
 cls-file Version 2.0
 GPS week: 0751   Day: 1   MJD: 49502                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2069      0  -12470   20334  75755  75755      0  77698  77698      0    0.00
 gf1 |   288     0  16878      0   -7996   12567      0      0      0      0      0      0  100.00
 igf |    96     0   2155     12  -10428   18011   1492   1492      0   2314   2314      0    0.00
 pd1 |    96     0   2069      0  -12500   20286  75698  75698      0  77644  77644      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 | -2983     0  1072 -3870     - |
    2 |   664     0  -160   701     - |
    4 | -2275     0  -560 -1301     - |
    5 |  1289     0   644  1396     - |
    6 |   829     0  -769   593     - |
    7 | -3858     0   281 -3638     - |
    9 |  5644     0  1477  5684     - |
   12 |     -     0  5026     -     - |
   14 | -1914     0 -2287 -1363     - |
   15 |  -588     0 -1579  -452     - |
   16 |  -376     0 -2209 -1265     - |
   17 |   -56     0  1548  -184     - |
   18 | -3247     0   411 -3350     - |
   19 | -4459     0 -2743 -4421     - |
   20 |   732     0  -137   793     - |
   21 |  1870     0  1529  1016     - |
   22 |  6696     0  2114  6488     - |
   23 |  3411     0 -2128  3307     - |
   24 | -2858     0 -2591 -3039     - |
   25 | -2316     0  -512 -1474     - |
   26 |  2366     0   101  2443     - |
   27 | -1089     0 -1332 -1384     - |
   28 |   770     0   756   540     - |
   29 |  1148     0  1671  1645     - |
   31 |  -360     0   759   133     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 UCLU |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 85000     0  1730 84702     - |  228  84541
    2 | 81987     0  1696 81985     - |  252  88040
    4 | 79024     0  1713 78821     - |  252  85874
    5 | 73835     0  1539 73864     - |  268  78225
    6 | 63182     0  1568 63116     - |  278  78582
    7 | 68488     0   691 68462     - |  247  85354
    9 | 74967     0   950 74969     - |  251  78003
   12 |     -     0  2063     -     - |  264  14638
   14 | 77084     0  1555 76998     - |  272  78780
   15 | 17399     0  1375 17451     - |  253   2854
   16 | 79807     0   687 79824     - |  259  85797
   17 | 73310     0  1344 73344     - |  264  82793
   18 | 83633     0  1722 83640     - |  279  86061
   19 | 85045     0   659 85010     - |  270  84359
   20 | 17072     0  1751 17081     - |  272   3482
   21 | 93392     0  1296 93336     - |  251  89189
   22 | 79585     0  1673 79517     - |  259  84733
   23 | 91746     0  2060 91710     - |  251  82482
   24 | 78758     0  1102 78737     - |  231  81107
   25 | 77421     0  1301 77134     - |  239  79235
   26 | 77277     0  2147 77281     - |  253  82291
   27 | 79333     0  1186 79351     - |  271  80778
   28 | 81841     0  2346 81793     - |  264  88403
   29 | 80677     0   846 80559     - |  288  81421
   31 | 78640     0   631 78518     - |  254  79247
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   3490
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  288  70163
 BRUS |     -     0     -     -     - |  288   1552
 DRAO |     -     0     -     -     - |  288    548
 FAIR |     -     0     -     -     - |  228   2789
 GODE |     -     0     -     -     - |  288    104
 GOLD |     -     0     -     -     - |  288    141
 GRAZ |     -     0     -     -     - |  287   1206
 HARV |     -     0     -     -     - |  287    >>>
 HERS |     -     0     -     -     - |  287 263610
 HOLB |     -     0     -     -     - |  288  12020
 JOZE |     -     0     -     -     - |  286    >>>
 JPLM |     -     0     -     -     - |  288   8395
 KIRU |     -     0     -     -     - |  252   3343
 KOSG |     -     0     -     -     - |  288   1390
 KOUR |     -     0     -     -     - |  277   3419
 MADR |     -     0     -     -     - |  285   6487
 MATE |     -     0     -     -     - |  288   2655
 MDO1 |     -     0     -     -     - |  288    670
 METS |     -     0     -     -     - |  288    176
 NLIB |     -     0     -     -     - |  284    166
 NYAL |     -     0     -     -     - |  257   2749
 ONSA |     -     0     -     -     - |  288    248
 PIE1 |     -     0     -     -     - |  288    164
 SANT |     -     0     -     -     - |  283    162
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288  43964
 TIDB |     -     0     -     -     - |  276    162
 TROM |     -     0     -     -     - |  252   9421
 TSKB |     -     0     -     -     - |  288    409
 UCLU |     -     0     -     -     - |  288   2078
 USUD |     -     0     -     -     - |  288    574
 WES2 |     -     0     -     -     - |  288    194
 WILL |     -     0     -     -     - |  288   1650
 YAR2 |     -     0     -     -     - |  245 114507
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 75756     0  1493 75699     - |
