
 cls-file Version 2.0
 GPS week: 0758   Day: 3   MJD: 49553                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2197      0    1056   -3172  74051  74051      0  75892  75892      0    0.00
 gf1 |   288     0  18566      0    5522  -19952      0      0      0      0      0      0  100.00
 igf |    96     0   2196      2    2025   -4355    673    673      0   1021   1021      0    0.00
 pd1 |    96     0   2197      0    1077   -3175  74011  74011      0  75851  75851      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |  -915     0   820  -938     - |
    2 |  4398     0    77  4368     - |
    4 |  1147     0   537  1160     - |
    5 |  2202     0  -388  1386     - |
    6 |  -498     0 -1172  -975     - |
    7 |   597     0   509   410     - |
    9 |  -857     0   411  -318     - |
   14 |  -834     0  -728  -985     - |
   15 |   322     0    34   347     - |
   16 | -1322     0   181 -1362     - |
   17 | -1373     0   493 -1068     - |
   18 |  -717     0   597  -874     - |
   19 | -1454     0 -1995 -1505     - |
   20 |  1041     0   388   929     - |
   21 |  -655     0   -34  -690     - |
   22 |  3414     0   798  3740     - |
   23 |  -452     0  -411  -526     - |
   24 | -6593     0 -1322 -5765     - |
   25 |  -381     0   -62  -465     - |
   26 |  1486     0    -8  1634     - |
   27 |   -46     0   -50   -59     - |
   28 |   525     0   169   491     - |
   29 |  1746     0   591  1766     - |
   31 |   427     0   701   470     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 CAS1 |     -     0     -     -     - |
 DAV1 |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOB2 |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MAC1 |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MAS1 |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 POTS |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 UCLU |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 83377     0   577 83381     - |  240  87301
    2 | 76513     0  1059 76501     - |  237  83231
    4 | 82250     0   730 82250     - |  278  84357
    5 | 74508     0   955 74229     - |  276  85054
    6 | 78172     0   599 78125     - |  284  84036
    7 | 73984     0   572 73967     - |  257  81479
    9 | 73909     0   767 73847     - |  286  74899
   14 | 79398     0   615 79403     - |  283  82410
   15 | 17015     0   660 17023     - |  284   3593
   16 | 78609     0   689 78618     - |  287  83399
   17 | 77513     0   751 77443     - |  285  82558
   18 | 90275     0   615 90297     - |  272  84781
   19 | 81689     0   503 81687     - |  288  79705
   20 | 15473     0   613 15480     - |  259   5441
   21 | 76016     0   644 76023     - |  271  79418
   22 | 71634     0   818 71535     - |  276  78729
   23 | 86071     0   454 86061     - |  281  86075
   24 | 91762     0   721 91392     - |  265  86190
   25 | 73382     0   542 73349     - |  252  80077
   26 | 84751     0   798 84794     - |  288  81931
   27 | 77124     0   420 77130     - |  288  82709
   28 | 16739     0   744 16736     - |  288   1437
   29 | 78689     0   495 78688     - |  286  81320
   31 | 73891     0   581 73888     - |  288  77134
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   5157
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  288  76237
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  288   1185
 CAS1 |     -     0     -     -     - |  272   1621
 DAV1 |     -     0     -     -     - |  277   2100
 DRAO |     -     0     -     -     - |  284    592
 FAIR |     -     0     -     -     - |  288     78
 GODE |     -     0     -     -     - |  288    215
 GOLD |     -     0     -     -     - |  286     76
 GRAZ |     -     0     -     -     - |  288    642
 HARV |     -     0     -     -     - |  288   4916
 HERS |     -     0     -     -     - |  288 226701
 HOB2 |     -     0     -     -     - |  269 108742
 HOLB |     -     0     -     -     - |  288   8339
 JOZE |     -     0     -     -     - |  276    >>>
 JPLM |     -     0     -     -     - |  288   3686
 KIRU |     -     0     -     -     - |  288   3523
 KOKB |     -     0     -     -     - |  283    946
 KOSG |     -     0     -     -     - |  288   1002
 KOUR |     -     0     -     -     - |  287   3350
 MAC1 |     -     0     -     -     - |  281  23170
 MADR |     -     0     -     -     - |  278   1957
 MAS1 |     -     0     -     -     - |  281   5043
 MATE |     -     0     -     -     - |  288    599
 MDO1 |     -     0     -     -     - |  288   5811
 METS |     -     0     -     -     - |  288    319
 NLIB |     -     0     -     -     - |  288    144
 ONSA |     -     0     -     -     - |  288    128
 PERT |     -     0     -     -     - |  285 253169
 PIE1 |     -     0     -     -     - |  288    185
 POTS |     -     0     -     -     - |  280    >>>
 STJO |     -     0     -     -     - |  288   9136
 TIDB |     -     0     -     -     - |  287    379
 TROM |     -     0     -     -     - |  288    968
 TSKB |     -     0     -     -     - |  288    614
 UCLU |     -     0     -     -     - |  287  17426
 USUD |     -     0     -     -     - |  287    705
 YAR2 |     -     0     -     -     - |  270  20737
 YELL |     -     0     -     -     - |  286   6766
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 74052     0   674 74012     - |
