
 cls-file Version 2.0
 GPS week: 0763   Day: 5   MJD: 49590                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    95     0   2258      0   -4729    6408  74251  74251      0  75480  75480      0    0.00
 gf1 |   285     0  17633      0   -5377    1396      0      0      0      0      0      0  100.00
 igf |    95     0   2352      8   -3442    5437    750    750      0   1495   1495      0    0.00
 pd1 |    95     0   2258      0   -4665    6385  74205  74205      0  75432  75432      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |   738     0   804  1076     - |
    2 | -2767     0 -1115 -2574     - |
    4 |  -499     0  -420  -596     - |
    5 |   826     0 -1004   562     - |
    6 |   672     0  -869   258     - |
    7 |  1461     0   288  1027     - |
    9 |  -251     0   879   -35     - |
   12 |     -     0  5144     -     - |
   14 |  2042     0  -661  2106     - |
   15 |   851     0    50   764     - |
   16 |  -678     0  -508 -1344     - |
   17 |  2629     0   567  2304     - |
   18 |  -177     0   933   705     - |
   19 | -2467     0 -2393 -2697     - |
   20 |   643     0  -349   253     - |
   21 | -1154     0  -253  -483     - |
   22 |  -181     0   665   183     - |
   23 | -3845     0  -222 -4037     - |
   24 |   224     0  -868    57     - |
   25 |   -20     0  -543   234     - |
   26 |  2896     0   334  2709     - |
   27 |   465     0  -344   486     - |
   28 |   566     0  -228   491     - |
   29 |  -900     0    86  -369     - |
   31 |   179     0   265   117     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 CAS1 |     -     0     -     -     - |
 DAV1 |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KIT3 |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MAS1 |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 POTS |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 87153     0   598 87124     - |  285  87151
    2 | 76149     0   381 76115     - |  285  82250
    4 | 81508     0   990 81503     - |  281  84035
    5 | 76388     0  1041 76279     - |  285  82320
    6 | 80727     0  1113 80650     - |  285  77387
    7 | 72615     0   597 72635     - |  285  79007
    9 | 72192     0   531 72191     - |  282  81137
   12 |     -     0   882     -     - |  285   4045
   14 | 73489     0   509 73480     - |  274  78812
   15 | 13439     0   362 13409     - |  285   1791
   16 | 79513     0  1006 79358     - |  272  85922
   17 | 72890     0   372 72862     - |  282  73797
   18 | 76760     0   570 76527     - |  285  80072
   19 | 71128     0   664 71124     - |  285  85830
   20 | 80747     0  1081 80744     - |  285  81744
   21 | 77094     0   575 76905     - |  284  80245
   22 | 84599     0   810 84501     - |  285  82933
   23 | 79584     0   484 79596     - |  258  83467
   24 | 90537     0   397 90498     - |  281  85048
   25 | 77636     0   466 77633     - |  285  81064
   26 | 69036     0   505 69055     - |  285  84178
   27 | 81576     0  1210 81583     - |  285  80873
   28 | 13706     0   466 13683     - |  285   2413
   29 | 79654     0   501 79578     - |  285  80344
   31 | 68758     0  1315 68752     - |  285  81186
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  285  12771
 BRMU |     -     0     -     -     - |  283    >>>
 BRUS |     -     0     -     -     - |  285    143
 CAS1 |     -     0     -     -     - |  281   5847
 DAV1 |     -     0     -     -     - |  281   6532
 DRAO |     -     0     -     -     - |  285    555
 FAIR |     -     0     -     -     - |  285    111
 GODE |     -     0     -     -     - |  285    351
 GOLD |     -     0     -     -     - |  285    138
 GRAZ |     -     0     -     -     - |  285    672
 HARV |     -     0     -     -     - |  145    892
 HERS |     -     0     -     -     - |  285 398697
 HOLB |     -     0     -     -     - |  284  25229
 JOZE |     -     0     -     -     - |  282  12057
 JPLM |     -     0     -     -     - |  285   7797
 KIRU |     -     0     -     -     - |  285   3377
 KIT3 |     -     0     -     -     - |  285 118699
 KOKB |     -     0     -     -     - |  275 155069
 KOSG |     -     0     -     -     - |  285   1725
 MADR |     -     0     -     -     - |  283   2109
 MAS1 |     -     0     -     -     - |  285   3142
 NLIB |     -     0     -     -     - |  285    >>>
 NYAL |     -     0     -     -     - |  285    215
 ONSA |     -     0     -     -     - |  284   3065
 PERT |     -     0     -     -     - |  199    757
 POTS |     -     0     -     -     - |  285 102123
 SANT |     -     0     -     -     - |  285    568
 SIO3 |     -     0     -     -     - |  284    >>>
 STJO |     -     0     -     -     - |  285  26402
 TIDB |     -     0     -     -     - |  285    118
 TROM |     -     0     -     -     - |  285   2534
 TSKB |     -     0     -     -     - |  285    566
 USUD |     -     0     -     -     - |  285    433
 WES2 |     -     0     -     -     - |  285    139
 WILL |     -     0     -     -     - |  285   5411
 YAR2 |     -     0     -     -     - |  285   1256
 YELL |     -     0     -     -     - |  284    213
 ZIMM |     -     0     -     -     - |  284    >>>
 -----+-------------------------------+-------------
 TOT  | 74251     0   750 74205     - |
