
 cls-file Version 2.0
 GPS week: 0745   Day: 4   MJD: 49463                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   1893      0    3659    2766  75745  75745      0  78029  78029      0    0.00
 gf1 |   288     0  16672      0   -5984   -3227      0      0      0      0      0      0  100.00
 igf |    96     0   1983     22  -12676    1096   2963   2963      0   4311   4311      0    0.00
 pd1 |    96     0   1893      0    3698    2733  75720  75720      0  77990  77990      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |  3089     0  2196  3174     - |
    2 |  4738     0  2703  3937     - |
    4 | -2438     0   507 -2947     - |
    5 |  -288     0  2145  -621     - |
    6 |  -740     0 -1272  -875     - |
    7 | -9818     0 -3380 -8177     - |
   12 |     -     0 -6880     -     - |
   13 | 20621     0 -6199 20509     - |
   14 |  3597     0  3196  2619     - |
   15 | -1787     0   477 -1747     - |
   16 | -2370     0 -2235 -2654     - |
   17 | -1795     0 -3453 -1320     - |
   18 |  2233     0  3577  2200     - |
   19 | -3760     0  1074 -3718     - |
   20 | -2043     0  -477 -2127     - |
   21 | -8550     0 -2186 -8003     - |
   23 |  2514     0  2529  2812     - |
   24 | -4807     0 -4588 -4580     - |
   25 |  3723     0  1665  3470     - |
   26 |  1587     0  2586  1593     - |
   27 | -2407     0  1943 -2069     - |
   28 |   662     0 -1059   708     - |
   29 |  2738     0  2356  2673     - |
   31 | -1561     0  3758 -1465     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 75812     0  2340 75782     - |  216  86230
    2 | 74520     0  2010 74538     - |  265  83036
    4 | 81590     0  2038 81452     - |  243  80939
    5 | 87343     0  1564 87257     - |  285  84883
    6 | 78102     0  2011 78105     - |  223  80815
    7 | 76030     0  3692 75840     - |  227  79119
   12 |     -     0  4937     -     - |  267  11641
   13 | 70430     0  5730 70495     - |  237  70513
   14 | 82733     0  2508 82710     - |  249  84636
   15 | 19035     0  3074 19022     - |  235   3759
   16 | 82917     0  4794 82830     - |  283  82981
   17 | 75075     0  2565 75000     - |  269  82810
   18 | 86583     0  2612 86630     - |  226  82081
   19 | 72095     0  2699 72023     - |  252  78997
   20 | 17981     0  2714 17961     - |  238   3591
   21 | 90747     0  2313 90753     - |  247  88612
   23 | 86258     0  2071 86333     - |  222  88720
   24 | 78327     0  1745 78501     - |  257  89332
   25 | 75514     0  2916 75481     - |  266  80959
   26 | 76540     0  2165 76548     - |  254  77908
   27 | 72899     0  2481 72722     - |  280  82727
   28 | 75490     0  3851 75562     - |  213  78718
   29 | 84935     0  3018 84945     - |  278  86775
   31 | 78663     0  2002 78596     - |  214  83421
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   3375
 ALGO |     -     0     -     -     - |  288      0
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  285    >>>
 DRAO |     -     0     -     -     - |  288    708
 FAIR |     -     0     -     -     - |  288     49
 GODE |     -     0     -     -     - |  288    276
 GOLD |     -     0     -     -     - |  288     42
 GRAZ |     -     0     -     -     - |  287   2129
 HARV |     -     0     -     -     - |  288 137558
 HERS |     -     0     -     -     - |  288   1594
 HOLB |     -     0     -     -     - |  288  45426
 JOZE |     -     0     -     -     - |  286    >>>
 JPLM |     -     0     -     -     - |  288   2799
 KIRU |     -     0     -     -     - |  288   3943
 KOKB |     -     0     -     -     - |  288     51
 KOSG |     -     0     -     -     - |  288   2401
 KOUR |     -     0     -     -     - |  288   2685
 MADR |     -     0     -     -     - |  283 563505
 MATE |     -     0     -     -     - |  288     94
 MDO1 |     -     0     -     -     - |  288  36493
 METS |     -     0     -     -     - |  288    219
 NLIB |     -     0     -     -     - |  286     73
 NYAL |     -     0     -     -     - |  288    127
 ONSA |     -     0     -     -     - |  189     65
 PERT |     -     0     -     -     - |  206   2422
 PIE1 |     -     0     -     -     - |  288     98
 SANT |     -     0     -     -     - |  288   4436
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288   8242
 TROM |     -     0     -     -     - |  286   1263
 TSKB |     -     0     -     -     - |  288   1256
 USUD |     -     0     -     -     - |  288   1148
 WES2 |     -     0     -     -     - |  288     67
 WILL |     -     0     -     -     - |  288   1578
 YAR2 |     -     0     -     -     - |  282   1866
 YELL |     -     0     -     -     - |  275   4985
 ZIMM |     -     0     -     -     - |  286    >>>
 -----+-------------------------------+-------------
 TOT  | 75745     0  2963 75721     - |
