
 cls-file Version 2.0
 GPS week: 0745   Day: 2   MJD: 49461                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2060      0   11652   -7961  72910  72910      0  75191  75191      0    0.00
 gf1 |   288     0  16845      0    6030   -5613      0      0      0      0      0      0  100.00
 igf |    96     0   2156     23    5769  -10243   2275   2275      0   3342   3342      0    0.00
 pd1 |    96     0   2060      0   11556   -7824  72880  72880      0  75163  75163      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 | -2574     0  1125 -2464     - |
    2 |  3527     0   282  2976     - |
    4 |  6314     0  -170  6151     - |
    5 | -1132     0  2916  -711     - |
    6 | -3075     0   522 -2959     - |
    7 |  -678     0 -3711 -2196     - |
    9 |  1347     0  1672  1384     - |
   12 |     -     0 -3285     -     - |
   13 | 31702     0 -5112 31732     - |
   14 | -2978     0   623 -2400     - |
   15 | -2334     0 -1775 -2301     - |
   16 | -4037     0   287 -4689     - |
   17 |  -920     0 -2563  -679     - |
   18 | -2470     0  2088 -2612     - |
   19 | -3025     0   -57 -2922     - |
   20 |  -150     0  2808  -190     - |
   21 | -9419     0 -2917 -9729     - |
   23 | -1058     0   -37  -620     - |
   24 |  2086     0 -4486  2026     - |
   25 | -1053     0  -805  -802     - |
   26 |  2057     0  1145  2557     - |
   27 |  -967     0  2831  -842     - |
   28 | -1641     0  2052 -1620     - |
   29 | -2221     0  2481 -2086     - |
   31 |   859     0  2356   846     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 NYAL |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 79346     0  1530 79331     - |  232  82293
    2 | 79957     0  2400 79866     - |  251  86409
    4 | 69531     0  1538 69499     - |  236  77189
    5 | 76313     0  1424 76330     - |  285  77324
    6 | 74458     0  2274 74434     - |  277  77304
    7 | 82064     0  2835 81688     - |  229  89079
    9 | 73937     0  2469 73964     - |  284  81130
   12 |     -     0  5441     -     - |  288   2927
   13 | 69330     0  4585 69334     - |  245  68102
   14 | 77942     0  1496 77858     - |  269  86175
   15 | 16876     0  2203 16870     - |  275   2005
   16 | 73716     0  1182 73602     - |  265  77824
   17 | 85801     0  2048 85804     - |  259  83471
   18 | 73587     0  1521 73587     - |  246  83734
   19 | 75455     0  1562 75513     - |  259  82090
   20 | 17268     0  1527 17228     - |  288   4530
   21 | 74885     0  1503 74841     - |  250  83350
   23 | 88531     0  1252 88498     - |  241  85077
   24 | 70313     0  2266 70341     - |  246  79824
   25 | 76222     0  1547 76179     - |  272  80797
   26 | 72628     0  2439 72692     - |  263  80887
   27 | 84405     0  2220 84387     - |  288  84517
   28 | 69650     0  1565 69589     - |  228  78631
   29 | 82506     0  1994 82531     - |  260  84135
   31 | 72401     0  1242 72405     - |  227  79429
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   4813
 ALGO |     -     0     -     -     - |  288      0
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  288   2275
 DRAO |     -     0     -     -     - |  288    353
 FAIR |     -     0     -     -     - |  287   3392
 GODE |     -     0     -     -     - |  288   3833
 GOLD |     -     0     -     -     - |  287     36
 GRAZ |     -     0     -     -     - |  224 193434
 HARV |     -     0     -     -     - |  288  43809
 HERS |     -     0     -     -     - |  287   2255
 HOLB |     -     0     -     -     - |  288  47024
 JOZE |     -     0     -     -     - |  286    >>>
 JPLM |     -     0     -     -     - |  288   9243
 KIRU |     -     0     -     -     - |  286   1784
 KOKB |     -     0     -     -     - |  288    106
 KOSG |     -     0     -     -     - |  288  17018
 KOUR |     -     0     -     -     - |  288   3024
 MADR |     -     0     -     -     - |  256   1891
 MATE |     -     0     -     -     - |  288    130
 MDO1 |     -     0     -     -     - |  288    406
 METS |     -     0     -     -     - |  288    399
 NLIB |     -     0     -     -     - |  199 478958
 NYAL |     -     0     -     -     - |  265   3541
 ONSA |     -     0     -     -     - |  264    232
 PIE1 |     -     0     -     -     - |  288    165
 SANT |     -     0     -     -     - |  288    331
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288   3081
 TROM |     -     0     -     -     - |  284   5102
 TSKB |     -     0     -     -     - |  288    750
 USUD |     -     0     -     -     - |  288    465
 WES2 |     -     0     -     -     - |  288    116
 WILL |     -     0     -     -     - |  288   4355
 YAR2 |     -     0     -     -     - |  288   3054
 YELL |     -     0     -     -     - |  259   3550
 ZIMM |     -     0     -     -     - |  287    >>>
 -----+-------------------------------+-------------
 TOT  | 72911     0  2276 72881     - |
