
 cls-file Version 2.0
 GPS week: 0781   Day: 2   MJD: 49713                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2255      0    3126  -21351  73837  73837      0  75192  75192      0    0.00
 gf1 |   288     0  20756      0   -3712  -17892      0      0      0      0      0      0  100.00
 igf |    96     0   2347      4    3341  -22067    718    718      0   1109   1109      0    0.00
 ng1 |    96     0   2347      0   -1830  -15948  74447  74447      0  76346  76346      0    0.00
 pd1 |    96     0   2255      0    3057  -21327  73802  73802      0  75161  75161      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   ng1   pd1   si1 |
 -----+-------------------------------------+
    1 |  1134     0   936   868  1752     - |
    2 |  -856     0  -320 15634 -1071     - |
    4 |  1257     0   238-12478  1044     - |
    5 |   782     0  -448  4585   606     - |
    6 |  -722     0 -1462 -3690 -1436     - |
    7 |  -517     0  -206 10405  -816     - |
    9 |  -397     0   189  5578  -679     - |
   12 |     -     0  1547  -837     -     - |
   14 |   983     0  -477 -1983  1258     - |
   15 |  -246     0    59  2979  -153     - |
   16 |  -790     0  -162 -5060  -648     - |
   17 |  2433     0    59 18140  2794     - |
   18 |  -542     0   657  8152  -889     - |
   19 | -1178     0 -1573-10217  -833     - |
   20 | -2395     0  -441 -9026 -2673     - |
   21 |  -376     0  -347 -1069  -264     - |
   22 |  2303     0  1342 -2745  2407     - |
   23 |  -659     0  -757  4530 -1026     - |
   24 | -1229     0  -880  4284  -701     - |
   25 |  2287     0   135-12468  1669     - |
   26 |   235     0   469 -7665   525     - |
   27 |  -798     0  -235  6122  -791     - |
   28 |   223     0   393  6802   291     - |
   29 | -1107     0   345  1120  -854     - |
   31 |   563     0   959-20497   924     - |
 -----+-------------------------------------+
 ALBH |     -     0     -     -     -     - |
 ALGO |     -     0     -     -     -     - |
 BRMU |     -     0     -     -     -     - |
 BRUS |     -     0     -     -     -     - |
 CAS1 |     -     0     -     -     -     - |
 DAV1 |     -     0     -     -     -     - |
 DRAO |     -     0     -     -     -     - |
 FAIR |     -     0     -     -     -     - |
 GODE |     -     0     -     -     -     - |
 GOLD |     -     0     -     -     -     - |
 GRAZ |     -     0     -     -     -     - |
 HARV |     -     0     -     -     -     - |
 HERS |     -     0     -     -     -     - |
 HOB2 |     -     0     -     -     -     - |
 HOLB |     -     0     -     -     -     - |
 JOZE |     -     0     -     -     -     - |
 JPLM |     -     0     -     -     -     - |
 KERG |     -     0     -     -     -     - |
 KIRU |     -     0     -     -     -     - |
 KIT3 |     -     0     -     -     -     - |
 KOKB |     -     0     -     -     -     - |
 KOSG |     -     0     -     -     -     - |
 LAMA |     -     0     -     -     -     - |
 MAC1 |     -     0     -     -     -     - |
 MADR |     -     0     -     -     -     - |
 MAS1 |     -     0     -     -     -     - |
 MATE |     -     0     -     -     -     - |
 MDO1 |     -     0     -     -     -     - |
 METS |     -     0     -     -     -     - |
 NLIB |     -     0     -     -     -     - |
 NYAL |     -     0     -     -     -     - |
 ONSA |     -     0     -     -     -     - |
 PERT |     -     0     -     -     -     - |
 PIE1 |     -     0     -     -     -     - |
 POTS |     -     0     -     -     -     - |
 SANT |     -     0     -     -     -     - |
 SIO3 |     -     0     -     -     -     - |
 STJO |     -     0     -     -     -     - |
 TIDB |     -     0     -     -     -     - |
 TROM |     -     0     -     -     -     - |
 TSKB |     -     0     -     -     -     - |
 UCLU |     -     0     -     -     -     - |
 USUD |     -     0     -     -     -     - |
 VILL |     -     0     -     -     -     - |
 WES2 |     -     0     -     -     -     - |
 WILL |     -     0     -     -     -     - |
 YAR2 |     -     0     -     -     -     - |
 YELL |     -     0     -     -     -     - |
 ZIMM |     -     0     -     -     -     - |
 -----+-------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   ng1   pd1   si1 | NEPO    RMS
 -----+-------------------------------------+-------------
    1 | 71650     0   611 73957 71644     - |  287  76594
