
 cls-file Version 2.0
 GPS week: 0767   Day: 0   MJD: 49613                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2269      0   -1877    5398   2842   2842      0   3158   3158      0    0.00
 gf1 |   288     0  20292      0   -2514    2960      0      0      0      0      0      0  100.00
 igf |    96     0   2046      4   -1306    3589   1208   1208      0   1539   1539      0    0.00
 pd1 |    96     0   2269      0   -1883    5399   2834   2834      0   3146   3146      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |   735     0   958   666     - |
    2 |   116     0   419    95     - |
    4 | -1527     0 -1952 -1542     - |
    5 |  -377     0    18  -326     - |
    6 | -1282     0  -948 -1270     - |
    7 |   231     0   549   221     - |
    9 |    53     0   441    85     - |
   12 |     -     0   343     -     - |
   14 |  1804     0 -1211  1805     - |
   15 |  -385     0  -294  -426     - |
   16 |  4090     0 -1575  4048     - |
   17 |  -224     0   108  -213     - |
   18 |   635     0   962   643     - |
   19 | -1697     0 -1383 -1711     - |
   20 | -1045     0  -715 -1032     - |
   21 |  -771     0  -369  -761     - |
   22 |   809     0  2744   818     - |
   23 |  -148     0   289  -130     - |
   24 | -1765     0 -1551 -1731     - |
   25 |   233     0  -352   213     - |
   26 |  -410     0   124  -380     - |
   27 |  -700     0  -384  -694     - |
   28 |  -256     0   176  -263     - |
   29 |  1421     0  1393  1439     - |
   31 |   464     0   762   449     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 CAS1 |     -     0     -     -     - |
 DAV1 |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KIT3 |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MAC1 |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MAS1 |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 POTS |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TID2 |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 UCLU |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 |  3261     0   886  3261     - |  288   5422
    2 |  1967     0   852  1973     - |  288   1936
    4 |  2339     0  2083  2358     - |  288   1624
    5 |  1617     0  1163  1555     - |  288   1760
    6 |  1242     0  1240  1239     - |  288   1085
    7 |  1750     0   942  1755     - |  264   2076
    9 |  1814     0   834  1801     - |  288   1813
   12 |     -     0  1759     -     - |  288    457
   14 |  6257     0  1304  6257     - |  272   2717
   15 |  1907     0  1177  1933     - |  279   2838
   16 |  5967     0   798  5898     - |  288   4407
   17 |  1537     0   928  1533     - |  276   2403
   18 |  2152     0  1169  2156     - |  288   2428
   19 |  1795     0   899  1796     - |  288   2149
   20 |   918     0   784   907     - |  288    693
   21 |  2576     0   994  2572     - |  283   3630
   22 |  4348     0  1109  4359     - |  287   2697
   23 |  3699     0  2064  3663     - |  283   4561
   24 |  1386     0  1049  1427     - |  287   1005
   25 |  4170     0   772  4159     - |  288   2623
   26 |  2369     0  1815  2335     - |  287   1793
   27 |  1602     0   696  1599     - |  284   2413
   28 |  1284     0   797  1290     - |  284   1543
   29 |  2328     0  2019  2344     - |  287   1159
   31 |  1633     0  1195  1637     - |  276   2841
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   5190
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  288  21209
 BRMU |     -     0     -     -     - |  287    >>>
 BRUS |     -     0     -     -     - |  288    181
 CAS1 |     -     0     -     -     - |  284  17925
 DAV1 |     -     0     -     -     - |  287   7658
 DRAO |     -     0     -     -     - |  288    899
 FAIR |     -     0     -     -     - |  269   1531
 GODE |     -     0     -     -     - |  288    349
 GOLD |     -     0     -     -     - |  288     72
 GRAZ |     -     0     -     -     - |  288    570
 HARV |     -     0     -     -     - |  288   6785
 HOLB |     -     0     -     -     - |  288  29497
 JOZE |     -     0     -     -     - |  286 171671
 JPLM |     -     0     -     -     - |  288  14999
 KIRU |     -     0     -     -     - |  288   2804
 KIT3 |     -     0     -     -     - |  287 135776
 KOKB |     -     0     -     -     - |  288    130
 KOSG |     -     0     -     -     - |  288    978
 KOUR |     -     0     -     -     - |  288   2023
 MAC1 |     -     0     -     -     - |  287  37697
 MADR |     -     0     -     -     - |  287    114
 MAS1 |     -     0     -     -     - |  288   3548
 MATE |     -     0     -     -     - |  288     84
 MDO1 |     -     0     -     -     - |  288   1484
 METS |     -     0     -     -     - |  288     65
 NLIB |     -     0     -     -     - |  287    110
 NYAL |     -     0     -     -     - |  288    102
 ONSA |     -     0     -     -     - |  285     96
 PERT |     -     0     -     -     - |  288  31339
 PIE1 |     -     0     -     -     - |  288    152
 POTS |     -     0     -     -     - |  288  30005
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  287  14466
 TID2 |     -     0     -     -     - |  281     88
 TIDB |     -     0     -     -     - |  284     92
 TROM |     -     0     -     -     - |  288   1600
 TSKB |     -     0     -     -     - |  288    659
 UCLU |     -     0     -     -     - |  288   5086
 USUD |     -     0     -     -     - |  288   1030
 WES2 |     -     0     -     -     - |  288    182
 WILL |     -     0     -     -     - |  288   4688
 YAR2 |     -     0     -     -     - |  288   2471
 YELL |     -     0     -     -     - |  275    308
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  |  2842     0  1209  2834     - |
