
 cls-file Version 2.0
 GPS week: 0766   Day: 1   MJD: 49607                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   1996      0   -3136    7683  72598  72598      0  73988  73988      0    0.00
 gf1 |   288     0  19336      0   -2181    5353      0      0      0      0      0      0  100.00
 igf |    96     0   2372      3   -3086    7388   1110   1110      0   1737   1737      0    0.00
 pd1 |    96     0   2278      0   -3573    8055  73736  73736      0  74874  74874      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |  1267     0    75  1481     - |
    2 |     -     0 -1508  -154     - |
    4 |  1396     0   550  1287     - |
    5 | -1219     0  -934 -1219     - |
    6 |  -782     0   207  -152     - |
    7 |  1257     0  -478  1318     - |
    9 |  -613     0   -31   -49     - |
   12 |     -     0  2997     -     - |
   14 | -1577     0  -470 -1382     - |
   15 |   187     0   268   394     - |
   16 |     -     0   869  -780     - |
   17 |  1222     0  -144  1666     - |
   18 |    75     0   280   197     - |
   19 |     -     0 -3711 -3817     - |
   20 |   380     0  1221   355     - |
   21 |  -306     0    52  -122     - |
   22 |  1704     0   549  2158     - |
   23 | -5083     0  -211 -4180     - |
   24 | -2332     0 -1375 -2135     - |
   25 |   483     0  -727   747     - |
   26 |   933     0  -113  1578     - |
   27 |   807     0  -801   418     - |
   28 |  1482     0  1553  1656     - |
   29 |  -934     0   604  -408     - |
   31 |  1381     0  1181  1297     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 CAS1 |     -     0     -     -     - |
 DAV1 |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOB2 |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 MAC1 |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MAS1 |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 POTS |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TID2 |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 UCLU |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 83082     0  1817 84411     - |  282  84407
    2 |     -     0   942 85350     - |  273  85501
    4 | 88531     0   782 89064     - |  288  83310
    5 | 79843     0   934 77830     - |  288  80061
    6 | 69031     0  1402 70088     - |  288  81581
    7 | 81964     0   918 82140     - |  287  82607
    9 | 76992     0  1053 76633     - |  288  76148
   12 |     -     0  1237     -     - |  288   2332
   14 | 81826     0   817 82023     - |  288  82426
   15 | 14130     0   828 12878     - |  288   4920
   16 |     -     0   934 72669     - |  287  81734
   17 | 74244     0   585 74029     - |  281  80574
   18 | 77519     0  1153 77627     - |  288  80115
   19 |     -     0   867 82134     - |  288  85639
   20 | 82220     0   910 82377     - |  288  81253
   21 | 72077     0   667 73282     - |  287  75606
   22 | 78389     0   660 78688     - |  281  79905
   23 | 76753     0   939 77195     - |  268  80262
   24 | 67379     0   995 67707     - |  283  74447
   25 | 81801     0   959 81620     - |  288  87633
   26 | 73553     0  1408 73414     - |  282  79600
   27 | 76643     0   643 78019     - |  288  82057
   28 | 14414     0  1893 13055     - |  285   3546
   29 | 65421     0   929 66982     - |  288  81542
   31 | 63013     0  2019 62853     - |  288  72750
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   4127
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  288  82081
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  288    208
 CAS1 |     -     0     -     -     - |  287   5318
 DAV1 |     -     0     -     -     - |  281  14196
 DRAO |     -     0     -     -     - |  288    930
 GODE |     -     0     -     -     - |  286    234
 GOLD |     -     0     -     -     - |  286    149
 GRAZ |     -     0     -     -     - |  287   1048
 HARV |     -     0     -     -     - |  287   2460
 HERS |     -     0     -     -     - |  288 325095
 HOB2 |     -     0     -     -     - |  270 242066
 HOLB |     -     0     -     -     - |  288   9798
 JOZE |     -     0     -     -     - |  283    >>>
 JPLM |     -     0     -     -     - |  288  12912
 KIRU |     -     0     -     -     - |  287   2259
 KOSG |     -     0     -     -     - |  288    961
 MAC1 |     -     0     -     -     - |  281   9943
 MADR |     -     0     -     -     - |  287    152
 MAS1 |     -     0     -     -     - |  288   4436
 MATE |     -     0     -     -     - |  286 618318
 MDO1 |     -     0     -     -     - |  275   1338
 METS |     -     0     -     -     - |  282   3742
 NYAL |     -     0     -     -     - |  285    756
 PERT |     -     0     -     -     - |  287  21745
 PIE1 |     -     0     -     -     - |  288    197
 POTS |     -     0     -     -     - |  246    >>>
 SANT |     -     0     -     -     - |  288    107
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288   3469
 TID2 |     -     0     -     -     - |  288    143
 TIDB |     -     0     -     -     - |  288    143
 TROM |     -     0     -     -     - |  282   9762
 TSKB |     -     0     -     -     - |  288    929
 UCLU |     -     0     -     -     - |  288   2304
 USUD |     -     0     -     -     - |  287    754
 WES2 |     -     0     -     -     - |  286 148355
 WILL |     -     0     -     -     - |  288   2004
 YAR2 |     -     0     -     -     - |  288   1288
 YELL |     -     0     -     -     - |  236    404
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 72598     0  1111 73736     - |
