
 cls-file Version 2.0
 GPS week: 0745   Day: 6   MJD: 49465                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   1990      0    1119   -4821  72165  72165      0  74045  74045      0    0.00
 gf1 |   288     0  17094      0    -152   -9855      0      0      0      0      0      0  100.00
 igf |    96     0   2164     14    4259  -14909   2717   2717      0   4265   4265      0    0.00
 pd1 |    96     0   2082      0    1170   -4826  72068  72068      0  74031  74031      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |  2048     0  3287  1921     - |
    2 | -3388     0   691 -2948     - |
    4 |  -247     0  1266    41     - |
    5 |  1146     0  2014  1156     - |
    6 |   -77     0 -1401  -125     - |
    7 |   -84     0 -4737  -243     - |
    9 |     -     0   654   821     - |
   12 |     -     0 -7458     -     - |
   14 |  -481     0  1135  -553     - |
   15 |  -759     0 -2057  -751     - |
   16 |  1300     0  3152  1549     - |
   17 | -1557     0 -3468 -1090     - |
   18 |  -837     0  2526    64     - |
   19 |  -433     0 -3872  -856     - |
   20 |  1724     0  3037  1666     - |
   21 |  5016     0 -2894  3955     - |
   23 |    75     0  2455   -27     - |
   24 |  1381     0 -1859  1001     - |
   25 |   182     0  2092   -11     - |
   26 |  -152     0  1488  -329     - |
   27 |  -600     0  -725  -837     - |
   28 |  -968     0  1450 -1320     - |
   29 |   608     0  2428   576     - |
   31 |  -749     0 -1243 -1140     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 67825     0  2062 67628     - |  272  72132
    2 | 74806     0  2664 75147     - |  259  85956
    4 | 69127     0  1750 68609     - |  267  85134
    5 | 75812     0  2682 76094     - |  288  76233
    6 | 83240     0  2170 82996     - |  277  89801
    7 | 82971     0  2708 83431     - |  264  78210
    9 |     -     0  1989 69263     - |  278  76980
   12 |     -     0  5838     -     - |  248  17436
   14 | 81130     0  1538 81618     - |  288  87482
   15 | 16690     0  3494 17043     - |  283   2871
   16 | 75347     0  3405 75341     - |  262  81467
   17 | 79179     0  1790 78588     - |  268  80670
   18 | 70293     0  1648 69756     - |  288  80650
   19 | 72857     0  3701 73136     - |  274  84904
   20 | 16661     0  1307 16929     - |  287   3224
   21 | 68590     0  3779 68670     - |  258  79713
   23 | 80059     0  1521 80113     - |  241  80684
   24 | 80032     0  2954 80376     - |  256  78612
   25 | 72138     0  1441 72075     - |  281  77076
   26 | 73630     0  2318 73660     - |  257  79188
   27 | 81343     0  3405 81874     - |  288  77766
   28 | 73839     0  1452 73745     - |  271  75443
   29 | 77995     0  1781 77802     - |  288  80383
   31 | 79015     0  4298 79261     - |  260  74910
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   4827
 ALGO |     -     0     -     -     - |  288      0
 AREQ |     -     0     -     -     - |  288  69508
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  288   1047
 DRAO |     -     0     -     -     - |  288    949
 FAIR |     -     0     -     -     - |  277   1073
 GODE |     -     0     -     -     - |  288    239
 GOLD |     -     0     -     -     - |  288    109
 GRAZ |     -     0     -     -     - |  288   1671
 HARV |     -     0     -     -     - |  288  16682
 HERS |     -     0     -     -     - |  288   1975
 HOLB |     -     0     -     -     - |  288  25484
 JOZE |     -     0     -     -     - |  286    >>>
 JPLM |     -     0     -     -     - |  288  15467
 KIRU |     -     0     -     -     - |  288   2040
 KOKB |     -     0     -     -     - |  288    116
 KOSG |     -     0     -     -     - |  288   1708
 MADR |     -     0     -     -     - |  287    153
 MATE |     -     0     -     -     - |  288    119
 MDO1 |     -     0     -     -     - |  287    544
 METS |     -     0     -     -     - |  288    407
 NLIB |     -     0     -     -     - |  256    100
 NYAL |     -     0     -     -     - |  285   3162
 ONSA |     -     0     -     -     - |  288    112
 PERT |     -     0     -     -     - |  288   6174
 PIE1 |     -     0     -     -     - |  286     73
 SANT |     -     0     -     -     - |  288   1550
 STJO |     -     0     -     -     - |  288    >>>
 TROM |     -     0     -     -     - |  284   5468
 TSKB |     -     0     -     -     - |  288    682
 USUD |     -     0     -     -     - |  288   1139
 WES2 |     -     0     -     -     - |  288    128
 WILL |     -     0     -     -     - |  288   3116
 YAR2 |     -     0     -     -     - |  288   2113
 YELL |     -     0     -     -     - |  280   5418
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 72165     0  2718 72069     - |
