
 cls-file Version 2.0
 GPS week: 0739   Day: 2   MJD: 49419                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   1794      0    2673  -11127  69192  69192      0  71507  71507      0    0.00
 gf1 |   288     0  14912      0    5087  -15055      0      0      0      0      0      0  100.00
 igf |    96     0   1962      9    2307  -12514   5355   5355      0   9123   9123      0    0.00
 pd1 |    96     0   1873      0    3668  -12030  69266  69266      0  71473  71473      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 | 14015     0 14107 13514     - |
    2 |  3844     0  5435  4824     - |
    3 |-11360     0-11048-11710     - |
    4 | -2444     0  -722 -3322     - |
    5 |  1039     0  5011   624     - |
    7 |  6153     0  -301  5475     - |
    9 |  3777     0  3155  3429     - |
   12 |     -     0-13513     -     - |
   13 |-13205     0-13077-13738     - |
   14 |  2591     0  3174  1757     - |
   15 | -4372     0 -3089 -4811     - |
   16 |  2912     0  2372  2311     - |
   17 |-12791     0 -8834-13275     - |
   18 |  3456     0  6885  3011     - |
   19 | -4288     0   962 -4204     - |
   20 |  8740     0 10608  8222     - |
   21 | -4817     0 -7273 -4818     - |
   23 |   669     0  -675  -557     - |
   24 |-17647     0-12534-18233     - |
   25 | -1733     0  1450 -2328     - |
   26 |     -     0  4977 10242     - |
   27 |  4014     0  4313  2962     - |
   28 |  6510     0  2565  5818     - |
   29 |  4556     0  5334  3937     - |
   31 |  7282     0  3582  6809     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 ONSA |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 STJO |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TROM |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 81848     0 11220 82738     - |  227  80354
    2 | 77776     0  1833 78255     - |  242  83193
    3 | 17586     0  7084 17123     - |  267  10541
    4 | 68201     0  1900 68383     - |  197  75307
    5 | 77763     0  7974 78221     - |  237  83361
    7 | 65430     0  4308 65308     - |  233  74719
    9 | 84511     0  2598 85462     - |  219  82323
   12 |     -     0  6745     -     - |  275   7810
   13 | 19915     0  8214 19200     - |  260  12446
   14 | 69326     0  5200 69239     - |  260  75619
   15 | 17197     0  3932 16463     - |  240   4308
   16 | 76218     0  2141 75374     - |  214  86295
   17 | 73576     0  1992 73544     - |  251  81144
   18 | 75522     0  2598 75454     - |  230  82604
   19 | 86510     0  1317 86211     - |  254  87983
   20 | 20140     0 12839 20076     - |  224   5567
   21 | 73248     0  4838 73917     - |  238  78801
   23 | 65222     0  7945 65238     - |  210  80047
   24 | 89563     0  2619 89245     - |  198  83074
   25 | 76317     0  2637 75713     - |  219  82779
   26 |     -     0  1736 70035     - |  235  80081
   27 | 72385     0  1251 72841     - |  233  79815
   28 | 73671     0  2165 74087     - |  220  83757
   29 | 81175     0  2702 80973     - |  276  83369
   31 | 80006     0  1819 79818     - |  232  87558
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   2809
 ALGO |     -     0     -     -     - |  288      0
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  288   1457
 GODE |     -     0     -     -     - |  288 154128
 GOLD |     -     0     -     -     - |  265   3333
 GRAZ |     -     0     -     -     - |  284    527
 HARV |     -     0     -     -     - |  288   9396
 HERS |     -     0     -     -     - |  288   1713
 HOLB |     -     0     -     -     - |  283  22151
 JOZE |     -     0     -     -     - |  285    >>>
 JPLM |     -     0     -     -     - |  288  16966
 KIRU |     -     0     -     -     - |  195   3474
 KOKB |     -     0     -     -     - |  281     87
 KOSG |     -     0     -     -     - |  288   3257
 KOUR |     -     0     -     -     - |  280   1431
 MATE |     -     0     -     -     - |  288     95
 MDO1 |     -     0     -     -     - |  288 204719
 METS |     -     0     -     -     - |  288    100
 NLIB |     -     0     -     -     - |  286    279
 ONSA |     -     0     -     -     - |  288    204
 PERT |     -     0     -     -     - |  238  43738
 PIE1 |     -     0     -     -     - |  286     79
 SANT |     -     0     -     -     - |  174   6249
 SIO3 |     -     0     -     -     - |  287    >>>
 STJO |     -     0     -     -     - |  288   4168
 TIDB |     -     0     -     -     - |  253   5191
 TROM |     -     0     -     -     - |  153    >>>
 TSKB |     -     0     -     -     - |  288    506
 USUD |     -     0     -     -     - |  288    635
 WES2 |     -     0     -     -     - |  288     39
 WILL |     -     0     -     -     - |  288   5134
 YAR2 |     -     0     -     -     - |  287   2514
 -----+-------------------------------+-------------
 TOT  | 69193     0  5355 69267     - |
