | -2952     0  -324  1875 -2532     - |
   21 |  2581     0  -237-16029  2008     - |
   22 | -2130     0   890 17765 -2180     - |
   23 |  1560     0 -1119 -9781  1556     - |
   24 | -2828     0  -780 18043 -3400     - |
   25 |  -374     0    54 14540   434     - |
   26 |  1243     0   376   319  1097     - |
   27 |   827     0  -457 -5476   485     - |
   28 |   756     0   196 -6967   822     - |
   29 |  2271     0    36 -7726  2141     - |
   31 |  1829     0   893 -7265  1373     - |
 -----+-------------------------------------+
 ALBH |     -     0     -     -     -     - |
 ALGO |     -     0     -     -     -     - |
 AREQ |     -     0     -     -     -     - |
 BRMU |     -     0     -     -     -     - |
 BRUS |     -     0     -     -     -     - |
 CAS1 |     -     0     -     -     -     - |
 DAV1 |     -     0     -     -     -     - |
 DRAO |     -     0     -     -     -     - |
 FAIR |     -     0     -     -     -     - |
 GODE |     -     0     -     -     -     - |
 GOLD |     -     0     -     -     -     - |
 GRAZ |     -     0     -     -     -     - |
 HARV |     -     0     -     -     -     - |
 HERS |     -     0     -     -     -     - |
 HOB2 |     -     0     -     -     -     - |
 HOLB |     -     0     -     -     -     - |
 JOZE |     -     0     -     -     -     - |
 JPLM |     -     0     -     -     -     - |
 KERG |     -     0     -     -     -     - |
 KIRU |     -     0     -     -     -     - |
 KIT3 |     -     0     -     -     -     - |
 KOKB |     -     0     -     -     -     - |
 KOSG |     -     0     -     -     -     - |
 KOUR |     -     0     -     -     -     - |
 MAC1 |     -     0     -     -     -     - |
 MADR |     -     0     -     -     -     - |
 MAS1 |     -     0     -     -     -     - |
 MATE |     -     0     -     -     -     - |
 MDO1 |     -     0     -     -     -     - |
 METS |     -     0     -     -     -     - |
 NLIB |     -     0     -     -     -     - |
 NYAL |     -     0     -     -     -     - |
 ONSA |     -     0     -     -     -     - |
 PERT |     -     0     -     -     -     - |
 PIE1 |     -     0     -     -     -     - |
 POTS |     -     0     -     -     -     - |
 SANT |     -     0     -     -     -     - |
 SIO3 |     -     0     -     -     -     - |
 STJO |     -     0     -     -     -     - |
 TIDB |     -     0     -     -     -     - |
 TROM |     -     0     -     -     -     - |
 TSKB |     -     0     -     -     -     - |
 UCLU |     -     0     -     -     -     - |
 USUD |     -     0     -     -     -     - |
 VILL |     -     0     -     -     -     - |
 WES2 |     -     0     -     -     -     - |
 WILL |     -     0     -     -     -     - |
 YAR2 |     -     0     -     -     -     - |
 YELL |     -     0     -     -     -     - |
 ZIMM |     -     0     -     -     -     - |
 -----+-------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------+-------------
    1 | 75608     0   502 76569 75602     - |  286  79791
    2 | 80730     0   385 81696 80767     - |  277  84025
    4 | 76819     0   339 81473 76740     - |  276  85327
    5 | 82537     0   304 84476 82555     - |  276  82664
    6 | 83845     0   375 86213 83800     - |  288  83278
    7 | 83446     0  1934 84977 83451     - |  288  81452
    9 | 71478     0   438 73446 71482     - |  288  78398
   12 |     -     0  1232 15325     -     - |  288   8009
   14 | 87244     0   224 88508 87209     - |  288  85256
   15 | 15422     0   330 17068 15448     - |  276   3630
   16 | 82618     0   559 83748 82507     - |  284  81492
   17 | 75155     0   925 80070 74623     - |  276  80367
   18 | 68322     0   411 70295 68297     - |  288  79221
   19 | 73422     0   338 80377 73414     - |  288  82902