    2 | 74728     0   429 76389 74611     - |  275  76450
    4 | 68804     0   596 72290 68707     - |  276  82535
    5 | 83666     0   373 85073 83688     - |  275  83055
    6 | 72161     0   535 77462 72058     - |  288  78636
    7 | 70394     0   713 71304 70412     - |  288  75773
    9 | 77173     0   587 78207 77215     - |  287  81121
   12 |     -     0  2285 14541     -     - |  282   6401
   14 | 78558     0   394 79588 78535     - |  270  79123
   15 | 14058     0   780 16630 14059     - |  277   2389
   16 | 76823     0   636 77837 76784     - |  284  83692
   17 | 75078     0   924 77813 75178     - |  277  87638
   18 | 68322     0   415 70875 68306     - |  287  75611
   19 | 86078     0   417 89188 86128     - |  288  86812
   20 | 78067     0   413 78515 78123     - |  277  79138
   21 | 85967     0   568 90150 85946     - |  281  78977
   22 | 94877     0   837 95555 94840     - |  277  86250
   23 | 74366     0   757 76306 74295     - |  271  79986
   24 | 74321     0   610 78010 74083     - |  276  79956
   25 | 80885     0   423 84236 80601     - |  288  87817
   26 | 81045     0   583 82272 81054     - |  288  83388
   27 | 81330     0   477 82225 81333     - |  288  78757
   28 | 14095     0   511 16274 14105     - |  288   2043
   29 | 68635     0   460 71612 68552     - |  288  79255
   31 | 74818     0   477 75961 74827     - |  288  80280
 -----+-------------------------------------+-------------
 ALBH |     -     0     -     -     -     - |  288   6410
 ALGO |     -     0     -     -     -     - |  288      0
 BRMU |     -     0     -     -     -     - |  288    >>>
 BRUS |     -     0     -     -     -     - |  288    140
 CAS1 |     -     0     -     -     -     - |  287   2104
 DAV1 |     -     0     -     -     -     - |  257  10529
 DRAO |     -     0     -     -     -     - |  288    805
 FAIR |     -     0     -     -     -     - |  288     75
 GODE |     -     0     -     -     -     - |  288     93
 GOLD |     -     0     -     -     -     - |  193     49
 GRAZ |     -     0     -     -     -     - |  145    684
 HARV |     -     0     -     -     -     - |  288  14545
 HERS |     -     0     -     -     -     - |  288 156339
 HOB2 |     -     0     -     -     -     - |  287    253
 HOLB |     -     0     -     -     -     - |  288   9172
 JOZE |     -     0     -     -     -     - |  286  16042
 JPLM |     -     0     -     -     -     - |  288  25589
 KERG |     -     0     -     -     -     - |  288 309300
 KIRU |     -     0     -     -     -     - |  288   1908
 KIT3 |     -     0     -     -     -     - |  286 106013
 KOKB |     -     0     -     -     -     - |  288    122
 KOSG |     -     0     -     -     -     - |  288  46681
 LAMA |     -     0     -     -     -     - |  288  40280
 MAC1 |     -     0     -     -     -     - |  286   8355
 MADR |     -     0     -     -     -     - |  288     50
 MAS1 |     -     0     -     -     -     - |  288   3551
 MATE |     -     0     -     -     -     - |  288    136
 MDO1 |     -     0     -     -     -     - |  288    480
 METS |     -     0     -     -     -     - |  288    400
 NLIB |     -     0     -     -     -     - |  288     30
 NYAL |     -     0     -     -     -     - |  193  62414
 ONSA |     -     0     -     -     -     - |  288    104
 PERT |     -     0     -     -     -     - |  288  45673
 PIE1 |     -     0     -     -     -     - |  288     69
 POTS |     -     0     -     -     -     - |  288  80201
 SANT |     -     0     -     -     -     - |  288    969
 SIO3 |     -     0     -     -     -     - |  287    >>>
 STJO |     -     0     -     -     -     - |  272   2129
 TIDB |     -     0     -     -     -     - |  288     69
 TROM |     -     0     -     -     -     - |  285   4112
 TSKB |     -     0     -     -     -     - |  288   1222
 UCLU |     -     0     -     -     -     - |  288   6105
 USUD |     -     0     -     -     -     - |  288    382
 VILL |     -     0     -     -     -     - |  288   1956
 WES2 |     -     0     -     -     -     - |  288    307
 WILL |     -     0     -     -     -     - |  288   2972
 YAR2 |     -     0     -     -     -     - |  285 381349
 YELL |     -     0     -     -     -     - |  280    129
 ZIMM |     -     0     -     -     -     - |  284    >>>
 -----+-------------------------------------+-------------
 TOT  | 73837     0   718 74448 73803     - |
