
 cls-file Version 2.0
 GPS week: 0772   Day: 2   MJD: 49650                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2265      0    -662     561  75630  75630      0  77206  77206      0    0.00
 gf1 |   288     0  19399      0   -2825   -5733      0      0      0      0      0      0  100.00
 igf |    96     0   2265      1    -443     -18    512    512      0    889    889      0    0.00
 pd1 |    96     0   2265      0    -744     587  75588  75588      0  77157  77157      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |  2343     0   439  1969     - |
    2 |  1638     0   -75  1438     - |
    4 |   134     0   188   125     - |
    5 |    87     0  -213   158     - |
    6 |   267     0  -818   212     - |
    7 |  3508     0   463  3306     - |
    9 |  -144     0   116   -20     - |
   14 | -2215     0  -661 -2020     - |
   15 |    61     0   144   108     - |
   16 |   260     0    46   494     - |
   17 |   488     0   -64   476     - |
   18 |   197     0   345   658     - |
   19 | -2252     0 -1453 -1739     - |
   20 |  1306     0  -149   385     - |
   21 | -2262     0  -289 -1586     - |
   22 |   266     0  1157    -3     - |
   23 |  -428     0  -996  -819     - |
   24 | -1154     0  -595  -982     - |
   25 | -1526     0   365 -1403     - |
   26 |   644     0   418   793     - |
   27 |  -370     0  -250  -549     - |
   28 |   292     0   573   396     - |
   29 |  1983     0   122  1535     - |
   31 | -1145     0  1180 -1058     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 CAS1 |     -     0     -     -     - |
 DAV1 |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KIT3 |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MAC1 |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MAS1 |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 UCLU |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 86691     0   328 86553     - |  270  83129
    2 | 86671     0   649 86608     - |  288  86636
    4 | 85091     0   542 85094     - |  288  81250
    5 | 75142     0   505 75145     - |  288  79427
    6 | 76036     0   628 76012     - |  277  86568
    7 | 80490     0   561 80547     - |  276  78937
    9 | 82978     0   551 82969     - |  288  79905
   14 | 77872     0   343 77795     - |  288  80996
   15 | 15677     0   458 15661     - |  287   2582
   16 | 86922     0   554 86929     - |  288  77856
   17 | 76070     0   765 76069     - |  288  79502
   18 | 74559     0   467 74546     - |  288  81404
   19 | 73991     0   530 73876     - |  286  83483
   20 | 62599     0   421 62359     - |  288  76597
   21 | 77463     0   470 77159     - |  288  83263
   22 | 90361     0   540 90374     - |  282  89184
   23 | 82434     0   446 82487     - |  262  79830
   24 | 79867     0   521 79841     - |  288  80911
   25 | 86524     0   461 86547     - |  281  80951
   26 | 76826     0   312 76797     - |  287  78794
   27 | 71205     0   577 71224     - |  288  80187
   28 | 15751     0   532 15713     - |  275   2091
   29 | 71352     0   434 71176     - |  288  79542
   31 | 77487     0   517 77499     - |  276  75340
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   4247
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  288  74038
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  288    206
 CAS1 |     -     0     -     -     - |  279   3592
 DAV1 |     -     0     -     -     - |  287   4064
 DRAO |     -     0     -     -     - |  288    579
 FAIR |     -     0     -     -     - |  274   1437
 GODE |     -     0     -     -     - |  283 152798
 GOLD |     -     0     -     -     - |  287     74
 GRAZ |     -     0     -     -     - |  288    512
 HERS |     -     0     -     -     - |  288 656049
 HOLB |     -     0     -     -     - |  288   1876
 JOZE |     -     0     -     -     - |  286   5232
 JPLM |     -     0     -     -     - |  288  19476
 KIRU |     -     0     -     -     - |  288   2381
 KIT3 |     -     0     -     -     - |  286 131647
 KOKB |     -     0     -     -     - |  288     89
 KOSG |     -     0     -     -     - |  288    565
 KOUR |     -     0     -     -     - |  288   1936
 MAC1 |     -     0     -     -     - |  287   5139
 MADR |     -     0     -     -     - |  286     73
 MAS1 |     -     0     -     -     - |  288   6187
 MATE |     -     0     -     -     - |  288    129
 MDO1 |     -     0     -     -     - |  288    867
 METS |     -     0     -     -     - |  288     95
 NLIB |     -     0     -     -     - |  284    >>>
 NYAL |     -     0     -     -     - |  288    620
 ONSA |     -     0     -     -     - |  288    118
 PERT |     -     0     -     -     - |  288 355634
 PIE1 |     -     0     -     -     - |  288    132
 SANT |     -     0     -     -     - |  288     73
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288   4324
 TROM |     -     0     -     -     - |  288   3063
 TSKB |     -     0     -     -     - |  288    535
 UCLU |     -     0     -     -     - |  288   3759
 USUD |     -     0     -     -     - |  285  94596
 WES2 |     -     0     -     -     - |  288     45
 WILL |     -     0     -     -     - |  288   2631
 YAR2 |     -     0     -     -     - |  288   1578
 YELL |     -     0     -     -     - |  258    242
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 75631     0   512 75589     - |
