
 cls-file Version 2.0
 GPS week: 0768   Day: 3   MJD: 49623                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   1962      0     150   -1390  74542  74542      0  76820  76820      0    0.00
 gf1 |   288     0  19912      0   -5874   -3942      0      0      0      0      0      0  100.00
 igf |    96     0   2342      1     414   -2084    883    883      0   1443   1443      0    0.00
 pd1 |    96     0   2250      0     145   -1474  73781  73781      0  75717  75717      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |  4672     0  1229  4397     - |
    2 |   -67     0   101   -56     - |
    4 | -1251     0   438 -1473     - |
    5 |   156     0  -717    79     - |
    6 | -5382     0 -2100 -4489     - |
    7 |  -375     0  -986  -540     - |
    9 |  -695     0  1438  -248     - |
   12 |     -     0   966     -     - |
   14 |     0     0   461  -166     - |
   15 |     -     0   -95   -77     - |
   16 |   544     0 -1850   762     - |
   17 |  -712     0 -1026  -252     - |
   18 |  -253     0   768  -470     - |
   19 |     -     0 -1326   104     - |
   20 |     -     0    84  -566     - |
   21 | -2016     0 -1611 -1991     - |
   22 |   760     0   893   759     - |
   23 | -2035     0  -122 -1117     - |
   24 |  -488     0  -895  -550     - |
   25 |   709     0   984   941     - |
   26 |   654     0  1384  1120     - |
   27 |   896     0  -206   306     - |
   28 |   635     0   870   674     - |
   29 |  4619     0   230  3810     - |
   31 |   228     0  1052   125     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 CAS1 |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOB2 |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIT3 |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MAC1 |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MAS1 |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 POTS |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 UCLU |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 75393     0   915 75420     - |  261  83373
    2 | 70140     0   688 70539     - |  287  80138
    4 | 74355     0   776 75031     - |  288  81178
    5 | 72965     0  1145 73347     - |  288  79851
    6 | 73163     0   931 72868     - |  276  81811
    7 | 75199     0   776 75227     - |  264  76879
    9 | 91314     0   679 91848     - |  287  89179
   12 |     -     0  1799     -     - |  288    574
   14 | 88244     0   706 88171     - |  288  83855
   15 |     -     0   770 17329     - |  288   2781
   16 | 79217     0   725 79450     - |  274  83550
   17 | 69057     0   625 68716     - |  288  78013
   18 | 70150     0   662 69991     - |  276  76409
   19 |     -     0   724 86857     - |  287  87124
   20 |     -     0   702 76471     - |  288  79400
   21 | 73014     0   684 72732     - |  288  74646
   22 | 68561     0   714 69550     - |  288  82585
   23 | 70954     0  1183 71360     - |  271  78868
   24 | 77044     0  1208 78057     - |  284  77505
   25 | 86292     0   900 86462     - |  281  87178
   26 | 75908     0  1041 75827     - |  278  77238
   27 | 81465     0   660 81031     - |  288  78494
   28 | 19034     0   772 17543     - |  274   1733
   29 | 75855     0   734 76146     - |  277  81205
   31 | 78820     0   743 78851     - |  277  78398
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   8568
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  288  75014
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  288    194
 CAS1 |     -     0     -     -     - |  285   5178
 DRAO |     -     0     -     -     - |  288    553
 FAIR |     -     0     -     -     - |  273   1441
 GODE |     -     0     -     -     - |  288 149572
 GOLD |     -     0     -     -     - |  287     94
 GRAZ |     -     0     -     -     - |  288    623
 HARV |     -     0     -     -     - |  288   7093
 HERS |     -     0     -     -     - |  288 190104
 HOB2 |     -     0     -     -     - |  269 477830
 HOLB |     -     0     -     -     - |  288    >>>
 JPLM |     -     0     -     -     - |  288  14693
 KIT3 |     -     0     -     -     - |  288 300722
 KOKB |     -     0     -     -     - |  288    145
 KOSG |     -     0     -     -     - |  288   1954
 KOUR |     -     0     -     -     - |  288   3054
 MAC1 |     -     0     -     -     - |  275  40152
 MADR |     -     0     -     -     - |  285    139
 MAS1 |     -     0     -     -     - |  288   4512
 MATE |     -     0     -     -     - |  288     95
 MDO1 |     -     0     -     -     - |  287   1296
 METS |     -     0     -     -     - |  288    204
 NLIB |     -     0     -     -     - |  288    157
 NYAL |     -     0     -     -     - |  287    126
 ONSA |     -     0     -     -     - |  288    138
 PERT |     -     0     -     -     - |  288 653956
 PIE1 |     -     0     -     -     - |  287    215
 POTS |     -     0     -     -     - |  288  63516
 SANT |     -     0     -     -     - |  288    121
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288   5502
 TIDB |     -     0     -     -     - |  286    136
 TROM |     -     0     -     -     - |  288   2061
 TSKB |     -     0     -     -     - |  288    317
 UCLU |     -     0     -     -     - |  288   3675
 USUD |     -     0     -     -     - |  288    429
 WES2 |     -     0     -     -     - |  288    183
 WILL |     -     0     -     -     - |  288   3041
 YAR2 |     -     0     -     -     - |  288   1450
 YELL |     -     0     -     -     - |  267    112
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 74543     0   883 73781     - |
