
 cls-file Version 2.0
 GPS week: 0745   Day: 0   MJD: 49459                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    76     0   1446      0   32837  -36174  71830  71830      0  73724  73724      0    0.00
 gf1 |   228     0  11359      0   22509  -41156      0      0      0      0      0      0  100.00
 igf |    76     0   1514     11   26634  -33015   2187   2187      0   3360   3360      0    0.00
 pd1 |    76     0   1446      0   32910  -36268  71813  71813      0  73704  73704      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |-10656     0  1066-10317     - |
    2 | -3581     0   687 -3117     - |
    4 |  4189     0 -1766  4398     - |
    5 |   221     0   976  -809     - |
    7 |  2712     0 -3479  2423     - |
    9 |-10638     0  -525 -9936     - |
   12 |     -     0 -1142     -     - |
   13 | 15649     0 -1188 15625     - |
   14 | -1529     0  2645 -2251     - |
   15 |  -898     0   573  -791     - |
   16 |  9799     0  1893  9823     - |
   17 |  4993     0 -2864  4822     - |
   18 |   329     0  3132   320     - |
   19 | -2964     0 -3400 -3011     - |
   20 | -1677     0 -1146 -1765     - |
   21 |  2587     0  -169  2578     - |
   23 | -3026     0   710 -3061     - |
   24 | -5512     0 -5073 -5455     - |
   25 |   535     0  -672   178     - |
   26 |  3164     0  2102  3226     - |
   27 |    30     0  1658    47     - |
   28 | -5078     0   514 -5110     - |
   29 |  -245     0  1985    95     - |
   31 | -2080     0  4595 -1481     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 AREQ |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 DRAO |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 72615     0  1878 72605     - |  181  83334
    2 | 83977     0  2034 83909     - |  207  82571
    4 | 81731     0  2563 81687     - |  190  81754
    5 | 77383     0  1323 77185     - |  174  75608
    7 | 66746     0  1456 66778     - |  208  76151
    9 | 81496     0  1896 81655     - |  178  87599
   12 |     -     0  4066     -     - |  203  12264
   13 | 31582     0  3857 31598     - |  224  20274
   14 | 76155     0  2178 75970     - |  227  84940
   15 | 15875     0  1382 15841     - |  206   2172
   16 | 78750     0  1998 78765     - |  173  79109
   17 | 69416     0  2081 69417     - |  170  80894
   18 | 60917     0  2146 60915     - |  184  71227
   19 | 78292     0  1167 78292     - |  190  85180
   20 | 16267     0  2331 16304     - |  180   5205
   21 | 74767     0  2852 74779     - |  180  79809
   23 | 82912     0  1926 82936     - |  183  87137
   24 | 83400     0  2036 83406     - |  190  82285
   25 | 62958     0  1671 62866     - |  187  72603
   26 | 89978     0  2150 89965     - |  167  87223
   27 | 79740     0  1790 79724     - |  184  85806
   28 | 86648     0  1873 86647     - |  171  82373
   29 | 73225     0  2147 73227     - |  203  86165
   31 | 86319     0  1095 86345     - |  169  87629
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  222   3204
 ALGO |     -     0     -     -     - |  228  63428
 AREQ |     -     0     -     -     - |  228  77632
 BRMU |     -     0     -     -     - |  228    >>>
 BRUS |     -     0     -     -     - |  228   1522
 DRAO |     -     0     -     -     - |  218    819
 FAIR |     -     0     -     -     - |  158   3275
 GODE |     -     0     -     -     - |  228     59
 GOLD |     -     0     -     -     - |  228     87
 GRAZ |     -     0     -     -     - |  228    654
 HARV |     -     0     -     -     - |  228  76983
 HERS |     -     0     -     -     - |  228   1515
 JOZE |     -     0     -     -     - |  227    >>>
 JPLM |     -     0     -     -     - |  228   8275
 KIRU |     -     0     -     -     - |  188   5026
 KOKB |     -     0     -     -     - |  228     85
 KOUR |     -     0     -     -     - |  228   3733
 MADR |     -     0     -     -     - |  227   2768
 MDO1 |     -     0     -     -     - |  227    538
 ONSA |     -     0     -     -     - |  228     85
 PIE1 |     -     0     -     -     - |  228     72
 SANT |     -     0     -     -     - |  228    125
 SIO3 |     -     0     -     -     - |  227    >>>
 TIDB |     -     0     -     -     - |  194    >>>
 TROM |     -     0     -     -     - |  189   5058
 TSKB |     -     0     -     -     - |  228    368
 USUD |     -     0     -     -     - |  228   1039
 WES2 |     -     0     -     -     - |  228     38
 WILL |     -     0     -     -     - |  205   1777
 YELL |     -     0     -     -     - |  217   7941
 ZIMM |     -     0     -     -     - |  227    >>>
 -----+-------------------------------+-------------
 TOT  | 71830     0  2188 71813     - |
