
 cls-file Version 2.0
 GPS week: 0766   Day: 3   MJD: 49609                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2254      0     -63    -482  72955  72955      0  74393  74393      0    0.00
 gf1 |   288     0  19404      0   -3302   -2315      0      0      0      0      0      0  100.00
 igf |    96     0   2334     10    -172    -513   1005   1005      0   1619   1619      0    0.00
 pd1 |    96     0   2254      0      -4    -496  72926  72926      0  74363  74363      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |  3773     0   441  3422     - |
    2 |  1877     0   940  1567     - |
    4 |  -786     0  -403  -547     - |
    5 |   977     0  -115  1015     - |
    6 | -1491     0  -515 -1362     - |
    7 |  2275     0   907  2458     - |
    9 |   516     0   474   659     - |
   12 |     -     0  1911     -     - |
   14 |  2169     0  -916  1985     - |
   15 |  -320     0  -332  -392     - |
   16 |  1617     0   633  2311     - |
   17 |  2027     0  1270  1909     - |
   18 |    43     0    66  -222     - |
   19 | -4143     0 -2867 -4030     - |
   20 |  -358     0   -89  -539     - |
   21 |  -727     0 -1190 -1465     - |
   22 |  3205     0  1046  3178     - |
   23 | -3810     0 -1289 -3687     - |
   24 |  -522     0 -1368  -750     - |
   25 |  1258     0   523   764     - |
   26 | -6223     0   720 -6031     - |
   27 |  -608     0  -296  -356     - |
   28 |   135     0   459    58     - |
   29 | -2160     0  -525 -1471     - |
   31 |  1191     0   516  1418     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 CAS1 |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOB2 |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MAC1 |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MAS1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 POTS |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TID2 |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 UCLU |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 72062     0  1714 72039     - |  268  76714
    2 | 75727     0   966 75608     - |  282  85392
    4 | 77507     0   896 77506     - |  288  89727
    5 | 81589     0  1441 81594     - |  288  85686
    6 | 77817     0  1179 77788     - |  288  76223
    7 | 74773     0   775 74831     - |  278  78912
    9 | 77585     0   737 77601     - |  286  81371
   12 |     -     0  1499     -     - |  288   1042
   14 | 82971     0   637 82966     - |  269  84252
   15 | 14182     0   823 14185     - |  276   1987
   16 | 79024     0   939 79004     - |  286  80107
   17 | 79627     0   763 79633     - |  281  84496
   18 | 76957     0  1144 76955     - |  288  80030
   19 | 73643     0   945 73627     - |  286  82835
   20 | 67416     0   942 67424     - |  288  81490
   21 | 74707     0   864 74663     - |  288  83525
   22 | 68774     0  1104 68767     - |  287  74777
   23 | 80660     0  1069 80644     - |  266  81977
   24 | 63874     0  1229 63829     - |  277  78119
   25 | 89446     0   763 89357     - |  281  85282
   26 | 75507     0   868 75439     - |  277  77161
   27 | 79247     0   777 79233     - |  288  81066
   28 | 14469     0   704 14462     - |  283   1871
   29 | 74066     0   849 73860     - |  288  81223
   31 | 74667     0   834 74622     - |  283  87449
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   6099
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  288  73341
 BRMU |     -     0     -     -     - |  283    >>>
 BRUS |     -     0     -     -     - |  288    151
 CAS1 |     -     0     -     -     - |  283   3930
 DRAO |     -     0     -     -     - |  288    476
 FAIR |     -     0     -     -     - |  288     46
 GODE |     -     0     -     -     - |  288    124
 GOLD |     -     0     -     -     - |  285    460
 GRAZ |     -     0     -     -     - |  287    981
 HARV |     -     0     -     -     - |  288   2249
 HERS |     -     0     -     -     - |  288 251012
 HOB2 |     -     0     -     -     - |  240  79635
 HOLB |     -     0     -     -     - |  288   4389
 JOZE |     -     0     -     -     - |  286  20860
 JPLM |     -     0     -     -     - |  288  30313
 KIRU |     -     0     -     -     - |  288   3214
 KOKB |     -     0     -     -     - |  288     72
 KOSG |     -     0     -     -     - |  232   1163
 KOUR |     -     0     -     -     - |  288   2687
 MAC1 |     -     0     -     -     - |  287   3036
 MADR |     -     0     -     -     - |  216    >>>
 MAS1 |     -     0     -     -     - |  282    >>>
 METS |     -     0     -     -     - |  288    100
 NLIB |     -     0     -     -     - |  288     63
 NYAL |     -     0     -     -     - |  246   3178
 ONSA |     -     0     -     -     - |  208    152
 PERT |     -     0     -     -     - |  288  16218
 PIE1 |     -     0     -     -     - |  288    133
 POTS |     -     0     -     -     - |  287 899331
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288   2908
 TID2 |     -     0     -     -     - |  288     58
 TIDB |     -     0     -     -     - |  287    152
 TROM |     -     0     -     -     - |  288   2595
 TSKB |     -     0     -     -     - |  288    554
 UCLU |     -     0     -     -     - |  288   2104
 USUD |     -     0     -     -     - |  287    749
 WES2 |     -     0     -     -     - |  288    119
 WILL |     -     0     -     -     - |  288   2617
 YAR2 |     -     0     -     -     - |  288   1200
 YELL |     -     0     -     -     - |  288    244
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 72955     0  1006 72927     - |
