
 cls-file Version 2.0
 GPS week: 0739   Day: 0   MJD: 49417                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 co1 |    96     0   2026      8   -4233     973  70474  70474      0  72749  72749      0    0.00
 gf1 |   288     0  15676      0   -6319    5636      0      0      0      0      0      0  100.00
 igf |    96     0   2026     14   -3045   -2014   4256   4256      0   9651   9651      0    0.00
 pd1 |    96     0   2026      8   -4248     966  70458  70458      0  72727  72727      0    0.00
 si1 |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 |
 -----+-------------------------------+
    1 |   -61     0 -1288   -99     - |
    2 |  1328     0  3681  1530     - |
    3 |-23438     0-18503-23336     - |
    4 |  -489     0  -951  -469     - |
    5 |  1557     0   171  1325     - |
    7 | -2237     0 -2750 -1973     - |
    9 |  3324     0  4004  2630     - |
   13 |-21805     0-20911-21783     - |
   14 |  4099     0  1098  4078     - |
   15 | -6226     0 -6059 -6183     - |
   16 |  6069     0  1834  5961     - |
   17 | -7696     0 -7757 -7820     - |
   18 | 18716     0 18360 18717     - |
   19 |   211     0   -11    16     - |
   20 |   909     0   800   880     - |
   21 | -6185     0 -2437 -5602     - |
   23 | 30713     0 21400 30748     - |
   24 | -9005     0 -8341 -8938     - |
   25 |   254     0  1132   247     - |
   26 | -3118     0  2708 -3046     - |
   27 |   853     0   975  1194     - |
   28 |   866     0  3850   875     - |
   29 |  2373     0  2988  2079     - |
   31 |  8252     0  3884  8212     - |
 -----+-------------------------------+
 ALBH |     -     0     -     -     - |
 ALGO |     -     0     -     -     - |
 BRMU |     -     0     -     -     - |
 BRUS |     -     0     -     -     - |
 FAIR |     -     0     -     -     - |
 GODE |     -     0     -     -     - |
 GOLD |     -     0     -     -     - |
 GRAZ |     -     0     -     -     - |
 HARV |     -     0     -     -     - |
 HERS |     -     0     -     -     - |
 HOLB |     -     0     -     -     - |
 JOZE |     -     0     -     -     - |
 JPLM |     -     0     -     -     - |
 KIRU |     -     0     -     -     - |
 KOKB |     -     0     -     -     - |
 KOSG |     -     0     -     -     - |
 KOUR |     -     0     -     -     - |
 MADR |     -     0     -     -     - |
 MATE |     -     0     -     -     - |
 MDO1 |     -     0     -     -     - |
 METS |     -     0     -     -     - |
 NLIB |     -     0     -     -     - |
 PERT |     -     0     -     -     - |
 PIE1 |     -     0     -     -     - |
 SANT |     -     0     -     -     - |
 SIO3 |     -     0     -     -     - |
 TIDB |     -     0     -     -     - |
 TSKB |     -     0     -     -     - |
 USUD |     -     0     -     -     - |
 WES2 |     -     0     -     -     - |
 WILL |     -     0     -     -     - |
 YAR2 |     -     0     -     -     - |
 YELL |     -     0     -     -     - |
 ZIMM |     -     0     -     -     - |
 -----+-------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   co1   gf1   igf   pd1   si1 | NEPO    RMS
 -----+-------------------------------+-------------
    1 | 80652     0  2349 80640     - |  243  84507
    2 | 81574     0  1639 81572     - |  266  81601
    3 | 23163     0  5250 23185     - |  247  16336
    4 | 83118     0  2288 83122     - |  235  82663
    5 | 65455     0  2445 65488     - |  271  77505
    7 | 76262     0  2943 76202     - |  236  80612
    9 | 82284     0  5003 82380     - |  241  90892
   13 | 16244     0  6194 16243     - |  269 356045
   14 | 59575     0  1597 59576     - |  259  75787
   15 | 15163     0  1551 15142     - |  255   1430
   16 | 79431     0  1699 79404     - |  235  85387
   17 | 76371     0  1617 76370     - |  275  87264
   18 | 80322     0  9563 80324     - |  279  80588
   19 | 77726     0  1692 77705     - |  282  80871
   20 | 15732     0  2711 15763     - |  228   5609
   21 | 70410     0  3433 70048     - |  275  81504
   23 | 84410     0 13102 84414     - |  231  76612
   24 | 80331     0  3066 80336     - |  233  84516
   25 | 83721     0  2726 83723     - |  238  83702
   26 | 75632     0  1847 75640     - |  238  83918
   27 | 77046     0  1653 77038     - |  288  79672
   28 | 72192     0  1929 72183     - |  240  79695
   29 | 62644     0  1730 62615     - |  280  78516
   31 | 90038     0  2005 90035     - |  231  82229
 -----+-------------------------------+-------------
 ALBH |     -     0     -     -     - |  288   3371
 ALGO |     -     0     -     -     - |  288      0
 BRMU |     -     0     -     -     - |  288    >>>
 BRUS |     -     0     -     -     - |  288   1211
 FAIR |     -     0     -     -     - |  285    199
 GODE |     -     0     -     -     - |  288   3318
 GOLD |     -     0     -     -     - |  287    201
 GRAZ |     -     0     -     -     - |  288    301
 HARV |     -     0     -     -     - |  288  27981
 HERS |     -     0     -     -     - |  288   1695
 HOLB |     -     0     -     -     - |  281  22007
 JOZE |     -     0     -     -     - |  280    >>>
 JPLM |     -     0     -     -     - |  288  15880
 KIRU |     -     0     -     -     - |  252   1474
 KOKB |     -     0     -     -     - |  288    202
 KOSG |     -     0     -     -     - |  288  13543
 KOUR |     -     0     -     -     - |  282   2813
 MADR |     -     0     -     -     - |  282   7033
 MATE |     -     0     -     -     - |  284    320
 MDO1 |     -     0     -     -     - |  288 400714
 METS |     -     0     -     -     - |  288    266
 NLIB |     -     0     -     -     - |  288    227
 PERT |     -     0     -     -     - |  288   3271
 PIE1 |     -     0     -     -     - |  288    238
 SANT |     -     0     -     -     - |  252   4598
 SIO3 |     -     0     -     -     - |  287    >>>
 TIDB |     -     0     -     -     - |  253   1463
 TSKB |     -     0     -     -     - |  288   1334
 USUD |     -     0     -     -     - |  288    381
 WES2 |     -     0     -     -     - |  288    225
 WILL |     -     0     -     -     - |  288   6700
 YAR2 |     -     0     -     -     - |  288   2974
 YELL |     -     0     -     -     - |  244   9590
 ZIMM |     -     0     -     -     - |  284    >>>
 -----+-------------------------------+-------------
 TOT  | 70475     0  4257 70458     - |
