
 cls-file Version 2.0
 GPS week: 0768   Day: 5   MJD: 49625                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2182      0   -1305    -455  72763  72763      0  74455  74455      0    0.00
 gf1 |   288     0  18717      0   -2352    2684      0      0      0      0      0      0  100.00
 igf |    96     0   2274      8    -702    -666    554    554      0   1100   1100      0    0.00
 pd1 |    96     0   2182      0   -1163    -415  72748  72748      0  74438  74438      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |  3884     0   819  2964     - |
    2 |  -138     0  -676 -1051     - |
    4 | -2597     0  -261 -2301     - |
    5 |    -7     0  -454   447     - |
    6 |  1771     0  -849  1724     - |
    7 |   971     0   162  1255     - |
    9 | -1396     0    66 -1418     - |
   12 |     -     0  3055     -     - |
   14 | -1094     0 -1029  -685     - |
   15 |   749     0   275   581     - |
   16 |   922     0   124   723     - |
   17 |  2375     0   397  2292     - |
   18 |  -991     0    33 -1104     - |
   19 | -1258     0 -1837 -1027     - |
   20 |  1610     0  -235  1158     - |
   21 | -2987     0   122 -2517     - |
   22 |   821     0   701  1424     - |
   23 |   714     0  -563   535     - |
   24 |  -119     0  -602   135     - |
   25 | -1357     0  -183 -1063     - |
   26 | -2670     0   259 -3012     - |
   27 |   -52     0  -522   631     - |
   28 |  1098     0   630   906     - |
   29 |  3498     0   -47  2984     - |
   31 | -1430     0   933 -1218     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 CAS1 |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOB2 |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIT3 |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MAC1 |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MAS1 |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 UCLU |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 81455     0   539 81113     - |  222  85117
    2 | 82092     0   796 82207     - |  286  81307
    4 | 79788     0   446 79783     - |  277  78674
    5 | 78963     0   448 79003     - |  288  83536
    6 | 72985     0   440 72986     - |  276  81296
    7 | 73537     0   470 73539     - |  226  76273
    9 | 78352     0   322 78349     - |  283  82814
   12 |     -     0   454     -     - |  288   3862
   14 | 80878     0   550 80848     - |  288  81373
   15 | 16039     0   293 16050     - |  281   2292
   16 | 87758     0   582 87809     - |  266  86467
   17 | 75808     0   337 75792     - |  283  84528
   18 | 76326     0   546 76361     - |  276  82047
   19 | 69775     0   478 69779     - |  283  77829
   20 | 66723     0   364 66550     - |  288  83104
   21 | 72019     0   496 71994     - |  273  81872
   22 | 71580     0   373 71512     - |  286  79795
   23 | 82703     0   643 82707     - |  241  79746
   24 | 74300     0   333 74323     - |  273  78848
   25 | 79476     0  1285 79377     - |  280  79764
   26 | 76404     0   666 76475     - |  262  83316
   27 | 76907     0   754 76964     - |  288  82106
   28 | 16417     0   262 16354     - |  267   1571
   29 | 71272     0   578 71204     - |  277  78369
   31 | 66598     0   466 66617     - |  263  83021
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   5588
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  213  70067
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  288    193
 CAS1 |     -     0     -     -     - |  258   2646
 DRAO |     -     0     -     -     - |  288    728
 FAIR |     -     0     -     -     - |  288     95
 GODE |     -     0     -     -     - |  288    228
 GOLD |     -     0     -     -     - |  275    202
 HARV |     -     0     -     -     - |  288   2786
 HERS |     -     0     -     -     - |  288 105026
 HOB2 |     -     0     -     -     - |  259    521
 HOLB |     -     0     -     -     - |  288   7083
 JOZE |     -     0     -     -     - |  264    >>>
 JPLM |     -     0     -     -     - |  288  15619
 KIT3 |     -     0     -     -     - |  288 108465
 KOKB |     -     0     -     -     - |  288    375
 KOUR |     -     0     -     -     - |  288   2840
 MAC1 |     -     0     -     -     - |  287  12098
 MADR |     -     0     -     -     - |  288    505
 MAS1 |     -     0     -     -     - |  288   6341
 MDO1 |     -     0     -     -     - |  288   1384
 METS |     -     0     -     -     - |  283   1265
 NLIB |     -     0     -     -     - |  288    134
 NYAL |     -     0     -     -     - |  288    539
 ONSA |     -     0     -     -     - |  288    103
 PERT |     -     0     -     -     - |  288  22646
 PIE1 |     -     0     -     -     - |  288    175
 SANT |     -     0     -     -     - |  288    105
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288    731
 TIDB |     -     0     -     -     - |  287     67
 TROM |     -     0     -     -     - |  284   1479
 TSKB |     -     0     -     -     - |  288    827
 UCLU |     -     0     -     -     - |  288   1684
 USUD |     -     0     -     -     - |  288    547
 WES2 |     -     0     -     -     - |  288    121
 WILL |     -     0     -     -     - |  288   3422
 YAR2 |     -     0     -     -     - |  288   2298
 YELL |     -     0     -     -     - |  272    174
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 72763     0   555 72749     - |
