
 cls-file Version 2.0
 GPS week: 0766   Day: 4   MJD: 49610                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2085      0   -1525    2145  71973  71973      0  73852  73852      0    0.00
 gf1 |   288     0  20388      0    -413  -12104      0      0      0      0      0      0  100.00
 igf |    96     0   2277      6   -1653    1720   1013   1013      0   1725   1725      0    0.00
 pd1 |    96     0   2181      0   -1560    2080  71947  71947      0  73809  73809      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |  1521     0  1265  1075     - |
    2 | -2648     0 -1209 -2654     - |
    4 |  1749     0   917  1529     - |
    5 |  1248     0  -620   849     - |
    6 | -1984     0  -894 -1482     - |
    7 |   635     0   765  1633     - |
    9 |  1430     0   405  1412     - |
   12 |     -     0  2691     -     - |
   14 |  -324     0   562 -1049     - |
   15 | -1512     0 -1398 -1491     - |
   16 |  -477     0  -325  -265     - |
   17 |  1076     0  -710  1252     - |
   18 |   394     0   783   598     - |
   19 | -3423     0 -2273 -3154     - |
   20 |  2226     0  1353  1937     - |
   21 | -3330     0 -1682 -2934     - |
   22 |    17     0  -150    40     - |
   23 | -1873     0  -184 -1540     - |
   24 |   544     0 -2158   751     - |
   25 |   890     0   942   717     - |
   26 |     -     0   -63  -501     - |
   27 |  1092     0  1119   821     - |
   28 |   650     0   875   709     - |
   31 |   810     0  -172   329     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 CAS1 |     -     0     -     -     - |
 DAV1 |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOB2 |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KIT3 |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MAC1 |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MAS1 |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 POTS |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TID2 |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 UCLU |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 71759     0  1138 72092     - |  288  78344
    2 | 71309     0   656 71070     - |  288  79413
    4 | 78018     0   612 77701     - |  270  85248
    5 | 73368     0   900 73678     - |  288  79823
    6 | 82917     0  1134 83189     - |  288  83569
    7 | 83693     0  1027 83056     - |  277  80439
    9 | 67692     0  1279 68162     - |  288  75007
   12 |     -     0  1410     -     - |  288   1540
   14 | 70520     0   661 70261     - |  282  83083
   15 | 16423     0   865 16135     - |  279   2648
   16 | 83247     0   820 83141     - |  288  82415
   17 | 65874     0   818 65758     - |  283  79350
   18 | 70527     0  1281 70734     - |  288  79248
   19 | 85166     0  2009 85367     - |  286  79220
   20 | 73501     0   818 73653     - |  288  78751
   21 | 83100     0   687 82309     - |  287  79509
   22 | 70430     0  1109 70784     - |  287  81068
   23 | 72375     0   712 71753     - |  277  75143
   24 | 76449     0  1045 76729     - |  277  96264
   25 | 82282     0   916 82740     - |  288  80135
   26 |     -     0   902 71625     - |  288  78484
   27 | 69820     0   749 69968     - |  288  82145
   28 | 16372     0   904 16227     - |  287   2580
   31 | 77042     0   869 77226     - |  288  85729
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   6289
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  288  85038
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  287    245
 CAS1 |     -     0     -     -     - |  285   2090
 DAV1 |     -     0     -     -     - |  286   3024
 DRAO |     -     0     -     -     - |  288    456
 FAIR |     -     0     -     -     - |  287    212
 GODE |     -     0     -     -     - |  288    164
 GOLD |     -     0     -     -     - |  288    171
 GRAZ |     -     0     -     -     - |  287    711
 HARV |     -     0     -     -     - |  288   2225
 HERS |     -     0     -     -     - |  288 373192
 HOB2 |     -     0     -     -     - |  287    581
 HOLB |     -     0     -     -     - |  288   2455
 JOZE |     -     0     -     -     - |  286  11525
 JPLM |     -     0     -     -     - |  288  33381
 KIRU |     -     0     -     -     - |  288   2943
 KIT3 |     -     0     -     -     - |  213    >>>
 KOKB |     -     0     -     -     - |  288    456
 KOSG |     -     0     -     -     - |  288    925
 KOUR |     -     0     -     -     - |  288   1880
 MAC1 |     -     0     -     -     - |  287  14796
 MADR |     -     0     -     -     - |  216   1488
 MAS1 |     -     0     -     -     - |  284    >>>
 MATE |     -     0     -     -     - |  288    293
 MDO1 |     -     0     -     -     - |  288   1071
 METS |     -     0     -     -     - |  288    233
 NLIB |     -     0     -     -     - |  288    101
 NYAL |     -     0     -     -     - |  286    152
 ONSA |     -     0     -     -     - |  207    156
 PERT |     -     0     -     -     - |  288  14873
 PIE1 |     -     0     -     -     - |  288    110
 POTS |     -     0     -     -     - |  288  85924
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288   9894
 TID2 |     -     0     -     -     - |  288    175
 TIDB |     -     0     -     -     - |  286    181
 TROM |     -     0     -     -     - |  288   1006
 TSKB |     -     0     -     -     - |  288    508
 UCLU |     -     0     -     -     - |  287   2841
 USUD |     -     0     -     -     - |  288    471
 WES2 |     -     0     -     -     - |  288    171
 WILL |     -     0     -     -     - |  288   2402
 YAR2 |     -     0     -     -     - |  288   1338
 YELL |     -     0     -     -     - |  267    290
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 71973     0  1013 71948     - |