   20 | 81611     0   502 83220 81404     - |  276  78963
   21 | 82800     0   455 85555 82552     - |  288  77757
   22 | 85613     0   501 88583 85629     - |  270  83512
   23 | 67846     0   904 70109 67842     - |  274  72079
   24 | 80020     0   409 82309 80073     - |  277  84786
   25 | 86504     0   399 88015 86397     - |  288  82431
   26 | 75220     0   354 76243 75210     - |  288  81322
   27 | 88016     0   393 89100 87966     - |  288  91970
   28 | 15519     0   502 15779 15546     - |  288   1609
   29 | 74659     0   311 75440 74605     - |  288  79294
   31 | 82173     0   434 85144 82161     - |  288  82379
 -----+-------------------------------------+-------------
 ALBH |     -     0     -     -     -     - |  288   4216
 ALGO |     -     0     -     -     -     - |  288      0
 AREQ |     -     0     -     -     -     - |  288  31126
 BRMU |     -     0     -     -     -     - |  288    >>>
 BRUS |     -     0     -     -     -     - |  288    164
 CAS1 |     -     0     -     -     -     - |  284  10351
 DAV1 |     -     0     -     -     -     - |  264   6320
 DRAO |     -     0     -     -     -     - |  288    651
 FAIR |     -     0     -     -     -     - |  272   2141
 GODE |     -     0     -     -     -     - |  288    446
 GOLD |     -     0     -     -     -     - |  287     73
 GRAZ |     -     0     -     -     -     - |  288   1078
 HARV |     -     0     -     -     -     - |  288   4421
 HERS |     -     0     -     -     -     - |  288 177667
 HOB2 |     -     0     -     -     -     - |  287    181
 HOLB |     -     0     -     -     -     - |  288   7052
 JOZE |     -     0     -     -     -     - |  286  27127
 JPLM |     -     0     -     -     -     - |  288  37307
 KERG |     -     0     -     -     -     - |  288 344220
 KIRU |     -     0     -     -     -     - |  279   3116
 KIT3 |     -     0     -     -     -     - |  287 507885
 KOKB |     -     0     -     -     -     - |  286    966
 KOSG |     -     0     -     -     -     - |  288   4858
 KOUR |     -     0     -     -     -     - |  288    471
 MAC1 |     -     0     -     -     -     - |  287  37108
 MADR |     -     0     -     -     -     - |  284     68
 MAS1 |     -     0     -     -     -     - |  288   5083
 MATE |     -     0     -     -     -     - |  288    234
 MDO1 |     -     0     -     -     -     - |  288    935
 METS |     -     0     -     -     -     - |  288    443
 NLIB |     -     0     -     -     -     - |  288     25
 NYAL |     -     0     -     -     -     - |  287    187
 ONSA |     -     0     -     -     -     - |  288    113
 PERT |     -     0     -     -     -     - |  288  15431
 PIE1 |     -     0     -     -     -     - |  288     68
 POTS |     -     0     -     -     -     - |  285    >>>
 SANT |     -     0     -     -     -     - |  288     76
 SIO3 |     -     0     -     -     -     - |  287    >>>
 STJO |     -     0     -     -     -     - |  287   8707
 TIDB |     -     0     -     -     -     - |  287    175
 TROM |     -     0     -     -     -     - |  274    819
 TSKB |     -     0     -     -     -     - |  288   1463
 UCLU |     -     0     -     -     -     - |  288  16672
 USUD |     -     0     -     -     -     - |  288    543
 VILL |     -     0     -     -     -     - |  281   1546
 WES2 |     -     0     -     -     -     - |  288    172
 WILL |     -     0     -     -     -     - |  288   1020
 YAR2 |     -     0     -     -     -     - |  288   2973
 YELL |     -     0     -     -     -     - |  257     99
 ZIMM |     -     0     -     -     -     - |  287    >>>
 -----+-------------------------------------+-------------
 TOT  | 75911     0   644 76515 75852     - |
