
 cls-file Version 2.0
 GPS week: 0755   Day: 2   MJD: 49531                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2009      0   -8333    6145  72423  72423      0  74159  74159      0    0.00
 gf1 |   288     0  17064      0  -10513   33347      0      0      0      0      0      0  100.00
 igf |    96     0   1991     66   -9789    6442   1059   1059      0   1311   1311      0    0.00
 pd1 |    96     0   2009      0   -8540    6186  72379  72379      0  74110  74110      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |   705     0   694   584     - |
    2 | -3593     0  -678 -3449     - |
    4 |  5014     0   448  4067     - |
    5 | -2694     0  -421 -2205     - |
    6 | -2533     0  -980 -3112     - |
    7 | -3710     0  -403 -3566     - |
   14 |  1433     0  -384  1291     - |
   15 |   870     0 -1449  1057     - |
   16 |  4638     0   461  5017     - |
   17 | -3092     0    55 -2892     - |
   18 |  -315     0   245   435     - |
   19 |  1570     0 -1336  1588     - |
   20 | -1600     0  -481 -1468     - |
   21 |  -543     0    -2  -516     - |
   22 |   328     0  2102   159     - |
   23 |  1167     0  -408  1403     - |
   24 |  1799     0 -1243  1754     - |
   25 |  2227     0   649  1769     - |
   26 |   831     0   264    37     - |
   27 | -2907     0   372 -2820     - |
   28 |   168     0   283    95     - |
   29 |  -505     0   414   -18     - |
   31 |  2633     0  1198  2442     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MAS1 |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 UCLU |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 71520     0  1061 71485     - |  253  75730
    2 | 72151     0   671 72094     - |  255  79098
    4 | 77553     0   750 77683     - |  196  77732
    5 | 75233     0   851 75124     - |  288  86227
    6 | 70695     0   675 70603     - |  277  73425
    7 | 74485     0   917 74468     - |  239  80534
   14 | 73774     0  1051 73703     - |  272  72351
   15 | 16258     0  2569 16240     - |  265   2662
   16 | 76475     0   853 76591     - |  224  78268
   17 | 78310     0  1173 78229     - |  251  84345
   18 | 85555     0   694 85165     - |  276  82663
   19 | 84624     0   694 84624     - |  271  85760
   20 | 16316     0   760 16302     - |  277   6480
   21 | 83465     0   743 83340     - |  271  86868
   22 | 77303     0  1658 77300     - |  279  82662
   23 | 63853     0   895 63851     - |  256  74791
   24 | 77806     0   970 77805     - |  211  79019
   25 | 77273     0   829 77170     - |  272  77373
   26 | 85720     0   896 85738     - |  263  88517
   27 | 69898     0  1538 69895     - |  288  77140
   28 | 61388     0   606 61381     - |  285  77714
   29 | 81618     0   818 81622     - |  283  82713
   31 | 76733     0  1281 76734     - |  280  85168
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   5472
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  287 193433
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  288   2100
 DRAO |     -     0     -     -     - |  288    792
 FAIR |     -     0     -     -     - |  288    592
 GODE |     -     0     -     -     - |  287    >>>
 GOLD |     -     0     -     -     - |  283   2186
 GRAZ |     -     0     -     -     - |  288    638
 HARV |     -     0     -     -     - |  288   4488
 HERS |     -     0     -     -     - |  288 102182
 HOLB |     -     0     -     -     - |  288  32379
 JOZE |     -     0     -     -     - |  286    >>>
 JPLM |     -     0     -     -     - |  288  22886
 KIRU |     -     0     -     -     - |  275   2954
 KOSG |     -     0     -     -     - |  288   1317
 KOUR |     -     0     -     -     - |  288   5548
 MADR |     -     0     -     -     - |  287   5069
 MAS1 |     -     0     -     -     - |  288   5355
 MATE |     -     0     -     -     - |  284 582641
 MDO1 |     -     0     -     -     - |  288    792
 METS |     -     0     -     -     - |  288    326
 NYAL |     -     0     -     -     - |  269    >>>
 ONSA |     -     0     -     -     - |  285    120
 PERT |     -     0     -     -     - |  288   5558
 PIE1 |     -     0     -     -     - |  287    131
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288   3038
 TIDB |     -     0     -     -     - |  283   5039
 TROM |     -     0     -     -     - |  256   1128
 TSKB |     -     0     -     -     - |  288    348
 UCLU |     -     0     -     -     - |  288   4739
 USUD |     -     0     -     -     - |  288    637
 WES2 |     -     0     -     -     - |  288   2775
 WILL |     -     0     -     -     - |  288   3662
 YAR2 |     -     0     -     -     - |  202  78465
 YELL |     -     0     -     -     - |  263  22821
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 72423     0  1059 72379     - |
